Windows NT 3.1 HCL Contents

Microsoft Windows NT Version 3.1

Hardware Compatibility List

The following computers and peripherals have passed Microsoft® Windows NTTM operating system version 3.1 compatibility testing as of May, 1994.  Some computers may be sold with additional peripherals that are not yet supported by the Windows NT operating system.  If your computer or device is not listed below, contact the manufacturer for more information.  We have not tested every computer and/or device in all possible configurations.  Please refer to the file SETUP.TXT on the install media for additional compatibility information when installing Windows NT.

Items listed with footnote number 1 require one of the device drivers available in the \DRVLIB directory on the Windows NT CD-ROM.  These drivers are also available in the Windows NT Driver Library.

Items listed with footnote number 2 are supported with device drivers available in the Windows NT Driver Library.  Please see the section at the end of this document on accessing this library.

Updates to this list will appear in Library 1 of the WINNT forum (GO WINNT) or Library 17 of the MSWin32 forum (GO MSWIN32) on CompuServe® Information Services.

x86 Architecture Uniprocessor Computers

x86 Architecture Multiprocessor Computers

MIPS® RISC Architecture Computers

Digital Alpha AXP™ RISC Architecture Computers

SCSI Host Adapters

SCSI CD-ROM Drives

Other CD-ROM Drives

SCSI Tape Drives

Other Tape Drives

SCSI Removable Media

SCSI Scanners

Disk Controllers

Hard Drives

Storage Cabinets

Video Display Support

Network Adapters

Multimedia Audio Adapters

Modems

Hardware Security Hosts

ISDN Adapters

Multi-port Serial Adapters

Uninterruptible Power Supplies

Keyboards

Pointing Devices

Printers

Technical Notes

Updates

Disclaimer


x86 Architecture Uniprocessor Computers

The following systems have been tested.

Absolute Computer 486/66 VL/EISA

ACD OPTIMA 486 DX 33 VL

ACD OPTIMA 486 DX 50 VL

ACD OPTIMA 486 DX2 66 VL

ACER 17000 SMP AA17853N

ACER AcerAcros 486DX2/66 (Model PT66DB)

ACER AcerAltos 700 Model AA768C

ACER AcerAltos 7000 Model AA7653N

ACER AcerAltos 7000 Model 7959BN

ACER AcerAltos 7000/F433TU

ACER AcerAltos 7000/FT66TU

ACER AcerAltos 800 Model AA868C

ACER AcerFrame 1000 (Model 1733)

ACER AcerFrame 1000 (Model 1766)

ACER AcerFrame 300 (Model F433T)

ACER AcerFrame 500 (Model F433TE)

ACER AcerFrame 500 (Model FT50TE)

ACER AcerFrame 500 (Model FT66TE)

ACER AcerFrame 700

ACER AcerMate 466d (Model MT66D3)

ACER AcerPower 425s

ACER AcerPower 433

ACER AcerPower 433e/P433E

ACER AcerPower 433s

ACER AcerPower 433v

ACER AcerPower 450d

ACER AcerPower 450de/PT50E

ACER AcerPower 466d

ACER AcerPower 466de/PT66E

ACER AcerPower 466dv

ACER AcerPower 486/33

ACER AcerPower 560e/P560E

ACER AcerPower 566e

ACER AcerPower 9000  SeriesModel 9813N

ACMA 486/33 TI-VLB

ACMA 486/50 TS-E

ACMA 486/50-2 TI-VLB

ACMA 486/66-2 TI-VLB

ACMA 486/66-2 TS-E

ACMA 486/66-2 TS-VLB

ACS Meritel 486-50SF

ACS Meritel 486-66SF

Actech ACTion EISA 486DX-50

Actech ACTion EISA 486DX/2-66

Actech ACTion ISA 486DX-33

Actech ACTion ISA 486DX-50

Actech ACTion ISA 486DX/2-50

Actech ACTion ISA 486DX/2-66

Actech ACTion ISA 486SX-25

Actech ACTion VLB 486DX-33

Actech ACTion VLB 486DX-50

Actech ACTion VLB 486DX/2-50

Actech ACTion VLB 486DX/2-66

Actech ACTion VLB 486SX-25

Adaptive Data System Pro 3/486-40

Adaptive Data System Pro 486/33 VESA®

Adaptive Data System Pro 486/33DX

Adaptive Data System Pro Series 486/50

Adaptive Data System TAI 386DX/40CF System

Adaptive Data System TAI 486DX/50CS System

ADD-X 486 All In One 33 MHz

ADD-X Systemes 486/33Mhz ISA bus

ADPS 486 Power Notebook 486DX2-50Mhz

ADPS 486 Power Notebook Color 486-33Mhz

ADPS Ambassador

ADPS Bat Computer-33MHz

ADPS Bat Computer-50MHz

ADPS Local Bus 33

ADPS Medallion

ADPS Multimedia Power House

ADPS Power Notebook 486-33Mhz

ADPS System 3000

ADPS System 4000

ADPS System 5000

ADPS System 6000 EISA

ADPS System 6000 Plus

ADPS System 6000 Plus EISA

ADS 486 EISA+VESA UPGRADEABLE

ADS 486VL UPGRADEABLE

ADS ADA 466 EV

ADS ADA 466 ISA/VESA

ADS ADA 466E

ADS ADA-560-P

ADS LDI-466 ISA/VESA

ADS UPGRADEABLE 3/486

Advance Interface EISA VESA 486DX-50

Advance Interface EISA VESA 486DX2-66

Advance Interface VL-BUS 486DX-50

Advance Interface VL-BUS 486DX2-66

Advanced Computer SPIRAL 386DX/40

Advanced Computer SPIRAL 486/33

Advanced Computer SPIRAL 486DX2/50

AIC STM 386DX-33Mhz

AIC STM 486DX-33Mhz

AIC STM 486DX2-66Mhz

AIC STM 486DX2-66Mhz Local Bus

Alcotini AmiTech 386DX-40 STD

Alcotini AmiTech 486DX-33 STD

Alcotini AmiTech 486DX2-50 STD

Alcotini AmiTech 486DX2-66 STD

Alcotini AmiTech 486SX-25 STD

Alcotini Weston 486DX-66 TFT

Alfa DELTACOM 486-33

Alfa DELTACOM 486-50

Alfa DELTACOM 486SX-25

Alfa DELTACOM EISA 486-50

Alfa DELTACOM VESA 486DX2-66

AllWare 466-EV

ALR® BusinessVEISA 3/33

ALR BusinessVEISA 4/33D

ALR BusinessVEISA 4/66D

ALR Evolution IV 4/25s

ALR Evolution IV 4/33

ALR Evolution IV 4/33s

ALR Evolution IV 4/66d

ALR Evolution IV 4E/25s

ALR Evolution IV 4E/33

ALR Evolution IV 4E/33s

ALR Evolution IV 4E/66d

ALR Evolution V STP/60

ALR Evolution V-Q/60

ALR Evolution V-Q/66

ALR Evolution V/60

ALR Evolution V/66

ALR Flyer 32LCT 4/50D

ALR Flyer 32LCT 4/66D

ALR Flyer 32LCT 4DX/33

ALR Flyer SD32 4/33

ALR Flyer SD32 4/66d

ALR Flyer VL 4/33d

ALR Flyer VL 4/66d

ALR Modular Processor System 486DX2/66

ALR PowerCache 4 33e

ALR POWERPRO/MC SMP 4/50D

ALR PROVEISA V/66

ALR RANGER M4/25

ALR RANGER MC4/25S

ALR RANGER MC4DX/25

ALR RANGER MCT4/25

AMAX 486/2-50 VESAmax Power Station

AMAX 486/33 VESAmax Power Station

AMAX 486/50 EISAmax Power Station

AMAX 486/66 EISAmax Power Station

AMAX 486/66 VESAmax Power Station

Ambra 486DX/50

Ambra D4100BL

Ambra D466E/VL

Ambra DP60/PCI

Ambra DP66E/VL

Ambra T4100BL

Ambra T466E/VL

American Multisystems InfoGOLD EISA VLB Line (DX2/66)

American Multisystems InfoGOLD P60NT

AMI® Enterprise III

AMI Enterprise IV

AMI Excalibur PCI

AMI Excalibur VLB

AMI Omni Business Partner

AMI Super Voyager LC

AMI Super Voyager PCI

AMI Super Voyager VLB

AMI Super Voyager VLB II

AmPAQ Ultimate 466 VLB/S2

AMS TravelPro 5300

AMSYS UPG VLbus DX2-50 DT

Annabelle Bits ASI 486/33 Vesa Local Bus

AOX PS/2® 80-081 w/Aox McMASTER48633

Applied Computer ACT 486/33 DX

Applied Computer ACT PENTIUMTM TOWER

Apricot® FTe 486DX2/66

Apricot FTs 486DX2/66

Apricot XEN-LS II

Aquiline NT 466c System

Ares 486-33 VLB

Ariel 486DX2-66EVS

Ariel 486DX2-66VLS2

Asem DP 486/66 II

Asem DS 486/33 II

Asem ECO-PC 4/33

Asem ECO-PC 4/66

Asem MID-SERVER 4/33

Asem PROSERVER 5/60

ASL 433

Aspect 3/486 386DX-40 ISA

Aspect 3/486DX-33 ISA

Aspect 3/486DX-50 ISA

Aspect 3/486DX2-66 ISA

Aspect 486DX2-66 PCI

Aspect EISA 486DX-33

Aspect EISA 486DX-50

Aspect EISA 486DX2-66

Aspect ISA 486DX-33

Aspect ISA 486DX-50

Aspect ISA 486DX2-66

Aspect ISA 486SX-33

Aspect Pentium PCI 60

Aspect VESA 486DX-33

Aspect VESA 486DX-33F

Aspect VESA 486DX-50

Aspect VESA 486DX-50F

Aspect VESA 486DX2-66

Aspect VESA 486DX2-66F

Aspect VESA 486SX-33

Aspect VESA 486SX-33F

AST® Advantage 486sx/33

AST Advantage!TM Plus 486DX/33

AST Advantage! Pro 486SX/25 Model 173

AST Bravo 3/25s Model 3V

AST Bravo LC 4/25s

AST Bravo LC 4/33

AST Bravo LC 4/33s

AST Bravo LC 4/50d

AST Bravo LC 4/66 SL

AST Bravo LC 4/66d

AST Bravo LP 4/25s

AST Bravo LP 4/33

AST Bravo LP 4/66d

AST Bravo MT 4/33

AST Bravo MT 4/66d

AST Manhattan SMP P60 (1p) 3

AST Power Premium 4/33 EISA

AST Power Premium 4/50d

AST PowerExec 4/25SL

AST Premiere MTE P/60

AST Premium 386/33T

AST Premium II 386/33 Model 213V

AST Premium II 486/33

AST Premium SE 4/33 Model 333

AST Premium SE 4/50

AST Premium SE 4/50d

AST Premium SE 4/66d

AST Premium SE 486/33

AST Premium SE P/60

AST Premmia 4/33

AST Premmia 4/33SX

AST Premmia 4/66d

AST Premmia MTE 4/66d

AST Premmia SE 4/33

AST Premmia SE 4/66d

AST Premmia SE P60

AT&T 3406

AT&T 3416

Athena ALM 486 DX 33

Athena ALM 486 DX 50

Athena ALM 486 DX 66

Athena HQ / ISA 486DLC 40

Athena HQ / ISA 486DX 33

Athena HQ / ISA 486DX 50

Athena HQ / ISA 486DX2 66

Athena HQ / VESA 486DX 33

Athena HQ / VESA 486DX2 50

Athena HQ / VESA 486DX2 66

Austin 486/50 EISA Tower PATRIOT

Austin 486/50 VESA-LB PATRIOT

Austin 486/50 VESA-LB PATRIOT PLUS

Austin 486DLC

Austin 486DX/33 EISA Tower PATRIOT

Austin 486DX/33 VESA-LB PATRIOT

Austin 486DX/33 VESA-LB PATRIOT PLUS

Austin 486DX2/50 EISA Tower PATRIOT

Austin 486DX2/66 EISA Tower PATRIOT

Austin 486DX2/66 VESA-LB PATRIOT PLUS

Austin Winstation 486DX2/66

Axik Ace Cache 486DX-33V

Axik Ace Cache 486DX-33VG

Axik Ace Cache 486DX2-50VG

Axik Ace Cache 486DX2-66V

Axik Ace Cache 486DX2-66VG

Axik Ace Cache 486SX-33VG

Aztech TRACER SERIES 386DX/40

Aztech TRACER SERIES 486DX/33

Aztech TRACER SERIES 486DX2/66

Bear 486/50 Desktop

Brett ExecEISA

Brett Executive

Brett Executive PCI Pentium

Brett Pro PCI

Brett Pro VLB

Brett Station NTe EISA

C&S Computer E III 486/VLB

C. THIIM  486DX33

CAF CT-02 L737/486DX-33

Caliber 3/486 386DX-40 ISA

Caliber 3/486DX-33 ISA

Caliber 3/486DX-50 ISA

Caliber 3/486DX2-66 ISA

Caliber 486DX2-66 PCI

Caliber EISA 486DX-33

Caliber EISA 486DX-50

Caliber EISA 486DX2-66

Caliber ISA 486DX-33

Caliber ISA 486DX-50

Caliber ISA 486DX2-66

Caliber ISA 486SX-33

Caliber Pentium 60 PCI

Caliber VESA 486DX-33

Caliber VESA 486DX-33F

Caliber VESA 486DX-50

Caliber VESA 486DX-50F

Caliber VESA 486DX2-66

Caliber VESA 486DX2-66F

Caliber VESA 486SX-33

Caliber VESA 486SX-33F

CELEM 486DX/33  VL (VESA)

CELEM 486DX/33 C (ISA)

CELEM 486DX/50  VL (VESA)

CELEM 486DX/50 MC  (EISA)

CELEM 486DX2/66 DC (EISA+VESA)

CELEM 586/60 PCI (PCI+ISA)

CENSUS 4D266S DT (incl. MT, IT, and FT Models)

CENSUS 4D33S DT (incl. MT, IT, and FT Models)

CENSUS 4D40S DT (incl. MT, IT, and FT Models)

CENSUS 4D50S DT (incl. MT, IT, and FT Models)

CENSUS 4S25S DT (incl. MT, IT, and FT Models)

CENSUS 4S33S DT (incl. MT, IT, and FT Models)

Centis Profi 433-1G

Centis Profi Lite 433-G25

Chaplet HALIKAN NBD-486T/25M

Chicony Electronics 486 33P

Chicony Electronics Subnote 486SX/25

Cinet ET-100

Cinet EVL Series 486DX2/66

Cinet FSE-100

Cinet HI Series 486DX2/66

Cinet HI-100

Cinet LS-100

Cinet MP-100

Cinet PPI-100

Cinet VL Series 486DX2/66

Cinet VL-100

Cinet VLG-100

Clone 9433

Colfax P1-486 EISA/VLB

Comark CAT486-33/VL

Comark CAT486-66/VL

Comark flex 486

Comark Pentium-60/VL

Comark Pentium-VL-60 Rackmount

Commodore® 486DX-33C

Commodore 486SLC-25

Commodore 486SX-25

Commodore DT 486SX-20

Commodore LB 486DX-33C

Commodore LB 486DX2-66C

Commodore LB 486SX-33C

Commodore LB T486DX2-66C

Commodore T486DX-50C

COMPAQ® Concerto 4/25

COMPAQ Contura 4/25C

COMPAQ Deskpro 386/25®

COMPAQ Deskpro 386®/25e

COMPAQ Deskpro 386/33®

COMPAQ Deskpro 386TM/33L

COMPAQ Deskpro® 4/66i

COMPAQ Deskpro 486/25

COMPAQ Deskpro 486/25i

COMPAQ Deskpro 486/33i

COMPAQ Deskpro 486/33L

COMPAQ Deskpro 486/33M

COMPAQ Deskpro 486/50L

COMPAQ Deskpro 486/50M

COMPAQ Deskpro 5/60M

COMPAQ Deskpro 5/66M

COMPAQ Deskpro 66M

COMPAQ Deskpro XE 4/50

COMPAQ Deskpro XE 4/66

COMPAQ Deskpro XE 4100

COMPAQ Deskpro XE 433s

COMPAQ Deskpro XE 560

COMPAQ LTE® Lite 4/25

COMPAQ LTE Lite 4/25C

COMPAQ LTE Lite 4/33C

COMPAQ Portable 486c

COMPAQ Portable 486C/66

COMPAQ Presario 425

COMPAQ Presario CDS 633

COMPAQ ProLiant 1000 486DX2/66

COMPAQ ProLiant 1000 Model 5/60

COMPAQ ProLiant 2000 Model 486/50

COMPAQ ProLinea 3/25s

COMPAQ ProLinea 4/50

COMPAQ Prolinea 4/66

COMPAQ Prolinea CDS 200

COMPAQ Prolinea MT 4/33sx

COMPAQ ProSignia 486DX/33

COMPAQ ProSignia 486DX2/66

COMPAQ ProSignia 5/60

COMPAQ ProSignia VS 486DX/33

COMPAQ ProSignia VS 486DX2/66

COMPAQ ProSignia VS 486SX/33

COMPAQ Systempro®/LT 386/25

COMPAQ Systempro/LTTM 486/33

COMPAQ Systempro/LT 486DX2/50

COMPAQ Systempro/LT 486DX2/66

COMPAQ Systempro/LT 486SX/25

Comper DC486-662V

CompuAdd® 420s

CompuAdd 433

CompuAdd 433 ELB

CompuAdd 433 LB

CompuAdd 433 LP

CompuAdd 433DLC LP

CompuAdd 433E

CompuAdd 450

CompuAdd 450DX2 LP

CompuAdd 466/DX2

CompuAdd 466DX2 LB

CompuAdd 466DX2E LB

CompuAdd 486-33DLC

COMPUCON 386DX/40

COMPUCON 486DX/33

COMPUCON 486DX/33 ISA/VL

COMPUCON 486DX/50

COMPUCON 486DX/50 EISA/VL

COMPUCON 486DX/50 VL

COMPUCON 486DX2-66

COMPUCON 486DX2/66 EISA/VL

COMPUCON PCI/I486SP3

COMPUCON PCI/IP-60

Compudyne 4DX2/50 EISA16340 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX2/50 VLB16340 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX2/66 EISA16245 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX2/66 Slimnote

Compudyne 4DX2/66 VLB16245 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX33 EISA16245 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX33 VLB16245 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX50 EISA16340 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX50 VLB16340 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX2/50 2VLB DIP DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX2/50 2VLB SMT DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX2/66 2VLB DIP DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX2/66 2VLB SMT DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX33 2VLB DIP DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX33 2VLB SMT DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX50 2VLB DIP DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX50 2VLB SMT DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO SX25 2VLB DIP DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO SX25 2VLB SMT DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO SX33 2VLB DIP DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO SX33 2VLB SMT DESKTOP (incl. MINITOWER and SERVERTOWER)

CompuPartner 4D250

CompuPartner 4D33

CompuPartner 4DV266

Computer Extension CESI 486 66

Computer Resources 486DX266 ISA

Computer Resources 486DX33 FULL TOWER

Computer Resources 486DX33LOCAL BUS

Computer Resources 486DX50 EISA

Computer Sales Prof. 486DX/33 VL

Computer Sales Prof. 486DX2/50 VL

Computer Sales Prof. 486DX2/66 EISA/VL

Computer Sales Prof. 486DX2/66 VL

Computer Sales Prof. 486SX/25 VL

Computer Sonics CSI EISA/VL 486

Computer Sonics CSI ISA 486/33

Computer Sonics CSI VL/ISA 486

Computer Systems Resources P5/60MHZ PCI

Computrend PREMIO 486DX-33

Computrend PREMIO 486DX-50

Computrend PREMIO 486DX2-66

Comtrade EISA GigaByte Ultima 486DX2-66

Cornell Computer Systems HOME OFFICE PAK 486/33 VLB

Cornell Computer Systems Opti 486/66 VLB

Cornell Computer Systems Tyan 486/33 EISA-VLB

Cornell Computer Systems Tyan 66/EISA

Cornell Computer Systems VALUE PAK 486/33 VLB

Cornell Computer Systems VALUE PAK 486/66 VLB

Cornell Computer Systems Vega 33/VLB

Cornell Computer Systems Win NT Pak

CPU Sir Henry NT

Crescent 486-33VL

Crescent 486-66VL

CSS Labs MaxSys 433MTA

CSS Labs MaxSys 433MTMGE

CSS Labs MaxSys 433TA

CSS Labs MaxSys 433TMGE

CSS Labs MaxSys 450MTMGE

CSS Labs MaxSys 450TMGE

CSS Labs MaxSys 452MTMGE

CSS Labs MaxSys 452TMGE

CSS Labs MaxSys 462MTA

CSS Labs MaxSys 462MTE

CSS Labs MaxSys 462MTMGE

CSS Labs MaxSys 462TA

CSS Labs MaxSys 462TE

CSS Labs MaxSys 462TMGE

CSS Labs Preferred 433GA

CSS Labs Preferred 433GE

CSS Labs Preferred 433MGE

CSS Labs Preferred 450MGE

CSS Labs Preferred 452MGE

CSS Labs Preferred 462GA

CSS Labs Preferred 462GE

CSS Labs Preferred 462MGE

CTM Fontek 486DX2-50 VL

CTM Fontek 486DX2-66 VL

CTM Fontek 486DX33 VL

Cube 340 ATX

Cube 433 ATX

Cube 450 ATX

Cube 466 ATX

Cube 466 ATX Local Bus

Cube 486/40

CyberStar Alliance DX2/50

CyberStar FilePro 1000

CyberStar FilePro 2000

CyberStar FilePro 2000 5/60

Daewoo 486 PCI SYSTEM (DX2-66)

Daewoo 486 VESA GREEN SYSTEM (DX2-50)

Daewoo 486 VESA GREEN SYSTEM (SX-25)

Daewoo 486 VESA GREEN SYSTEM (SX-33)

Daewoo 486 VESA System/2700(33)

Daewoo 486 VESA System/2900(33)

Daewoo Modular Desktop/2300

Daewoo Modular Mini Tower/2400

Daewoo VESA PENTIUM(60)

DAN for Windows 25

DAN for Windows 33

DAN for Windows 50

DAN for Windows 66

DAN Vantage/25

DAN Vantage/33

DAN Vantage/50

DAN Vantage/66

Danjen 486DLC 33 MHz

Danjen 486DX 33 MHz Local Bus

Danjen 486DX 50 MHz EISA

Danjen 486DX 50 MHz ISA

Dassault AT CUSTOMER ACTIVATED TERMINAL D633

Data Stor 386-33DX Desktop/Tower

Data Stor 386-33SX Desktop/Tower

Data Stor 486-25SX Desktop/Tower 4

Data Stor 486-33 PCI

Data Stor 486-33DX Desktop/Tower 4

Data Stor 486-33SX Desktop/Tower 4

Data Stor 486-50DX Desktop/Tower 4

Data Stor 486-66DX2 Desktop/Tower 4

Data Stor 486-66DX2E Desktop/Tower

Data Stor Pentium VL-60

Data Stor Pentium-60 PCI

DataExpert Model 486DX/2i-PCI

DataExpert Model 486DX/2i-VL

DataExpert Model 486DXe-VL66

DataExpert Model 486DXi-VL33

DATAFILEN PROFF 386DX-40

DATAFILEN PROFF 486DX-33 VL

DATAFILEN PROFF 486DX2-66 VL

Datavarehuset BRICK 486DX-33 EISA

Datavarehuset BRICK 486DX2-50 Local Bus

Datavarehuset BRICK 486DX2-66 Local Bus

Datavarehuset BRICK 9003 486DX-33

Datavarehuset BRICK 9003 486DX2-50

Datavarehuset BRICK 9003 4DXV

DDK Soft DDK-4066/2LV

Debis DCS Minitower 486 EISA

Debis DCS Tower 486 MC

Debis DCS Tower 486 MP EISA

Deico 486DLC

Deico Predator III

DELL® 325 N Notebook

DELL 325 NC Notebook

DELL 4033/XE

DELL 4050/XE

DELL 4066/XE

DELL 425s/L

DELL 433/L

DELL 433/M

DELL 433/ME

DELL 433/T

DELL 450/M

DELL 450s/L

DELL 4560/XE

DELL 466/M

DELL 466/ME

DELL Dimension 466/T

DELL Dimension 486DX/33

DELL Dimension 486DX/50

DELL Dimension 486DX2/50s

DELL Dimension 486SX/25

DELL Dimension XPS P60

DELL OmniPlex 560

DELL OmniPlex 566

DELL OptiPlex 425s/MXV

DELL OptiPlex 433/MXV

DELL OptiPlex 433s/MXV

DELL OptiPlex 450/MXV

DELL OptiPlex 466/MXV

DELL PowerLine 466DE

DELL PowerLine 466SE

DELL PowerLine System 325

DELL PowerLine System 433DE

DELL PowerLine System 433E

DELL PowerLine System 433SE

DELL PowerLine System 450/T

DELL PowerLine System 450DE

DELL PowerLine System 450DE/2 DGX

DELL PowerLine System 450SE

DELL PowerLine System 486D/33

DELL PowerLine System 486D/50

DELL PowerLine System 486P/25

DELL PowerLine System 486P/33

Delphi Olympus

Delta Micro Systems Gold Line 4D33V

Delta Micro Systems Gold Line 4D50C

Destiny Blitz 486SLC 33

DFI CCV 486DX-33

DFI CCV 486DX2-50

DFI CCV 486DX2-66

DFI CCV 486SX-25

DFI D486P-PRO

DFI P9800T 5

DFI TN 486DX-33

DFI TN 486DX2-50

DFI TN 486DX2-66

DFI TN 486SX-25

DFI UCE 486DX-33

DFI UCE 486DX-50

DFI UCE 486DX2-50

DFI UCE 486DX2-66

DFI UCE 486SX-25

DFI UCF 486DX-33

DFI UCF 486DX-50

DFI UCF 486DX2-50

DFI UCF 486DX2-66

DFI UCF 486SX-25

Diamond DT 486DX Versa (AMD DX/40)

Diamond DT 486DX Versa (DX2/66)

Digital Equipment Corp. application DEC® 400xP

Digital Equipment Corp. DECpc 333

Digital Equipment Corp. DECpc 425

Digital Equipment Corp. DECpc 425 SE Notebook

Digital Equipment Corp. DECpc 425 ST

Digital Equipment Corp. DECpc 425i

Digital Equipment Corp. DECpc 425i DX2

Digital Equipment Corp. DECpc 433

Digital Equipment Corp. DECpc 433 SE

Digital Equipment Corp. DECpc 433 ST

Digital Equipment Corp. DECpc 433 Workstation

Digital Equipment Corp. DECpc 433dx DT

Digital Equipment Corp. DECpc 433dx LP

Digital Equipment Corp. DECpc 433dx MT

Digital Equipment Corp. DECpc 433dx MTE

Digital Equipment Corp. DECpc 433sx DT

Digital Equipment Corp. DECpc 433T

Digital Equipment Corp. DECpc 450 ST

Digital Equipment Corp. DECpc 450d2 LP

Digital Equipment Corp. DECpc 450d2 MT

Digital Equipment Corp. DECpc 452 ST

Digital Equipment Corp. DECpc 466 ST

Digital Equipment Corp. DECpc 466d2 DT

Digital Equipment Corp. DECpc 466d2 LP

Digital Equipment Corp. DECpc 466d2 LPx

Digital Equipment Corp. DECpc 466d2 MT

Digital Equipment Corp. DECpc 466d2 MTE

Digital Equipment Corp. DECpc 560 ST

Digital Equipment Corp. DECpc LPv 425sx

Digital Equipment Corp. DECpc LPv 433dx

Digital Equipment Corp. DECpc LPv 433sx

Digital Equipment Corp. DECpc LPv 450d2

Digital Equipment Corp. DECpc LPv 466d2

Digital Equipment Corp. DECpc LPv+ 4100

Digital Equipment Corp. DECpc LPv+ 433dx

Digital Equipment Corp. DECpc LPv+ 433sx

Digital Equipment Corp. DECpc LPv+ 450d2

Digital Equipment Corp. DECpc LPv+ 450s2

Digital Equipment Corp. DECpc LPv+ 466d2

Digital Equipment Corp. DECpc LPx 433dx

Digital Equipment Corp. DECpc LPx 433sx

Digital Equipment Corp. DECpc LPx 450d2

Digital Equipment Corp. DECpc LPx 560

Digital Equipment Corp. DECpc LPx 566

Digital Equipment Corp. DECpc LPx+ 433sx

Digital Equipment Corp. DECpc LPx+ 433dx

Digital Equipment Corp. DECpc LPx+ 450d2

Digital Equipment Corp. DECpc LPx+ 466d2

Digital Equipment Corp. DECpc MTE 4100

Digital Equipment Corp. DECpc XL 4100

Digital Equipment Corp. DECpc XL 433

Digital Equipment Corp. DECpc XL 466d2

Digital Equipment Corp. DECpc XL 560

Digital Equipment Corp. DECpc XL 566

Digital Equipment Corp. DECpc XL 590

Digital Equipment Corp. DECpc XL Server 466d2

Digital Equipment Corp. DECpc XL Server 560

Digital Equipment Corp. DECpc XL Server 566

Digital Equipment Corp. DECstation® 425c

Dolch C.P.A.C. 486-33C

Dolch C.P.A.C. 486-33E

Dolch C.P.A.C. 486-50 EISA

Dolch C.P.A.C. 486-66C

Dolch C.P.A.C. 486-66E

Dolch M.A.C.H. 486-33

Dolch M.A.C.H. 486-66

Dolch V.P.A.C. 486-33C

Dolch V.P.A.C. 486-33E

Dolch V.P.A.C. 486-66C

Dolch V.P.A.C. 486-66E

DTK 486VL

DTK FEAT03-D33

DTK FEAT03-D40

DTK FEAT03-D50

DTK FEAT03-T66

DTK FEAT04-D33

DTK FEAT33-D33

DTK FEAT33-D40

DTK FEAT33-D50

DTK FEAT33-T66

DTK FEAT34-D33

DTK FEAT34-D40

DTK FEAT34-D50

DTK FEAT34-T66

DTK FEAT35-D33

DTK FEAT36-D33

DTK FEAT5030-D33

DTK FEAT5030-D50

DTK FEAT5030-T66

DTK FEAT5031-D33

DTK FEAT5031-D50

DTK FEAT5031-T66

DTK FEAT62-D33

DTK FEAT62-T66

DTK Grafika 4A

DTK Grafika 4C

DTK Grafika 4D

DTK Grafika 4E

DTK Grafika 4F

DTK Grafika 4G

DTK Grafika 4I

DTK Grafika 4J

DTK Grafika 4V2D-D3

DTK Grafika 4V2D-T6

DTK Grafika 4V2T-D3

DTK Grafika 4V2T-T6

DTK Grafika 5V1T-60

DTK Grafika 5VID-60

DTK PENT-01 (incl. -31, -32 Models)

DTK SPAN0030

DTK SPAN01-D33

DTK SPAN01-D50

DTK SPAN01-T66

DTK SPAN3330

DTK SPAN5030

Duracom 486/25SX-CCV

Duracom 486/25SX-TN

Duracom 486/25SX-UCF

Duracom 486/33-CCV

Duracom 486/33-TN

Duracom 486/33-UCF

Duracom 486/50DX-UCF

Duracom 486/50DX2-CCV

Duracom 486/50DX2-TN

Duracom 486/50DX2-UCF

Duracom 486/66DX2-CCV

Duracom 486/66DX2-TN

Duracom 486/66DX2-UCF

Dyna Micro ASUS 486DX/33 PCI/ISA

Dynamic Decisions DYNEX EXEC-50 EISA

Dynamic Decisions DYNEX EXECUTIVE ISA-486-33 SV2G

Dynamic Decisions EXECUTIVE 486-33 ISA

Dynamic Decisions EXECUTIVE 486-33 ISA/PCI

Dynamic Decisions EXECUTIVE 486-33 VL/EISA

Dynamic Decisions EXECUTIVE 486-33 VL/ISA

Dynamic Decisions EXECUTIVE 486-33SX

Dynamic Decisions EXECUTIVE 486-50 VL/EISA

Dynamic Decisions EXECUTIVE 486-66 DX2 VL/ISA

Dynamic Decisions EXECUTIVE 486-66 VL/EISA

Dynamic Decisions EXECUTIVE ISA-486-33 SV2

Dynamic Decisions EXECUTIVE ISA-486-50 SV2

Dynamic Decisions EXECUTIVE ISA-486-66D2 SV2

Dynamic Decisions PROFESSIONAL 486-33 VL/ISA

Dynamic Decisions PROFESSIONAL 486-33DX VL/EISA E3

Dynamic Decisions PROFESSIONAL 486-33DX VL/EISA E4

Dynamic Decisions PROFESSIONAL 486-50DX VL/EISA E4

Dynamic Decisions PROFESSIONAL 486DX66 EISA VLB E

ECE DATA i486TM/VLB

ECG Unitron 340

ECG Unitron 425

ECG Unitron 433

ECG Unitron 450

ECG Unitron 450 DX/2

ECG Unitron 466 DX/2

ECG Unitron 466 DX/2 EISA

Elite Industries MB-1433AEA-V 486/33

Elite Industries MB-1433AEA-V 486/50

Elite Industries MB-1433AEA-V 486DX2/66

Elitegroup UC4917-G

Elitegroup UM4910

Elitegroup VL486

Elonex PC-400 Series Computer

Eltech Model 4660VB

Epson® Action PC 1500

Epson ActionDesk 2000

Epson ActionDesk 4000 (4DX2/66-LB)

Epson ActionDesk 4000+

Epson ActionServer 5500

Epson EL 486UC+

Epson EL 4S/33+

Epson Endeavor 486L

Epson Endeavor P60

Epson Endeavor VL66

Epson Endeavor WG 4DX2/50

Epson Endeavor WG 4DX2/66

Epson Endeavor WG 4SX33

Epson Equity 4DX/33

Epson Equity 4DX2/50

Epson Equity 4SX/25

Epson PowerSpan 486DX2/66

Epson Progression 486DX/33

Epson Progression 486DX2/66

Epson Progression 486SX/25

Epson Progression 4DX2/50

Epson Progression 4SX/33

Ergo Ultra Moby Brick 486/66

ERIDAN Onyx DE433

Erre 486DX2-66 VLB

EverCom ISA 486SR/33

EverCom VL 486SV2/66

EverexTM Cube DX/33

Everex Step 486/33 ISA

Everex Step DP

Everex Step Plus DX 33

Everex Step Plus DX/2 50

Everex Step Plus DX/2 66

Everex Step UP-60

Everex Step VL EISA 486DX2/50

Everex Step VL EISA 486DX2/66

Everex Step VL ISA 486DX2/50

Everex Step VL ISA 486DX2/66

Everex Tempo 486/33

Everex Tempo 486/33E

Everex Tempo 486DX2/50

Everex Tempo 486SX/25

Everex Tempo VL EISA DX/2 50

Everex Tempo VL EISA DX/2 66

Everex Tempo VL EISA DX/33

Everex Tempo VL ISA DX/2 50

Everex Tempo VL ISA DX/2 66

Everex Tempo VL ISA DX/33

Evergreen Systems CAPcard 425e

Evesham Micros VALETM PREMIER + 486DX2-66

Evesham Micros VALE PREMIER 486DX2-66

Evesham Micros VALE PRESTIGE® 486DX2-66

Expo-Tech 386 Ultra Slim

Expo-Tech 486DX/3 Desktop

Expo-Tech 486DX/3 Desktop (w/LBVGA)

Expo-Tech 486DX/3 Desktop (w/VLBUS)

Expo-Tech 486DX/3 Mini (w/VLBUS)

Expo-Tech 486DX/3 Tower

Expo-Tech 486DX/3 Tower (w/VLBUS)

Expo-Tech 486DX2/4 Desktop

Expo-Tech 486DX2/4 Desktop (w/LBVGA)

Expo-Tech 486DX2/4 Desktop (w/VLBUS)

Expo-Tech 486DX2/4 Tower

Expo-Tech 486DX2/4 Tower (w/VLBUS)

Expo-Tech 486DX2/6 Desktop

Expo-Tech 486DX2/6 Desktop (w/LBVGA)

Expo-Tech 486DX2/6 Desktop (w/VLBUS)

Expo-Tech 486DX2/6 Mini (w/VLBUS)

Expo-Tech 486DX2/6 Tower

Expo-Tech 486DX2/6 Tower (w/VLBUS)

Expo-Tech 486SX/3 Desktop

Expo-Tech 486SX/3 Desktop (w/LBVGA)

Expo-Tech 486SX/3 Tower

Expo-Tech 486SX/3 Ultra Slim

Expo-Tech 486SX/3 Ultra Slim (w/LBVGA)

Expo-Tech 486SX/4 Desktop

Expo-Tech 486SX/4 Desktop (w/LBVGA)

Expo-Tech 486SX/4 Desktop (w/VLBUS)

Expo-Tech 486SX/4 Mini (w/VLBUS)

Expo-Tech 486SX/4 Tower

Expo-Tech 486SX/4 Ultra Slim

Expo-Tech 486SX/4 Ultra Slim (w/LBVGA)

Expo-Tech LT322 Notebook

Expo-Tech LT421 Notebook

ExpressSM Micro EISA VESA 486DX-50

Express Micro EISA VESA 486DX2-66

Express Micro VL-BUS 486DX-50

Express Micro VL-BUS 486DX2-66

Fast 486DY66S520

Federal Technologies Guardian WinMaster 486/33SX

First Jupiter 486DX66 All In One ISA Bus

First Krypton 486DX50 VL-Bus

First LEO 4386VCV DX33

First LEO 486DX66-VL

First LEO 486VC DX/50

First LEO 486VC DX2/66

First LEO DESKTOP 486/33

First LEO DESKTOP 486/50

First LEO DESKTOP 486/66

First LEO MINITOWER 486/33

First LEO MINITOWER 486/50

First LEO MINITOWER 486/66

First President Pak 486DX2/66 VLB

First Venus 486DX2/66 EISA and VL-Bus

First Venus 486DX2/66 VL-Bus

Fountain Technology 486DX/33 VL

Fountain Technology 486DX2/50 VL

Fountain Technology 486DX2/66 EISA/VL

Fountain Technology 486DX2/66 VL

Fountain Technology 486SX/25 VL

Free 586F34X-PCI

Free VESA23X50

Fujitech 486DX/50 E

Fujitech 486DX2/50-VL

Fujitsu® S-400

Fujitsu S-466

Fujitsu S-500

Fujitsu S-5000MP

FUTURE COMPUTERS 486 Eisa/Vesa NTPC

FutureTech 486DX2-66 VLB

Gain TITON WORKSTATION

Gateway 2000 386/33

Gateway 2000 486/33C

Gateway 2000 486/33E

Gateway 2000 486DX2/50

Gateway 2000 486DX2/50E

Gateway 2000 486DX2/50V

Gateway 2000 486DX2/66V Desktop

Gateway 2000 4DX/33

Gateway 2000 4DX2-66P

Gateway 2000 4DX2/66E

Gateway 2000 4SX/25

Gateway 2000 4SX/33V

Gateway 2000 Color Book

Gateway 2000 Nomad 425DXL 6

Gateway 2000 Nomad 450DXL 6

Gateway 2000 P5-60

GCH AEGIS 433

GCH AEGIS 466

GCH EasyData 433HI

GCH EasyData 466HI

GCH EasyDate 466HI VL

GCH EiSYS Ei433DX

GCH EiSYS Ei466DX

Genitech Capricorn JF/33

Genitech Capricorn JF2/66

Genitech Capricorn KF33 PCI

GES DATAMINI MF 486DX-33

GES DATAMINI MF 486DX2-66

GES DATAMINI MF 486SX-25

Getek 486 DX 50 LOCAL BUS

GMX EISAMB 486DX2/66

GoldStar 425SXE

GoldStar GS425SX

GoldStar GS466DX

GoldStar GS466DXE

GRiD® 486ei-25 SVR

GRiD 486ei-33

GRiD APT/425se

GRiD APT/450e

GRiD MFP 425s+

GRiD MFP 433+

GRiD MFP 433s+

GRiD MFP 450+

GRiD MFP 466+

GRiD MFP/420s

GRiD MFP/425s

GRiD MFP/450

GRiD MFP/540

GVH 486DX2 66 Vesa Bus

H.D.Microsystèmes AX7 486 DX-33

H.D.Microsystèmes AX7 486 DX-50

H.D.Microsystèmes AX7 486 DX2-50

H.D.Microsystèmes AX7 486 DX2-66

H.D.Microsystèmes AX7 Pentium PCI

Hancke & Peter 386w Professional

Hancke & Peter 486/33w Professional

Hancke & Peter 486/50w Professional

Hancke & Peter 486/66w Professional

Hancke & Peter 486w EISA Professional

Harris Epoch 486/33 VESA

Harris Epoch 486/50 EISA

Harris Epoch 486/50 ISA

Hauppauge 4860 EISA DX2-66

Hauppauge 486M Local Bus DX2-66

Hertz 486/D50e

Hertz 486/D50Ee

Hertz 486/D66X2e

Hertz 486/D66X2Ee

Hewitt Rand HR486DX-33Ce VESA

Hewlett-Packard® NetServer 4/100 LF

Hewlett-Packard NetServer 4/33 LE

Hewlett-Packard NetServer 4/33 LM

Hewlett-Packard NetServer 4/66 LC

Hewlett-Packard NetServer 4/66 LF

Hewlett-Packard NetServer 4/100 LC

Hewlett-Packard NetServer 4d/66 LE

Hewlett-Packard NetServer 4d/66 LM

Hewlett-Packard NetServer 4s/33 LE

Hewlett-Packard NetServer 5/60 LM

Hewlett-Packard NetServer 5/66 LC

Hewlett-Packard NetServer 5/66 LF

Hewlett-Packard NetServer 5/66 LM

Hewlett-Packard NetServer 5/90 LM

Hewlett-Packard Vectra® 386/25

Hewlett-Packard Vectra 386/33N

Hewlett-Packard Vectra 386/33NI

Hewlett-Packard Vectra 486/25M

Hewlett-Packard Vectra 486/25N

Hewlett-Packard Vectra 486/25NI

Hewlett-Packard Vectra 486/25T

Hewlett-Packard Vectra 486/25U

Hewlett-Packard Vectra 486/33M

Hewlett-Packard Vectra 486/33N

Hewlett-Packard Vectra 486/33NI

Hewlett-Packard Vectra 486/33ST

Hewlett-Packard Vectra 486/33T

Hewlett-Packard Vectra 486/33U

Hewlett-Packard Vectra 486/33XM

Hewlett-Packard Vectra 486/50U

Hewlett-Packard Vectra 486/50XM

Hewlett-Packard Vectra 486/66 XM

Hewlett-Packard Vectra 486/66N

Hewlett-Packard Vectra 486/66ST

Hewlett-Packard Vectra 486/66U

Hewlett-Packard Vectra 486s/20

Hewlett-Packard Vectra 486s/25 MI

Hewlett-Packard Vectra 486s/33M

Hewlett-Packard Vectra 486s/33N

Hewlett-Packard Vectra 486s/33NI

Hewlett-Packard Vectra 486s/33XM

Hewlett-Packard Vectra RS/25C

Hewlett-Packard Vectra XP/60 PC

High Tech USA 486DX266 VLB SYSTEM

High Tech USA 486DX33 VLB SYSTEM

HM Systems Minstrel XPentium

HM Systems Minstrel XPentium Server

HM Systems Minstrel Xpresso 486

HM Systems Minstrel Xpresso XL

Hyundai 425s

Hyundai 433DDV

Hyundai 466d2

Hyundai Prestige 433d

IBM® EduquestTM Model 50 486DX/33 (9605-040)

IBM PC Server 486DX2/66 8640-0N*

IBM PC Server Pentium/60 8640-0P*

IBM PS/1 2133-XXX  486SX2/33MHz

IBM PS/1 2133-xxx 486SX/25

IBM PS/1 2133-xxx 486SX/33

IBM PS/1 2133A-xxx 486DX/33 7

IBM PS/1 2133A-xxx 486DX2/66 7

IBM PS/1 2133A-xxx 486SX/25 7

IBM PS/1 2133A-xxx 486SX/33 7

IBM PS/1 2155-87C (SL-B)

IBM PS/1 2155-xxx 486DX/33

IBM PS/1 2155-xxx 486DX2/50

IBM PS/1 2155-xxx 486DX2/66

IBM PS/1 2155-xxx 486SX/25

IBM PS/1 2155-xxx 486SX/33

IBM PS/1 2155A-xxx 486DX2/66 7

IBM PS/1 2155A-xxx 486SX/25 7

IBM PS/1 2155A-xxx 486SX/33 7

IBM PS/1 2155C-XX

IBM PS/1 2168-xxx 486DX/33

IBM PS/1 2168-xxx 486DX2/50

IBM PS/1 2168-xxx 486DX2/66

IBM PS/1 2168-XXX 486DX2/66MHz

IBM PS/1 2168-xxx 486SX/25

IBM PS/1 2168-xxx 486SX/33

IBM PS/1 2168A-xxx 486DX2/66 7

IBM PS/1 2168A-xxx 486SX/25 7

IBM PS/1 2168A-xxx 486SX/33 7

IBM PS/1 486DX33 - 2133-XX

IBM PS/1 Consultant 486SX/25 2133B-xxx

IBM PS/1 Consultant 486SX/33 2133B-xxx

IBM PS/1 Consultant 486SX/33 2155B-xxx

IBM PS/2 56 486SLC3-xxx

IBM PS/2 56LS 486SLC3-xxx

IBM PS/2 57 486SLC3-xxx

IBM PS/2 M57 486SLC3-xxx

IBM PS/2 Model 50/50Z System Board Upgrade 486SLC2/50 8

IBM PS/2 Model 53 9553-xxx 486SLC2/50 9

IBM PS/2 Model 55/55SX System Board Upgrade 486SX/25 8

IBM PS/2 Model 56 8556-xxx 486SLC/20

IBM PS/2 Model 56 9556-xxx 486SLC2/50

IBM PS/2 Model 57 8557-xxx 486SLC/20

IBM PS/2 Model 57 9557-xxx 486SLC2/50

IBM PS/2 Model 60/80 System Board Upgrade 486DX/33 8

IBM PS/2 Model 70 8570-xxx 386DX/25

IBM PS/2 Model 70 8570-xxx 486DX/25

IBM PS/2 Model 70 System Board Upgrade 486DX/33 8

IBM PS/2 Model 76 9576-xxx 486DX2/66

IBM PS/2 Model 76 9576-xxx 486SX/33

IBM PS/2 Model 76i 9576-xxx 486DX2/50 9

IBM PS/2 Model 76i 9576-xxx 486DX2/66 9

IBM PS/2 Model 76s 9576-xxx 486DX2/50 9

IBM PS/2 Model 76s 9576-xxx 486DX2/66 9

IBM PS/2 Model 77 9577-xxx 486DX2/66

IBM PS/2 Model 77 9577-xxx 486SX/33

IBM PS/2 Model 77i 9577-xxx 486DX2/50 9

IBM PS/2 Model 77i 9577-xxx 486DX2/66 9

IBM PS/2 Model 77s 9577-xxx 486DX2/50 9

IBM PS/2 Model 77s 9577-xxx 486DX2/66 9

IBM PS/2 Model 80 8580-xxx 386DX/25

IBM PS/2 Model 90 XP 486 8590-0H* 486SX/25

IBM PS/2 Model 90 XP 486 8590-0J* 486DX/25

IBM PS/2 Model 90 XP 486 8590-0K* 486DX/33

IBM PS/2 Model 90 XP 486 8590-0L* 486DX2/50

IBM PS/2 Model 90 XP 486 8590-xxx with 486DX2/66 processor upgrade

IBM PS/2 Model 90 XP 486 8590-xxx with Enhanced 486DX/50 processor upgrade

IBM PS/2 Model 90 XP 486 8590-xxx with Enhanced 486DX2/66 processor upgrade

IBM PS/2 Model 90 XP 486 8590-xxx with processor upgrade with Pentium Technology

IBM PS/2 Model 90 XP 486 9590-0L* 486DX2/50

IBM PS/2 Model 90 XP 486 9590-xxx with 486DX2/66 processor upgrade

IBM PS/2 Model 90 XP 486 9590-xxx with Enhanced 486DX/50 processor upgrade

IBM PS/2 Model 90 XP 486 9590-xxx with Enhanced 486DX2/66 processor upgrade

IBM PS/2 Model 90 XP 486 9590-xxx with processor upgrade with Pentium Technology

IBM PS/2 Model 95 XP 486 8595-0H* 486SX/25

IBM PS/2 Model 95 XP 486 8595-0J* 486DX/25

IBM PS/2 Model 95 XP 486 8595-0K* 486DX/33

IBM PS/2 Model 95 XP 486 8595-0L* 486DX2/50

IBM PS/2 Model 95 XP 486 8595-0M* 486DX/50

IBM PS/2 Model 95 XP 486 8595-xxx with 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 8595-xxx with Enhanced 486DX/50 processor upgrade

IBM PS/2 Model 95 XP 486 8595-xxx with Enhanced 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 8595-xxx with processor upgrade withPentium Technology

IBM PS/2 Model 95 XP 486 9595-0L* 486DX2/50

IBM PS/2 Model 95 XP 486 9595-0M* 486DX/50

IBM PS/2 Model 95 XP 486 9595-xxx with 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 9595-xxx with Enhanced 486DX/50 processor upgrade

IBM PS/2 Model 95 XP 486 9595-xxx with Enhanced 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 9595-xxx with processor upgrade with Pentium Technology

IBM PS/2 Model P75 8573-xxx 486DX/33

IBM PS/2 Server 85 433 9585-0K*

IBM PS/2 Server 85 466 9585-0N*

IBM PS/2 Server 85 9585-0X* 486SX/33

IBM PS/2 Server 85 9585-0X* with 486DX2/66 processor upgrade

IBM PS/2 Server 95 466 9595-1N*

IBM PS/2 Server 95 560 9595-0PT

IBM PS/2 Server 95 566 9595-0QT

IBM PS/2 Server 95 Array 466 9595-3N*

IBM PS/2 Server 95 Array 560 9595-3P*

IBM PS/2 Server 95 Array 566 9595-3Q*

IBM PS/2 UltimediaTM DV M57 9557-xxx 486SLC2/50

IBM PS/2 Ultimedia M57 8557-xxx 486SLC/20

IBM PS/2 Ultimedia M57 9557-xxx 486SLC2/50

IBM PS/2 Ultimedia M77 9577-xxx 486DX2/66

IBM PS/2 Ultimedia M77 9577-xxx 486SX/33

IBM PS/ValuePoint 425SX/D 6384-Fxx

IBM PS/ValuePoint 425SX/S 6382-Fxx

IBM PS/ValuePoint 433DX/D 6384-Mxx

IBM PS/ValuePoint 433DX/S 6382-Mxx

IBM PS/ValuePoint 433DX/T 6387-Mxx

IBM PS/ValuePoint 433SX/D 6384-Kxx

IBM PS/ValuePoint 433SX/S 6382-Kxx

IBM PS/ValuePoint 466DX2/D 6384-Wxx

IBM PS/ValuePoint 466DX2/T 6387-Wxx

IBM ThinkPad® 300 10

IBM Thinkpad 360 10,11

IBM ThinkPad 700C 6,10

IBM ThinkPad 720C 6,10

IBM ThinkPad 750 10,11

IBM ThinkPad 750c 10,11

IBM Thinkpad 755 10,11

ICL ErgoPRO C4/33

ICL ErgoPRO D4/25

ICL ErgoPRO D4/33d

ICL ErgoPRO D4/66d XG

ICL ErgoPRO D5/60

ICL ErgoPRO E4/66d

ICL System Platform CXe486/66

ICL System Platform CXe486i

ICL System Platform CXe486s

ICL System Platform FX486/33

ICL System Platform FX486/50

ICL System Platform FX486/66

ICL ValuePlus MDTM/33

ICL ValuePlus MD/50

ICL ValuePlus MD/66

Image® 486DX/50 EISA

Image 486DX2/66 VESA

Index INDEXPORT 486 OVD 66 LOCAL BUS CACHE

Index INDEXPORT 486/33

Index INDEXPORT 486/33 VL VESA CACHE

Index INDEXPORT 486/50 I® CACHE

Index INDEXPORT 486/50 VL VESA CACHE

Inelco INTEL® XPRESS 50MHZ

Innovax Aurora 486DX/33

Insight 66 MHz EISA/VESA 486DX2

Insight 66 MHz ISA/VESA 486DX2

Intel Classic® R-Series

Intel Classic/PCI Expandable Desktop

Intel Entrada OEM Platform

Intel L486 Series Professional Workstation

Intel L486-Series/Professional GX

Intel Ninja DX2-66 OEM Platform

Intel Premiere/PCI Baby AT

Intel Premiere/PCI LPX

Intel X486/50E

Intel Xpress 486

Intel Xpress/MX 66Mhz Pentium

Intelicom 486DX/33 EISA

Intelicom 486DX/33 ISA

Intelicom 486DX/33 VESA EISA

Intelicom 486DX/33 VLB

Intelicom 486DX/50 EISA

Intelicom 486DX/50 ISA

Intelicom 486DX/50 VESA EISA

Intelicom 486DX/50 VLB

Intelicom 486DX2/50 EISA

Intelicom 486DX2/50 ISA

Intelicom 486DX2/50 VESA EISA

Intelicom 486DX2/50 VLB

Intelicom 486DX2/66 EISA

Intelicom 486DX2/66 ISA

Intelicom 486DX2/66 VESA EISA

Intelicom 486DX2/66 VLB

Intelicom 486SX/25 ISA

Intelicom 486SX/25 VLB

Intelicom 486SX/33 ISA

INTERCOMP Digit 486SLC/25

INTERCOMP Entry 486/33

INTERCOMP Master 486DX/50

INTERCOMP Planet 486/50 EISA

INTERCOMP Planet 486DX2/66 EISA

INTERCOMP Planet LC 486/33 EISA

INTERCOMP Target 486/33

INTERCOMP Target 486/50 VLB

INTERCOMP Target 486DX/50

Interface Electronic 486DX2/66

Intergraph® PC 433

Intergraph PC 466

Intergraph Technical Desktop 1220

Intergraph Technical Desktop 2

International Data DGI 486DX-66

International Data DGI ISA O/D 20

International Instrumentation  BLUE MAX PENTIUM P5-60

International Instrumentation  BLUE MAX PENTIUM P-60 PCI

International Instrumentation BLUE MAX 486 DX2 66

International Instrumentation BLUE MAX 486 DX33

International Instrumentation BLUE MAX 486 DX66 PCI

Investronica INVES BS-486

Investronica INVES BS-486 VL

Investronica INVES IFS-486

Investronica INVES IFS-900

Investronica INVES MP-900 XM UniProcessor

Investronica INVES WS-900 EVL

Investronica INVES WS-900 VL

IPC DYNASTY G-PC 486DX-33CV

IPC DYNASTY G-PC 486DX2-50CV

IPC DYNASTY G-PC 486DX2-66CV

IPC DYNASTY G-PC 486SX-25CV

IPC DYNASTY HE (GREEN) 486DX-33

IPC DYNASTY HE (GREEN) 486DX2-50

IPC DYNASTY HE (GREEN) 486DX2-66

IPC DYNASTY HE (GREEN) 486SX-25

IPC DYNASTY HE (GREEN) 486SX-33

IPC DYNASTY HE 486DX-33

IPC DYNASTY HE 486DX-33C

IPC DYNASTY HE 486DX2-50

IPC DYNASTY HE 486DX2-50C

IPC DYNASTY HE 486DX2-66

IPC DYNASTY HE 486DX2-66C

IPC DYNASTY HE 486SX-25

IPC DYNASTY HE 486SX-25C

IPC DYNASTY HE 486SX-33

IPC DYNASTY LE 486DX-33 (incl. 33C)

IPC DYNASTY LE 486DX2-50 (incl. 50C)

IPC DYNASTY LE 486DX2-66 (incl. 66C)

IPC DYNASTY LE 486SX-25 (incl. 25C)

IPC DYNASTY S-PC 586DX-60CV

IPC DYNASTY SE 486DX-33C

IPC DYNASTY SE 486DX2-50C

IPC DYNASTY SE 486DX2-66C

IPC DYNASTY SE 486SX-25C

IPC DYNASTY SE PENTIUM-60

IPC DYNASTY SEL PENTIUM-60

IPC VALUEMAGIC 486DX-33

IPC VALUEMAGIC 486DX2-50

IPC VALUEMAGIC 486DX2-66

IPC VALUEMAGIC 486SX-25

IPC VALUEMAGIC 486SX-33

Ipex 486DX2-66 Centra 1000

Ipex 486DX2-66 Centra 1000 EISA

Ipex 486DX2-66 Centra 1000 EISA (Entry Level)

Ipex 486DX2-66 Centra 1000 EISA/VL-BUS

Ipex 486DX2-66 Centra 1000 ISA/VESA

Ipex 486DX2-66 Centra 1000 VESA

Ipex 486DX2-66 Centra 2000

Ipex 486DX2-66 Centra 2000 EISA

Ipex 486DX2-66 Centra 2000 EISA (Entry Level)

Ipex 486DX2-66 Centra 2000 EISA/VL-BUS

Ipex 486DX2-66 Centra 2000 ISA/VESA

Ipex 486DX2-66 Centra 2000 VESA

Ipex 486DX2-66 Centra 5000 ISA/VESA

Ipex 486DX2-66 Desktop

Ipex 486DX2-66 Desktop (EISA)

Ipex 486DX2-66 Desktop EISA (Entry Level)

Ipex 486DX2-66 Desktop EISA/VL-BUS

Ipex 486DX2-66 Desktop VESA

Ipex 486DX2-66 Green Mini Tower ISA/VESA

Ipex 486DX2-66 Green Ulti-mate ISA/VESA

Ipex 486DX2-66 Mini Tower

Ipex 486DX2-66 Mini Tower EISA

Ipex 486DX2-66 Mini Tower EISA(Entry Level)

Ipex 486DX2-66 Mini Tower EISA/VL-BUS

Ipex 486DX2-66 Mini Tower VESA

Ipex 486DX2-66 Slimline

Ipex 486DX2-66 Slimline (WD Form Factor)

Ipex 486DX2-66 Slimline ISA/VESA

Ipex 486DX2/66 Green Desk Top ISA/VESA

Ipex 486DX33 Centra 1000

Ipex 486DX33 Centra 1000 EISA

Ipex 486DX33 Centra 1000 EISA (Entry Level)

Ipex 486DX33 Centra 1000 EISA/VL-BUS

Ipex 486DX33 Centra 1000 VESA

Ipex 486DX33 Centra 2000

Ipex 486DX33 Centra 2000 EISA

Ipex 486DX33 Centra 2000 EISA (Entry Level)

Ipex 486DX33 Centra 2000 EISA/VL-BUS

Ipex 486DX33 Centra 2000 VESA

Ipex 486DX33 Desktop

Ipex 486DX33 Desktop EISA

Ipex 486DX33 Desktop EISA (Entry Level)

Ipex 486DX33 Desktop EISA/VL-BUS

Ipex 486DX33 Desktop VESA

Ipex 486DX33 Green Centra 1000 ISA/VESA

Ipex 486DX33 Green Centra 2000 ISA/VESA

Ipex 486DX33 Green Centra 5000 ISA/VESA

Ipex 486DX33 Green Desk Top ISA/VESA

Ipex 486DX33 Green Mini Tower ISA/VESA

Ipex 486DX33 Green Slimline ISA/VESA

Ipex 486DX33 Green Ulti-mate ISA/VESA

Ipex 486DX33 Mini Tower

Ipex 486DX33 Mini Tower EISA

Ipex 486DX33 Mini Tower EISA (Entry Level)

Ipex 486DX33 Mini Tower EISA/VL-BUS

Ipex 486DX33 Mini Tower VESA

Ipex 486DX33 Slimline

Ipex 486DX33 Slimline (WD Form Factor)

Ipex 486DX50 Centra 1000

Ipex 486DX50 Centra 1000 EISA

Ipex 486DX50 Centra 1000 EISA (Entry Level)

Ipex 486DX50 Centra 1000 EISA/VL-BUS

Ipex 486DX50 Centra 1000 VESA

Ipex 486DX50 Centra 2000

Ipex 486DX50 Centra 2000 EISA

Ipex 486DX50 Centra 2000 EISA (Entry Level)

Ipex 486DX50 Centra 2000 EISA/VL-BUS

Ipex 486DX50 Centra 2000 VESA

Ipex 486DX50 Desktop

Ipex 486DX50 Desktop EISA

Ipex 486DX50 Desktop EISA (Entry Level)

Ipex 486DX50 Desktop EISA/VL-BUS

Ipex 486DX50 Desktop VESA

Ipex 486DX50 Mini Tower

Ipex 486DX50 Mini Tower EISA

Ipex 486DX50 Mini Tower EISA (Entry Level)

Ipex 486DX50 Mini Tower EISA/VL-BUS

Ipex 486DX50 Mini Tower VESA

Ipex 486DX50 Slimline

Ipex 486DX50 Slimline (WD Form Factor)

Ipex 486SX25 Centra 1000

Ipex 486SX25 Centra 1000 EISA

Ipex 486SX25 Centra 1000 EISA (Entry Level)

Ipex 486SX25 Centra 1000 EISA/VL-BUS

Ipex 486SX25 Centra 1000 VESA

Ipex 486SX25 Centra 2000

Ipex 486SX25 Centra 2000 EISA

Ipex 486SX25 Centra 2000 EISA (Entry Level)

Ipex 486SX25 Centra 2000 EISA/VL-BUS

Ipex 486SX25 Centra 2000 VESA

Ipex 486SX25 Desktop

Ipex 486SX25 Desktop EISA

Ipex 486SX25 Desktop EISA (Entry Level)

Ipex 486SX25 Desktop EISA/VL-BUS

Ipex 486SX25 Desktop VESA

Ipex 486SX25 Mini Tower

Ipex 486SX25 Mini Tower (EISA)

Ipex 486SX25 Mini Tower EISA (Entry Level)

Ipex 486SX25 Mini Tower EISA/VL-BUS

Ipex 486SX25 Mini Tower VESA

Ipex 486SX25 Slimline

Ipex 486SX25 Slimline (WD Form Factor)

Ipex 486SX33 Centra 1000 EISA

Ipex 486SX33 Centra 1000 EISA (Entry Level)

Ipex 486SX33 Centra 1000 EISA/VL-BUS

Ipex 486SX33 Centra 1000 ISA

Ipex 486SX33 Centra 1000 VESA

Ipex 486SX33 Centra 2000 EISA

Ipex 486SX33 Centra 2000 EISA (Entry Level)

Ipex 486SX33 Centra 2000 EISA/VL-BUS

Ipex 486SX33 Centra 2000 ISA

Ipex 486SX33 Centra 2000 VESA

Ipex 486SX33 Desktop

Ipex 486SX33 Desktop EISA

Ipex 486SX33 Desktop EISA (Entry Level)

Ipex 486SX33 Desktop EISA/VL-BUS

Ipex 486SX33 Desktop VESA

Ipex 486SX33 Mini Tower EISA

Ipex 486SX33 Mini Tower EISA (Entry Level)

Ipex 486SX33 Mini Tower EISA/VL-BUS

Ipex 486SX33 Mini Tower ISA

Ipex 486SX33 Mini Tower VESA

Ipex 486SX33 Slimline

Ipex 486SX33 Slimline (WD Form Factor)

Ipex Pentium/60 Centra 1000 EISA/PCI

Ipex Pentium/60 Centra 1000 ISA/PCI

Ipex Pentium/60 Centra 1000 ISA/VESA

Ipex Pentium/60 Centra 2000 EISA/PCI

Ipex Pentium/60 Centra 2000 ISA/PCI

Ipex Pentium/60 Centra 2000 ISA/VESA

Ipex Pentium/60 Centra 5000 EISA/PCI

Ipex Pentium/60 Centra 5000 ISA/PCI

Ipex Pentium/60 Centra 5000 ISA/VESA

Ipex Pentium/60 Desk Top EISA/PCI

Ipex Pentium/60 Desk Top ISA/PCI

Ipex Pentium/60 Desk Top ISA/VESA

Ipex Pentium/60 Mini Tower EISA/PCI

Ipex Pentium/60 Mini Tower ISA/PCI

Ipex Pentium/60 Mini Tower ISA/VESA

Ipex Pentium/60 Slimline 1000 EISA/PCI

Ipex Pentium/60 Slimline ISA/PCI

Ipex Pentium/60 Slimline ISA/VESA

Ipex Pentium/60 Ulti-mate EISA/PCI

Ipex Pentium/60 Ulti-mate ISA/PCI

Ipex Pentium/60 Ulti-mate ISA/VESA

Ipex Pentium/66 Centra 1000 EISA/PCI

Ipex Pentium/66 Centra 1000 ISA/PCI

Ipex Pentium/66 Centra 1000 ISA/VESA

Ipex Pentium/66 Centra 2000 EISA/PCI

Ipex Pentium/66 Centra 2000 ISA/PCI

Ipex Pentium/66 Centra 2000 ISA/VESA

Ipex Pentium/66 Centra 5000 EISA/PCI

Ipex Pentium/66 Centra 5000 ISA/PCI

Ipex Pentium/66 Centra 5000 ISA/VESA

Ipex Pentium/66 Desk Top EISA/PCI

Ipex Pentium/66 Desk Top ISA/PCI

Ipex Pentium/66 Desk Top ISA/VESA

Ipex Pentium/66 Mini Tower EISA/PCI

Ipex Pentium/66 Mini Tower ISA/PCI

Ipex Pentium/66 Mini Tower ISA/VESA

Ipex Pentium/66 Slimline EISA/PCI

Ipex Pentium/66 Slimline ISA/PCI

Ipex Pentium/66 Slimline ISA/VESA

Ipex Pentium/66 Ulti-mate EISA/PCI

Ipex Pentium/66 Ulti-mate ISA/PCI

Ipex Pentium/66 Ulti-mate ISA/VESA

ITG NT 486DX-50 ISA

ITOS KT 486/33

ITOS MT 386DX/40

JAI PC 845-66-32VL

JDR C486-50

JDR V486-33

JDR V486-66

JDR V486SX-33

KT Technology KT386DX-33

KT Technology KT386DX-40

KT Technology KT486DX-33

KT Technology KT486DX-50

KT Technology KT486DX2-50 VESA

KT Technology KT486DX2-66 VESA LB

L.E.M. Technologies Sys38640/M

LABTAM 486/66-2 VLB

LANIX BRAIN 486DX2-66

LANIX LIM 486SLC2-66

LANIX MART 486DLC-40

LANIX MART 486DX-33

LANIX MART 486DX2-66

LASER 386 Ultra Slim

LASER 486DX/3 Desktop

LASER 486DX/3 Desktop (w/LBVGA)

LASER 486DX/3 Desktop (w/VLBUS)

LASER 486DX/3 Mini (w/VLBUS)

LASER 486DX/3 Tower

LASER 486DX/3 Tower (w/VLBUS)

LASER 486DX2/4 Desktop

LASER 486DX2/4 Desktop (w/LBVGA)

LASER 486DX2/4 Desktop (w/VLBUS)

LASER 486DX2/4 Tower

LASER 486DX2/4 Tower (w/VLBUS)

LASER 486DX2/6 Desktop

LASER 486DX2/6 Desktop (w/LBVGA)

LASER 486DX2/6 Desktop (w/VLBUS)

LASER 486DX2/6 Mini (w/VLBUS)

LASER 486DX2/6 Tower

LASER 486DX2/6 Tower (w/VLBUS)

LASER 486SX/3 Desktop

LASER 486SX/3 Desktop (w/LBVGA)

LASER 486SX/3 Desktop w/VLBUS

LASER 486SX/3 Tower

LASER 486SX/3 Ultra Slim

LASER 486SX/3 Ultra Slim (w/LBVGA)

LASER 486SX/4 Desktop

LASER 486SX/4 Desktop (w/LBVGA)

LASER 486SX/4 Desktop (w/VLBUS)

LASER 486SX/4 Mini (w/VLBUS)

LASER 486SX/4 Tower

LASER 486SX/4 Ultra Slim

LASER 486SX/4 Ultra Slim (w/LBVGA)

LASER LT322 Notebook

LASER LT421 Notebook

LASER LT432 Notebook

LASER LT433

LASER LT433C Color Notebook

LASER Platinum 466M

LASER Platinum 560M Pentium

LASER Platinum SMP

Leading Edge® D4/DX-33 Plus DeskTop

Leading Edge D4/DX-50 Plus DeskTop

Leading Edge D4/DX2-50 Plus DeskTop

Leading Edge D4/MTDX-33 MiniTower

Leading Edge D4/MTDX-50 MiniTower

Leading Edge D4/MTDX2-50 MiniTower

Leading Edge D4/MTDX2-66 MiniTower

Leading Edge D4/MTSX-25 MiniTower

Leading Edge D4/MTSX-33 MiniTower

Leading Edge D4/SX-25 Plus DeskTop

Leading Edge D4/SX-33 Plus DeskTop

Leading Edge WinProTM 486/SLC33

Leading Edge WinPro 486/SX-25

Leading Edge WinPro 486e/DX-33

Leading Edge WinPro 486e/DX-33(VL)

Leading Edge WinPro 486e/DX-50

Leading Edge WinPro 486e/DX2-50

Leading Edge WinPro 486e/DX2-50(VL)

Leading Edge WinPro 486e/DX2-66

Leading Edge WinPro 486e/DX2-66(VL)

Leading Edge WinPro 486e/SX-25

Leading Edge WinPro 486e/SX-25(VL)

Leading Edge WinPro 486e/SX-33

Leading Edge WinPro 486e/SX-33(VL)

Leading Edge WinTower 486 DX-33

Leading Edge WinTower 486 DX2-50

Leading Edge WinTower 486 DX2-66

Leading Edge WinTower 486 SX-25

Leading Edge WinTower SX-33

Legacy 486DLC-33 SYSTEM

Legacy VLB 486DX-33

Lightning Power EISA

Lightning VLB Pak

Lucky Star System w/ Cyrix 486S-33

Lundin 400 Series 486 EISA w/ 486DX/50

Lundin 400 Series 486 ISA w/ 486DX/33

Lundin 400 Series 486 VESA w/ 486DX/33

Magitronic G-MD433L-170-4M

Magitronic G-MD440G-130-4M

Magitronic G-MD466L-210-4M

Magitronic G-MS466L-10-16M

Master Cascade 386-40 Small Desktop

Master Cascade 486-33 Mini-Tower

Maximus 486-50MHz Maxi-CAD

Maximus Cyrix 486/40 VESA Local Bus

MetaTech 486DX/33 ISA

MetaTech 486DX/33 VESA

MetaTech 486DX/50 EISA

Metro Computers 486Dx - 33

Micro Arts EISA Pro

Micro Arts Power Pro Stealth

Micro Arts Power Pro Vesa

Micro Assistance Group MAG NT 4000

Micro Express ME 486DX2/66

Microbyte Lyrebird Model 451

Microbyte Lyrebird Model 455

Microbyte Lyrebird Model 457

Micron 4100 Magnum

Micron 486PCI WINSTATION CD

Micron 486VL Magnum 433 DX

Micron 486VL Magnum 433 SX

Micron 486VL Magnum 450 DX2

Micron 486VL Magnum 466 DX2

Micron 486VL MagServer 433 DX

Micron 486VL MagServer 450 DX2

Micron 486VL MagServer 466 DX2

Micron 486VL PowerStationTM 433 DX

Micron 486VL PowerStation 433 SX

Micron 486VL PowerStation 450 DX2

Micron 486VL PowerStation 466 DX2

Micron 486VL ValueLine 466 DX2

Micron 486VL WinServer 433 DX

Micron 486VL WinServer 450 DX2

Micron 486VL WinServer 466 DX2

Micron 486VL WinStation 433 DX

Micron 486VL WinStation 433 SX

Micron 486VL WinStation 450 DX2

Micron 486VL WinStation 466 DX2

Micron P5PCI Platinum® CD

Micron P5PCI PowerStation CD

Microniche MIS Computer Systems M466EV

Microniche MIS Computer Systems M466VL

Microtec MF486 EISA/66MHz

Microtech MTECH GX4-D250

Microtech MTECH GX4-D266

Microtech MTECH GX4-D33

Microtech MTECH GX4-S33

Microtech MTECH VI7-P560

Midgards Micro ISA 486DX-33

Midgards Micro VESA 486DX-33

Midwest Micro 486DX2/50 Vesa/ISA

MIKROLOG OY Osborne 4280G-66

MIKROLOG OY Osborne IX5-60E

MIKROLOG OY Osborne LP4D-33

MIKROLOG OY Osborne LP4D-33CLB

MIKROLOG OY Osborne LP4D-33N

MIKROLOG OY Osborne LP4D-50

MIKROLOG OY Osborne LP4D-50C

MIKROLOG OY Osborne LP4D-50CLB

MIKROLOG OY Osborne LP4D-50N

MIKROLOG OY Osborne LP4D-66

MIKROLOG OY Osborne LP4D-66CLB

MIKROLOG OY Osborne LP4D-66N

MIKROLOG OY Osborne LP4S-25

MIKROLOG OY Osborne LP4S-25N

MIKROLOG OY Osborne LP4S-33CLB

MIKROLOG OY Osborne LP4S-33N

MIKROLOG OY Osborne MT4D-33CLB

MIKROLOG OY Osborne MT4D-33N

MIKROLOG OY Osborne MT4D-50CLB

MIKROLOG OY Osborne MT4D-50N

MIKROLOG OY Osborne MT4D-66CLB

MIKROLOG OY Osborne MT4D-66N

MIKROLOG OY Osborne MT4S-25N

MIKROLOG OY Osborne MT4S-33CLB

MIKROLOG OY Osborne MT4S-33N

MIND 386DX/33 ISA

MIND 486DX/33 EISA

MIND 486DX/33 ISA

MIND 486DX/33 VLB

MIND 486DX/50 EISA

MIND 486DX/50 ISA

MIND 486DX2/50 EISA

MIND 486DX2/50 ISA

MIND 486DX2/50 VLB

MIND 486DX2/66 EISA

MIND 486DX2/66 ISA

MIND 486DX2/66 VLB

MIND 486SX/25 EISA

MIND 486SX/25 ISA

MIND 486SX/33 EISA

MIND 486SX/33 ISA

MIND 486SX/33 VLB

MIND Pentium/60 VLB

Minitronics MINTEC 486DX-33

MiTAC DM4066

Modular MST/200

Monydata Entry 486 / 33

Monydata Modula 200 / 80

Monydata Station 486 / 80

Multitech ProSpec 486DX-50 PS450DE-ST

Mustek BROTHER® BCM3486DX2-VL

Mustek BROTHER BCM4486DX-VL

Mustek MECER3486-VL

Mustek MECER7486-VL

MYNIX MYCOMP 486/66VLG

National InstrumentsTM VXIpc-486 Model 200

National Instruments VXIpc-486 Model 500

National Microcomputers Power System DX2-66

NCR® StarStation

NCR System 3000 Model 3230

NCR System 3000 Model 3314

NCR System 3000 Model 3330

NCR System 3000 Model 3333

NCR System 3000 Model 3335

NCR System 3000 Model 3345

NCR System 3000 Model 3350

NCR System 3000 Model 3355

NCR System 3000 Model 3410

NCR System 3000 Model 3445

NCR System 3000 Model 3447

NEC® Express II

NEC Express/II 433 ST

NEC Express/II 466 ST

NEC Express/II P601 LT

NEC Image 425

NEC Image 433

NEC Image 433ES

NEC Image 466

NEC Image 466es

NEC Image P60

NEC PowerMate 386/25S

NEC PowerMate 425

NEC PowerMate 425es

NEC PowerMate 433

NEC PowerMate 433es

NEC PowerMate 466

NEC PowerMate 466es

NEC PowerMate 486/33e

NEC PowerMate 486/33i

NEC PowerMate 486/50e

NEC PowerMate 486/50i

NEC PowerMate 486sx/25e

NEC PowerMate DX2/66e

NEC UltraLiteTM Versa

NETiS 386DX/40 ISA

NETiS 486DX/33 ISA

NETiS 486DX/33 VL

NETiS 486DX/33 VL EISA

NETiS 486DX/50 VL

NETiS 486DX/50 VL EISA

NETiS 486DX2/50 VL EISA

NETiS 486DX2/66 ISA

NETiS 486DX2/66 VL

NETiS 486DX2/66 VL EISA

NETiS 486SX/33 VL

NETiS Ultra 486DX/33 ISA

NETiS Ultra 486DX/50 ISA

NETiS Ultra 486DX2/66 ISA

NETiS Ultra 486DX2/66 VL

NETiS Ultra 486SX/25 ISA

NETiS Ultra N433VL

NETiS Ultra N450VL

Network Connection M2

Network Connection T-3000

Network Connection T-4000

Network Connection TNX

Network Connection Triumph® T.R.A.C.

Network Connection Triumph T.S.C.V

Nimrod 486 DESKTOP VESA

Nimrod 486 LC-DESKTOP VESA

Nimrod 486 MINI-TOWER VESA

Nimrod 486 TOWER VESA

Nimrod DESKTOP 486DX/33 VESA VL

Nimrod DESKTOP 486DX2/66 ISA

Nimrod LC-DESKTOP 486DX/33 VESA VL

Nimrod LC-DESKTOP 486DX2/66 ISA

Nimrod MINI-TOWER 486DX/33 VESA VL

Nimrod MINI-TOWER 486DX2/66 ISA

Nimrod TOWER 486DX/33 VESA VL

Nimrod TOWER 486DX2/66 ISA

NIX PCs 486DX2/66 Vesa

NORTH-EAST NE Micro 433LV

NORTH-EAST NE Micro 450LV

NORTH-EAST NE Micro 466LV

Northern Micro NM486/66VL

Northgate® 486/33

Northgate 486/33 Slimline ZXP

Northgate 486/33 VESA ISA

Northgate 486/33e Baby AT

Northgate Elegance 333

Northgate Elegance 425i

Northgate Elegance 433e

Northgate Elegance 433i

Northgate Elegance SP 386/33

Northgate Elegance SP 433

Northgate Elegance ZXP

Northwest Micro Signature I 4/33

Northwest Micro Signature II 4/33 VLB

OKI if 486VX550D

OKI if Server 466/SL

OKI if Station 425/DL

OKI if Station 433/DE

Olidata P/60

Olivetti® LSX5010

Olivetti LSX5015

Olivetti LSX5020

Olivetti LSX5025

Olivetti LSX5025 E

Olivetti M300-28

Olivetti M300-30

Olivetti M300-30P

Olivetti M380-40

Olivetti M4-40

Olivetti M4-46

Olivetti M4-60

Olivetti M4-62

Olivetti M4-64

Olivetti M4-65

Olivetti M4-66

Olivetti M4-82

Olivetti M400-10

Olivetti M400-40

Olivetti M400-60

Olivetti M480-10

Olivetti M480-20

Olivetti M480-40

Olivetti M6-400

Olivetti M6-420

Olivetti M6-440

Olivetti M6-450

Olivetti M6-460

Olivetti M6-520

Olivetti M6-540

Olivetti M6-560

Olivetti M6-620

Olivetti M6-850

Olivetti M6-860

Olivetti M6-880

Olivetti SNX 140 Systema

Olympia Olystar 300D-33

Olympia Olystar 400D-33

Olympia Olystar 400D-33 EISA

Olympia Olystar 400D-50

Olympia Olystar 400D-66

Olympia Olystar 400D-66 EISA

Olympia Olystar 400S-25

Olympia Olystar 400S-33SL

Omni Tech 8600 486DX2-66

Omni Tech 9600 486DX2-66

Optima OCT 486DX250 EISA

Optima OCT 486DX266 EISA

Optima OCT 486DX266 VL

Optima OCT 486DX33 EISA

Optima OCT 486DX33 VL

Optima OCT 486DX50 EISA

Optima OCT 486DX50 VL

Optima OCT 486SX25 EISA

Optima OCT 486SX25 VL

Optima OCT DX2-50 VL

Optima SPRINTER 486DX250 EISA

Optima SPRINTER 486SX25 EISA

Optimus 486DX/50 EISA

Optimus 486DX/50 LocalBus

Optimus 486DX2-50 VLB

Optimus 486DX2-66 EISA

Optimus 486DX2-66 VLB

Optimus 486DX2/66

Optimus 486SX/25 VL

Optimus Lan Server LX

OPUS Pentium/60Mhz

OPUS Premier 4D-50

Osborne EISA 486DX50 Fileserver

Osborne Mpower 486DX2-66

Osborne Mpower3 486DX33

Osborne Mpower3 486SX33

Osborne Mpower4 486DX33

Osborne Mpower4 486SX33

Osborne Pentium

Osborne VESA 486DX2-66

Osicom 4133L 486/DX266 VESA LB

Osicom 4133L 486/DX33 VESA LB

Packard Bell 1110

Packard Bell 1120

Packard Bell 1150

Packard Bell 2050

Packard Bell 400T

Packard Bell 470

Packard Bell 485

Packard Bell 486CDM

Packard Bell 486DX/33

Packard Bell 486SX/25

Packard Bell 495

Packard Bell 515E

Packard Bell 525E

Packard Bell 545E

Packard Bell 550

Packard Bell 560

Packard Bell 565E

Packard Bell AXCEL 1033

Packard Bell AXCEL 105

Packard Bell AXCEL 1066

Packard Bell AXCEL 130

Packard Bell AXCEL 2005

Packard Bell AXCEL 2015

Packard Bell AXCEL 2033

Packard Bell AXCEL 205

Packard Bell AXCEL 2066 MINITOWER

Packard Bell AXCEL 230

Packard Bell AXCEL 405 (incl. H model)

Packard Bell AXCEL 410

Packard Bell AXCEL 410E (incl. H, F and W G models)

Packard Bell AXCEL 420

Packard Bell AXCEL 450G (incl. H, J and TJ models)

Packard Bell AXCEL 460

Packard Bell AXCEL 460H (incl. TJ model)

Packard Bell AXCEL 486/33

Packard Bell AXCEL 486A66

Packard Bell AXCEL 486SX

Packard Bell AXCEL 530

Packard Bell AXCEL 533H (incl. J and TJ models)

Packard Bell AXCEL 533STJ

Packard Bell AXCEL 550

Packard Bell AXCEL 550MT/J

Packard Bell AXCEL 570

Packard Bell AXCEL 630 MINITOWER

Packard Bell AXCEL 666J (incl. TJ and TL models)

Packard Bell AXCEL 850

Packard Bell EXECUTIVE 486/33 (incl. ELITE model)

Packard Bell EXECUTIVE 486/33 G (incl. J model)

Packard Bell EXECUTIVE 486DX2/JW (incl. TY model)

Packard Bell EXECUTIVE 486SX (incl. -2F and -G models)

Packard Bell EXECUTIVE 486SX ELITE (incl. SERIES SI model)

Packard Bell EXECUTIVE 486SX-EC

Packard Bell EXECUTIVE 486SX/FW (incl. /HW model)

Packard Bell EXECUTIVE 486SX250

Packard Bell EXECUTIVE 486XE (incl. C and S models)

Packard Bell EXECUTIVE Elite Series 486SXCC

Packard Bell FORCE 1066

Packard Bell FORCE 107

Packard Bell FORCE 110

Packard Bell FORCE 1135

Packard Bell FORCE 1137

Packard Bell FORCE 117

Packard Bell FORCE 200

Packard Bell FORCE 2010

Packard Bell FORCE 2020

Packard Bell FORCE 2040 MINITOWER

Packard Bell FORCE 2233 MINITOWER

Packard Bell FORCE 2376 (incl. F model)

Packard Bell FORCE 2386 MINITOWER

Packard Bell FORCE 250

Packard Bell FORCE 405

Packard Bell FORCE 425

Packard Bell FORCE 486 SX (incl. E, -M1, and -M130 models)

Packard Bell FORCE 486/25

Packard Bell FORCE 486/33 (incl. +, E, -M1, and -M210 models)

Packard Bell FORCE 486/33G (incl. J, JW, and PLUS models)

Packard Bell FORCE 48625 (incl. EX model)

Packard Bell FORCE 486CDM-1/TV

Packard Bell FORCE 486DX/DJ-W (incl. G-W, H, H2, J and JT-W models)

Packard Bell FORCE 486DX2 -WG

Packard Bell FORCE 486DX2/EJT (incl. W model)

Packard Bell FORCE 486DX2/F JT (incl. JT-W, J-W  and LT-W models)

Packard Bell FORCE 486DX2/G-W

Packard Bell FORCE 486MT50J

Packard Bell FORCE 486SX (incl. /20, /20G, E, M1, and M130 models)

Packard Bell FORCE 486SX-WG

Packard Bell FORCE 486SX/25 (incl. G and W models)

Packard Bell FORCE 486SX/BE (incl. FW, FW-2, M, MM and H2 models)

Packard Bell FORCE 486SX/OH-W

Packard Bell FORCE 515

Packard Bell FORCE 515S (incl. PLUS model)

Packard Bell FORCE 525 (incl. B and S models)

Packard Bell FORCE 545 (incl. B and S models)

Packard Bell FORCE 565 (incl. S model)

Packard Bell FORCE 600 (incl. B and S models)

Packard Bell FORCE 715 MINITOWER

Packard Bell FORCE T66

Packard Bell LEGEND 102H (incl. ELITE model)

Packard Bell LEGEND 1066 WG ELITE

Packard Bell LEGEND 1133

Packard Bell LEGEND 1134 ELITE

Packard Bell LEGEND 1135

Packard Bell LEGEND 1136

Packard Bell LEGEND 115

Packard Bell LEGEND 1166

Packard Bell LEGEND 1176

Packard Bell LEGEND 120

Packard Bell LEGEND 125

Packard Bell LEGEND 126 ELITE

Packard Bell LEGEND 127

Packard Bell LEGEND 128

Packard Bell LEGEND 135 (incl. H model)

Packard Bell LEGEND 140

Packard Bell LEGEND 1900

Packard Bell LEGEND 1910

Packard Bell LEGEND 2000

Packard Bell LEGEND 2001

Packard Bell LEGEND 2002 ELITE

Packard Bell LEGEND 2011 SUPREME

Packard Bell LEGEND 2025

Packard Bell LEGEND 207

Packard Bell LEGEND 2133 MINITOWER

Packard Bell LEGEND 2135 MINITOWER

Packard Bell LEGEND 2176 ELITE MT

Packard Bell LEGEND 2266 MINITOWER

Packard Bell LEGEND 2270 MINITOWER

Packard Bell LEGEND 2276 MINITOWER

Packard Bell LEGEND 2300 MINITOWER

Packard Bell LEGEND 233

Packard Bell LEGEND 234 ELITE

Packard Bell LEGEND 245

Packard Bell LEGEND 33T SUPREME

Packard Bell LEGEND 33T SUPREME MINITOWER

Packard Bell LEGEND 430 G (incl. WG and F models)

Packard Bell LEGEND 430 WG ELITE

Packard Bell LEGEND 430E (incl. E2 and EL models)

Packard Bell LEGEND 435E ELITE (incl. 2 ELITE model)

Packard Bell LEGEND 440G

Packard Bell LEGEND 445 G ELITE (incl. G 2 ELITE model)

Packard Bell LEGEND 486CDM-1/TV

Packard Bell LEGEND 486T/50

Packard Bell LEGEND 510H

Packard Bell LEGEND 605H ELITE

Packard Bell LEGEND 625

Packard Bell LEGEND 635J

Packard Bell LEGEND 635TJ ELITE

Packard Bell LEGEND 660 (incl. H and ELITE models)

Packard Bell LEGEND 660H

Packard Bell LEGEND 660TJ (incl. H model)

Packard Bell LEGEND 66D SUPREME

Packard Bell LEGEND 66T SUPREME

Packard Bell LEGEND 670

Packard Bell LEGEND 695 SUPREME

Packard Bell LEGEND 700 (incl. ELITE model)

Packard Bell LEGEND 740

Packard Bell LEGEND 747 MINITOWER

Packard Bell LEGEND 750 SUPREME

Packard Bell LEGEND 760 SUPREME

Packard Bell LEGEND 770 (incl. ELITE model)

Packard Bell LEGEND 780

Packard Bell LEGEND 780 SUPREME

Packard Bell LEGEND 790

Packard Bell LEGEND 800 SUPREME (incl. 800+)

Packard Bell LEGEND 800 SUPREME/50

Packard Bell LEGEND 840 MINITOWER

Packard Bell LEGEND 845 MINITOWER

Packard Bell LEGEND 848 MINITOWER

Packard Bell LEGEND 900 F (incl. F-ELITE, and G models)

Packard Bell LEGEND 920SX SUPREME

Packard Bell LEGEND 925 G (incl. G ELITE and J model)

Packard Bell LEGEND 933 G (incl. G ELITE, J, J ELITE and J+)

Packard Bell LEGEND 950 ELITE (incl. J and J ELITE models)

Packard Bell LEGEND 960TJ

Packard Bell LEGEND 966J (incl. ELITE model)

Packard Bell LEGEND 966TJ (incl. TJ ELITE, TJ2 ELITE, TJ-W ELITE, WG and TZ models)

Packard Bell LEGEND M950

Packard Bell LEGEND MT950 (incl. J model)

Packard Bell LEGEND T66

Packard Bell PACKMATE 486/33G (incl. J model)

Packard Bell PACKMATE 486/E

Packard Bell PACKMATE 48625

Packard Bell PACKMATE 486DX/33 Y (incl. Y-W and  X models)

Packard Bell PACKMATE 486DX2/50TY (incl. TY-W model)

Packard Bell PACKMATE 486DX2/T Z -W (incl. Y model)

Packard Bell PACKMATE 486DX33/T Y (incl. /TY-W model)

Packard Bell PACKMATE 486SX

Packard Bell PACKMATE 486SX/20 E (incl. F, and G models)

Packard Bell PACKMATE 486SX/25G

Packard Bell PACKMATE 486SX/25W (incl. TG model)

Packard Bell PACKMATE 486SX/33X (incl. X2 and TM models)

Packard Bell PACKMATE 486SX25U (incl. U2 and X models)

Packard Bell PACKMATE 733 C MT

Packard Bell PACKMATE X225

Packard Bell PACKMATE X230

Packard Bell PACKMATE X233

Packard Bell PACKMATE X240

Packard Bell PACKMATE X250 (incl. Y model)

Packard Bell PACKMATE XT266

Packard Bell PB430_5428

Packard Bell PB430SX25

Packard Bell PB530_5428

Patch Computers 486DX-33 VESA/ISA

Patch Computers 486SX-33 VESA/ISA

PC Direct 486ep

PC Expanders VANGUARD PENTIUM 60MHZ VLB

PC House Micro Q 486dx2-66

PC Tech Zeos® Upgradable

PC-Brand Leader 486dx/33 Cache

PC-Brand Leader 486dx2/66 Cache

PC-Brand NB 486slc

Peacock 486DX 50

Pionex 486DX/33 VL

Pionex 486DX2/50 VL

Pionex 486DX2/66 EISA/VL

Pionex 486DX2/66 VL

Pionex 486SX/25 VL

Poly 486-33VZ

Poly 486-50E

Poly 486-66E

Poly 486-66EV

Poly 486-66VI

Poly 486-66VL

Poly 486-66VR3

Poly 486SX-25Y

Poly 486SX-33VL

Poly 586-60VLB

Positive by Tandon 486dx/33

Positive by Tandon 486dx2/66

Precision 486/50 EISA

Precision 486/50F

Precision 486/66 EISA VL-Bus

Precision 486/66 VL-Bus

Precision 486/66E

Primax 425SVI

Primax 433VI

Primax 450VE

Primax 450VI

Primax 466VI

Primax 486/33E

Primax 486/66E

Procomp TW 9300

Professional Concepts Beeker 4-33/VL2

Professional Concepts Beeker 4-50/VL2

Professional Concepts Beeker 4-66/VL2

Professional Concepts Beeker 6900

Professional Concepts Quinn 4-33/VLE

Professional Concepts Quinn 4-50/VLE

Professional Concepts Quinn 4-66/VLE

Professional Concepts Saavij 4-33/VL3

Professional Concepts Saavij 4-50/VL3

Professional Concepts Saavij 4-66/VL3

Progen 466

Protech 486-66Mhz EISA

Protech 486-66Mhz EISA/VL

Protech 486-66Mhz ISA

Protech 486-66Mhz ISA/VL

QNIX OMNI486DX2/66

Quadrant 486DX/33 VESA LOCAL BUS

Quadrant 486DX/50 VESA LOCAL BUS

Quadrant 486DX2/66 VESA LOCAL BUS

Quadrant 486SX/25 VESA LOCAL BUS

Quadrant 486SX/33 VESA LOCAL BUS

Quantex 486DX/33 VL

Quantex 486DX2/50 VL

Quantex 486DX2/66 EISA/VL

Quantex 486DX2/66 VL

Quantex 486SX/25 VL

Quattro® Prompt4

Radisys EPC-23

Radisys EPC-4

Radisys EPC-5

Radisys EPC-7

Rask REC 486-50F

RDIpc i486DX2/66c Eisa

RDIpc i486DX2/66c Isa

RDIpc i486DX2/66c VL Bus

Reason Technology Square 4LX-C 486DX/2-66

Reason Technology Square 4LX/DX2-66

Repco Data R33B486

Repco Data Turbo APM-420 DX

Repco Data Turbo APM-425 DX

Repco Data Turbo APM-433

Reply Model 32

Reply PS/2 Model 50/50Z System Board Upgrade 486SLC2/50 8

Reply PS/2 Model 55/55SX System Board Upgrade 486/25 8

Reply PS/2 Model 60/80 System Board Upgrade 486/33 8

Reply PS/2 Model 70 System Board Upgrade 486/33 8

Research Machines RM E Series QE-486/33

Research Machines RM S Series PC-486/25SX

Research Machines RM SystemBase 486/33

Research Machines RM V Series V466

Rolta ROLTASTATION 433E

Rose Computer Cidex 386DX-40 ISA(AMD)

Rose Computer Cidex 486DX-40 ISA

Samsung DeskMaster 486/33P

Samsung DeskMaster 486D2/66E

Samsung DeskMaster 486S/25N

Sanyo MBC-19te

SCA Professional 3486DX2/66 VLB

SCA Professional 486DX 50 VLB

SCA Professional 486DX2/66 VLB

SCHADT SCT Proline 486DX2-66 VLB

Seanix ASI 9000 EFAR 486DX2-66

Seanix ASI 9000 PREMIERE PENTIUM PCI-60

Seanix ASI 948633VM

Seanix ASI 948650VM

Seanix ASI 9DX266VM

Sequent® WinServer 1000up 12

Sequent WinServer 3000up 12

Sequent WinServer 500

Shuttle 486VL 50

Shuttle HOT-407 EISA/VESA/DX-33

Shuttle HOT-407 EISA/VESA/DX-40

Shuttle HOT-407 EISA/VESA/DX-50

Shuttle HOT-407 EISA/VESA/DX2-50

Shuttle HOT-407 EISA/VESA/DX2-66

Shuttle HOT-409 VLB/DX-33

Shuttle HOT-409 VLB/DX-40

Shuttle HOT-409 VLB/DX-50

Shuttle HOT-409 VLB/DX2-50

Shuttle HOT-409 VLB/DX2-66

Shuttle HOT-413 VLB/DX-33

Shuttle HOT-413 VLB/DX-40

Shuttle HOT-413 VLB/DX-50

Shuttle HOT-413 VLB/DX2-66

Shuttle HOT-426 PCI/DX-33

Shuttle HOT-503 PENTIUM/60

Shuttle HOT-503 PENTIUM/66

Sidus Formula 486/33i

Sidus Formula 486/50e

Siemens-Nixdorf PCD-3M/25

Siemens-Nixdorf PCD-3T/33

Siemens-Nixdorf PCD-4G/33

Siemens-Nixdorf PCD-4G/66

Siemens-Nixdorf PCD-4GSX/25

Siemens-Nixdorf PCD-4H/66

Siemens-Nixdorf PCD-4H/66 VL

Siemens-Nixdorf PCD-4HSX

Siemens-Nixdorf PCD-4LSL

Siemens-Nixdorf PCD-4LSX

Siemens-Nixdorf PCD-4T/33

Siemens-Nixdorf PCD-4T/66

Siemens-Nixdorf PCD-5H

Siemens-Nixdorf PCD-5T / PCI 60E

Siemens-Nixdorf PCE-4C/66-1

Siemens-Nixdorf PCE-4C/DX2-66

Siemens-Nixdorf PCE-4C/SX25

Siemens-Nixdorf PCE-4R/33

Siemens-Nixdorf PCE-4RSX/25

Siemens-Nixdorf PCE-4T/66

Siemens-Nixdorf PCE-5S/60

Siemens-Nixdorf PCE-5S/66

Silicon Star AV4 486DX2/66

Silicon Star AV4 486DX33

Silicon Star AV4 50MHz

Sirex Eaton 486DX-33 EISA/LocalBus

Sirex PowerMaster 486DX-33 EISA/VLB

Sirex PowerMaster 486DX2-50 EISA/VLB

Sirex PowerMaster 486DX2-66 EISA/VLB

Sirex SpeedMaster 486DX-33 ISA

Sirex SpeedMaster 486DX-33 LocalBus

Sirex SpeedMaster 486DX-50 ISA

Sirex SpeedMaster 486DX2-50 ISA

Sirex SpeedMaster 486DX2-50 LocalBus

Sirex SpeedMaster 486DX2-66 ISA

Sirex SpeedMaster 486DX2-66 LocalBus

Sirex SpeedMaster 486SX-33 LocalBus

SKAI 486DX/50VL

SKAI 486DX2/66EVL

Softlet Standard 486DX-40

Softlet Standard 486DX-50

Softlet Standard 486DX2-50 VL

Softlet Standard 486DX2-66

Softworks Citus MDC 386-33

Softworks Citus MDC 486DX-33

Softworks Citus MDC 486DX-50

Softworks Citus MDC 486DX2-50

Softworks Citus MDC 486DX2-66

Softworks Citus MDC X 486 50

SRC Systems 486DX2/66 VESA LOCAL BUS

SRC Systems GRAPHICSTATION

SRC Systems High Performance SCSI® 66MHz

SRC Systems Pentium/PCI

Standard Computronics HIPPO-VL 486DX2-66 VESA LOCAL BUS

Standard Computronics HIPPO-VL+ 486DX2-66 DCA® SYSTEM

STD 4D250

STD 4D33

STD 4DV266

STD 4DX250B

STD 4DX266B

STD 4DX33B

SuperCom Touch TI433

SuperCom Touch TI450

SuperCom Touch TI466

Svensk LAPLINE DeskTop 462 (incl. MiniTower Model)

Swan 486/33DB

Swan 486/33V

Swan 486/50ES

Swan 486/66ES

Swan 486DX/33 EISA-DB

Swan 486DX2/50DB

Swan 486DX2/66 EISA-DB

Swan 486DX2/66DB

Swan 486SX/25DB

Swan 486SX/25V

Syncomp Mega+386i 40 PC

Syncomp Mega+486DX2/50e PC

Syncomp Mega+486DX2/50i PC

Syncomp Mega+486DX2/66e PC

Syncomp Mega+486DX2/66i PC

Syncomp Mega+486e-33 PC

Syncomp Mega+486e-50 PC

Syncomp Mega+486i-33 PC

Syncomp Mega+486i-50 PC

Syncomp Mega+486SXe-25 PC

Syncomp Mega+486SXi 33 PC

Syncomp Mega+486SXi-25 PC

Syncomp Micro 386i 40 PC

Syncomp Micro 486DX2/50i PC

Syncomp Micro 486i-33 PC

Syncomp Micro 486i-50 PC

Syncomp Micro 486SXi-25 PC

Syncomp Mini 386i-40PC

Syncomp Mini 486-50i PC

Syncomp Mini 486DX2/50e PC

Syncomp Mini 486DX2/50i PC

Syncomp Mini 486DX2/66e PC

Syncomp Mini 486DX2/66i PC

Syncomp Mini 486e-33 PC

Syncomp Mini 486e-50 PC

Syncomp Mini 486i-33 PC

Syncomp Mini 486SXe-25 PC

Syncomp Mini 486SXi-25 PC

Syncomp Mini 486SXi-33 PC

Syncomp Mini+386i 40 PC

Syncomp Mini+486DX2/50e PC

Syncomp Mini+486DX2/50i PC

Syncomp Mini+486DX2/66e PC

Syncomp Mini+486DX2/66i PC

Syncomp Mini+486e-33 PC

Syncomp Mini+486e-50 PC

Syncomp Mini+486i-33 PC

Syncomp Mini+486i-50 PC

Syncomp Mini+486SXe-25 PC

Syncomp Mini+486SXi-25 PC

Syncomp Mini+486SXi-33 PC

Sys Technology ST486DX-33VM

T-DATA LIN 486-33 DX

T-DATA LIN 486-50 DX

Tagram Computers 486DX-33

Tandon 486dx/33

Tandon 486dx2/66

Tandon MCSII 486dx/33

Tandon MCSII 486dx/33c

Tandon MCSII 486dx2/66c

Tandon NII 486dx/33

Tandon PACII plus 486dx2/66

Tandon PCAII 486dx2/66

Tandon PCAII 486sx/25

Tandon ProfileTM 486dx/33

Tandon TargetII 486dx2/66

Tandon TargetII 486sx/25

Tandon Tower 486dx2/66e

Tandon TowerII 486dx2/66

Tandy® 3100

Tandy 425 SX

Tandy 433 DX

Tandy 433 SX

Tandy 450 DX2

Tandy 466 DX2

Tandy 4825 SX

Tandy 4833 LX/T

Tandy 4850 EP

Tandy 4866 LX/T

Tandy Omni Profile II 425 SX

Tandy Omni Profile II 433 DX

Tandy Omni Profile II 433 SX

Tandy Omni Profile II 450 DX2

Tandy Omni Profile II 466 DX2

Tandy Onmi II MT 425 SX

Tandy Onmi II MT 433 DX

Tandy Onmi II MT 433 SX

Tandy Onmi II MT 450 DX2

Tandy Onmi II MT 466 DX2

Tangent 486DX/33 EISA

Tangent 486DX/33 ISA

Tatung TCS-8460S 386SX/25

Tatung TCS-9300T 486DX2/66

Tatung TCS-9360T 486DX/33

Tatung TCS-9370T 486DX2/66

Tatung TCS-9510 486DX/33

Tatung TCS-9540 486DX/33

Tatung TCS-9620E 486DX2/66

Tatung TCS-9650E 486DX2/66

Tatung TCS-9700 486DLC/40

Tatung TCS-9910S 486SLC/33

Techway Endeavour E62

Techway Endeavour E62VL

Techway Endeavour E77

Techway Endeavour E77VL

Techway Endeavour E84

Techway Endeavour E84VL

TELEMECANIQUE FTX507-6B

TELEMECANIQUE FTX507-8C

Texas Instruments® TravelMateTM 4000 Color Series 6

Texas Instruments TravelMate 4000Series 6

Texas Instruments TravelMate 4000 WinDX2 6

Texas Instruments TravelMate 4000E in TravelMate DeskTop

TFE Atlantic 486 DX 50Mhz

Tiki-Data PC UNIVERSAL

Toshiba® Satellite T1900C

Toshiba T1910CS/200

Toshiba T1950CT/320

Toshiba T4400SXC

Toshiba T4500

Toshiba T4600C

Toshiba T4600C/320

Toshiba T4700CS/200

Toshiba T4700CT/320

Toshiba T4800CT/500

Toshiba T6400SX

Toshiba T6600C Multimedia Computer 13

Tri-Star Tri-Win Station

Tri-Star TriCAD 486/66

TriGem 486/33MM (incl. 486 /P (Type 30) model)

TriGem 486/50F

TriGem 486/66F

TriGem 486/66VC

TriGem 486DX2/50MM (incl. 486 /P (Type 40) model)

TriGem 486DX2/66MM (incl. 486 /P (Type 50) model)

TriGem 486G/T20

TriGem 486G/T40

TriGem 486H/T12G

TriGem 486P/T15V

TriGem 486P/T25V

TriGem 486P/T35V

TriGem 486P/T45V

TriGem 486P/T55V

TriGem 486VC

TriGem 4DX/33ME

TriGem 4DX/33ML

TriGem 4DX2/50

TriGem 4DX2/50ME

TriGem 4DX2/66 ML

TriGem 4DX2/66ME

TriGem 4SX/25ME

TriGem 4SX/25ML

TriGem 4SX/33ME

TriGem 4SX/33ML

TriGem 586T

TriGem SX486/25C

TriGem SX486/25MM (incl. 486 /P (Type 10 and 12) models)

TriGem SX486/33MM (incl. 486 /P (Type 20) model)

Trinity Technology Genesis Viper

Tulip® Vision Line DS 486 dx/50i

Tulip Vision Line DS 486 SX/33i

Tulip Vision Line DS 586 DX/60

Tulip Vision Line DS/DE 486 dx/33i

Tulip Vision Line DT/DC 486 DX/33i

Tulip Vision Line DT/DC 486 DX/50i

Tulip Vision Line DT/DC 486 DX/66i

Tulip Vision Line series 486DX-33i

Tulip Vision Line series 486DX-50i

Tulip Vision Line series 486DX-66e

Tulip Vision Line Series 486DX-66i

Tulip Vision Line TR 586 DX/60

TWINHEAD Superset 700

U.S. Micro Jet 386DX-33

U.S. Micro Jet 386DX-40

U.S. Micro Jet 486DLC-33

U.S. Micro Jet 486DX-33

U.S. Micro Jet 486DX-50

U.S. Micro Jet 486DX2-50

U.S. Micro Jet 486DX2-66

U.S. Micro Jet 486SX-25

U.S. Micro Jet EISA 486-33

U.S. Micro Jet EISA 486-50

U.S. Micro Jet EISA 486DX2-50

U.S. Micro Jet EISA 486DX2-66

U.S. Micro Jet EISA 486SX-25

U.S. Micro Jet VL 486-50

U.S. Micro Jet VL 486DX-33

U.S. Micro Jet VL 486DX2-50

U.S. Micro Jet VL 486DX2-66

U.S. Micro Jet VL 486SX-25

Ultra Technologies UL P5 60

Ultra Technologies UL486DX 33

Ultra Technologies UL486DX 50

Ultra Technologies UL486DX/2 66

Ultra-Comp 486DX-33

Ultra-Comp 486DX-33 EISA VLB

Ultra-Comp 486DX-33 VLB

Ultra-Comp 486DX-50

Ultra-Comp 486DX-50 EISA VLB

Ultra-Comp 486DX-50 VLB

Ultra-Comp 486DX2-66

Ultra-Comp 486DX2-66 EISA VLB

Ultra-Comp 486DX2-66 VLB

Unidata 486 66 Mhz ISA

Unique Computers, Ltd. UNIQUE 486DX50-VL

Unisys® Pathway Series PS 456-601

Unisys Pathway Series PS243-331

Unisys Pathway Series PS243-661

Unisys Pathway Series PS246-331

Unisys Pathway Series PS246-661

Unisys Pathway Series PS445-661

Unisys Pathway Series PS458-601

Unisys PW2 3336

Unisys PW2 Advantage 3256

Unisys PW2 Advantage 3336

Unisys PW2 Advantage 4163

Unisys PW2 Advantage 4253

Unisys PW2 Advantage 4256

Unisys PW2 Advantage 4336

Unisys PW2 Advantage 4506

Unisys PW2 Advantage 46662

Unisys PW2 Advantage Plus 4668

Unisys PW2 Advantage Plus 5606

Unisys PW2 Advantage Plus 5608

US Logic Falcon II Single Board Computer

Vektron VL 486DX/33

Vektron VL 486DX2/50 Business Multimedia

Vektron VL 486DX2/66 Professional Multimedia

Victor 400 DX/50

Victor 400 SX/25

Victor 486 DX/33

Victor 486 DX/66

Victor DX/50

Victor V486DSX/25

Viglen Contender 4DX33

Viglen EX-Series 4DX50

Viglen GenieTM 4DX66

Vobis 4386 VIO SX25

Vobis 486 VC-HD 33

Vobis 486 VC-HD 50

Vobis 486 VIO 66

Vtech 386 Ultra Slim

Vtech 486DX/3 Desktop

Vtech 486DX/3 Desktop (w/LBVGA)

Vtech 486DX/3 Desktop (w/VLBUS)

Vtech 486DX/3 Mini (w/VLBUS)

Vtech 486DX/3 Tower

Vtech 486DX/3 Tower (w/VLBUS)

Vtech 486DX2/4 Desktop

Vtech 486DX2/4 Desktop (w/LBVGA)

Vtech 486DX2/4 Desktop (w/VLBUS)

Vtech 486DX2/4 Tower

Vtech 486DX2/4 Tower (w/VLBUS)

Vtech 486DX2/6 Desktop

Vtech 486DX2/6 Desktop (w/LBVGA)

Vtech 486DX2/6 Desktop (w/VLBUS)

Vtech 486DX2/6 Mini (w/VLBUS)

Vtech 486DX2/6 Tower

Vtech 486DX2/6 Tower (w/VLBUS)

Vtech 486SX/3 Desktop

Vtech 486SX/3 Desktop (w/LBVGA)

Vtech 486SX/3 Desktop w/VLBUS

Vtech 486SX/3 Tower

Vtech 486SX/3 Ultra Slim

Vtech 486SX/3 Ultra Slim (w/LBVGA)

Vtech 486SX/4 Desktop

Vtech 486SX/4 Desktop (w/LBVGA)

Vtech 486SX/4 Desktop (w/VLBUS)

Vtech 486SX/4 Mini (w/VLBUS)

Vtech 486SX/4 Tower

Vtech 486SX/4 Ultra Slim

Vtech 486SX/4 Ultra Slim (w/LBVGA)

Vtech LT322 Notebook

Vtech LT421 Notebook

Vtech LT432 Notebook

Vtech LT433

Vtech LT433C Color Notebook

Vtech Platinum 466M

Vtech Platinum 560M Pentium

Vtech Platinum SMP

Wang® Microsystems ASI-CPU-E266

Wang Microsystems DTE-33

Wang Microsystems PC 350/40C

Western 486V25 SX VESA LOCAL BUS

Western 486V33 DX EISA

Western 486V33 DX ISA

Western 486V50 DX EISA

Western 486V50 DX ISA

Western 486V50 DX2 ISA

Western 486V66 DX2 EISA

Western 486V66 DX2 ISA

WIPRO Fusion 510

WIPRO LANDMARK E

WIPRO LANDMARK E SQUARE MODEL - 560

WIPRO Super Genius 386DX

WIPRO Super Genius 386SX

WIPRO Super Genius 486DX

WIPRO Super Genius 486SX

Wyle Laboratories Intel Xpress Deskside w/486DX-50MHz

Wyle Laboratories Intel Xpress DeskTop  w/486DX2-66MHz

Wyle Laboratories Intel Xpress DeskTop w/486DX-50MHz

Wyse® Decision 386/25

Wyse Decision 386/40

Wyse Decision 386SX/25C

Wyse Decision 486/25

Wyse Decision 486/33

Wyse Decision 486/33E

Wyse Decision 486/33T

Wyse Decision 486DX2/50

Wyse Decision 486GSI

Wyse Decision 486se-25SX

Wyse Decision 486se-33DX

Wyse Decision 486se-33SX

Wyse Decision 486se-50DX2

Wyse Decision 486se-66DX2

Wyse Decision 486si-25SX

Wyse Decision 486si-33DX

Wyse Decision 486si-33SX

Wyse Decision 486si-50DX2

Wyse Decision 486si-66DX2

Wyse Forte` GSV

Wyse Series 6000i Model 640

Wyse Series 6000i Model 645

Wyse Series 7000i Model 740

Xycom XVME-674

Zenith® Data Systems Z-386/33E

Zenith Data Systems Z-425/SX

Zenith Data Systems Z-425S+

Zenith Data Systems Z-433/DX

Zenith Data Systems Z-450X+

Zenith Data Systems Z-486/33ET

Zenith Data Systems Z-486SX/20

Zenith Data Systems Z-486SX/25E

Zenith Data Systems Z-Note 425Ln

Zenith Data Systems Z-SELECT 100 DX2/50

Zenith Data Systems Z-SELECT 100 DX2/66

Zenith Data Systems Z-SELECT 100 DX33

Zenith Data Systems Z-SELECT 100 SX25

Zenith Data Systems Z-SELECT 100 SX33

Zenith Data Systems Z-SERVER 425SE

Zenith Data Systems Z-SERVER 433DE

Zenith Data Systems Z-SERVER 450DE

Zenith Data Systems Z-SERVER EX 433DE Model 1000A (incl. Model 2000A)

Zenith Data Systems Z-SERVER EX 433DE Model 500 (incl. Model 1000)

Zenith Data Systems Z-SERVER EX 450DE Model 1000A (incl. Model 2000A)

Zenith Data Systems Z-SERVER EX 450DE Model 500 (incl. Model 1000)

Zenith Data Systems Z-SERVER EX P60E Model 1000A (incl. Model 2000A)

Zenith Data Systems Z-SERVER EX P60E Model 500 (incl. Model 1000)

Zenith Data Systems Z-SERVER LT 433DE Model 245 (incl. Model 1000)

Zenith Data Systems Z-SERVER LT 466XE Model 500 (incl. Model 1000)

Zenith Data Systems Z-SERVER LT P60E Model 1000A (incl. Model 2000A)

Zenith Data Systems Z-SERVER LT P60E Model 500 (incl. Model 1000)

Zenith Data Systems Z-Station 420SEh

Zenith Data Systems Z-Station 420SEn

Zenith Data Systems Z-Station 420Sh

Zenith Data Systems Z-Station 420Sn

Zenith Data Systems Z-Station 425Sh

Zenith Data Systems Z-Station 425Sn

Zenith Data Systems Z-Station 433DEh

Zenith Data Systems Z-Station 433DEn

Zenith Data Systems Z-Station 433Dh

Zenith Data Systems Z-Station 433SEh

Zenith Data Systems Z-Station 450XEh

Zenith Data Systems Z-Station 450Xh

Zenith Data Systems Z-Station 450Xn

Zenith Data Systems Z-STATION 500 Model 433

Zenith Data Systems Z-STATION 500 Model 466X

Zenith/INTEQ TEMPEST 486 WORKSTATION / SERVER

Zenon Z-Dream IIII EISA/VESA 486DX/66

Zenon Z-OPTIMUS PCI,SCSI-II, Pentium/60

ZEOS 486DX/33CDT

ZEOS 486DX/33EISA

ZEOS 486DX/33ISA

ZEOS 486DX/50

ZEOS 486SX/20DT

ZEOS FreestyleTM 386SL  25

ZEOS Pantera 60

ZEOS Upgradable 486 DX/33 Cache

ZEOS Upgradable 486 DX2/66 Cache

ZEOS Upgradable 486 SX/33 Cache

ZEOS Upgradable Local Bus DX2/66


x86 Architecture Multiprocessor Computers

The following x86 architecture multiprocessor systems have been tested.

ACER AcerAltos 17000 / 3255 (2p)

ACER AcerAltos 7000/F560TU

ACER AcerFrame 3000MP 33 (Model 3255)  6

ACER AcerFrame 3000MP 50 (Model 3257)  6

ALR POWERPRO DMP 4/66D

ALR PROVEISA DMP 4/33

ALR PROVEISA DMP 4/50D

ALR PROVEISA DMP 4/66D

Ambra TP66E2/VL

AST Manhattan SMP 486/50 (4p)  14

AST Manhattan SMP P60 (4p)  14

AST Manhatten SMP P60 (2p)  3

COMPAQ ProLiant 2000 Model 5/66

COMPAQ ProLiant 4000 Model 5/66

COMPAQ Systempro Dual 386/25

COMPAQ Systempro Dual 486/33

COMPAQ Systempro Dual 486/50 XL

COMPAQ Systempro Dual 486DX2/66

Corollary Extended C-bus 486DX2/66

ICL System Platform MX486/50

NCR System 3000 Model 3360 Panther

NCR System 3000 Model 3430

NCR System 3000 Model 3450  15

NCR System 3000 Model 3455

NCR System 3000 Model 3550  12,15

NCR System 3000 Model 3555  12,15

Olivetti LSX5030

Olivetti LSX5040

Sequent WinServer 1000  12

Sequent WinServer 1500  12

Sequent WinServer 3000  12

Sequent WinServer 5000  12

Siemens-Nixdorf PCE-4T/33

Siemens-Nixdorf PCE-4T/50(Dual)

Wyse Series 7000i Model 740MP/33

Wyse Series 7000i model 740MP/66

Wyse Series 7000i Model 760MP


MIPS® RISC Architecture Computers

The following MIPS RISC architecture systems have been tested.

ACER ARC1

AcerFormula

Carerra R4000TM

DESKStation Technology Evolution E4000 RISC PC

DESKStation Technology Tyne v4633x RISC PC

MIPS ArcSystem Magnum PC-50

MIPS ArcSystem Magnum SC-50

MIPS Millenium PC-50

MIPS Millenium SC-50

NEC Image RISCStation

NeTpower NeTserver 1000

NeTpower NeTstation 100

NeTpower NeTstation 200

NeTpower NeTstation 300

Olivetti M700-10

Olivetti PWS4000

Shuttle RiscPC

Shuttle RiscPC 4475


Digital Alpha AXPTM RISC Architecture Computers

The Following Digital Alpha AXP RISC systems have been tested.

Actech ACTion Alpha AXP 150

Digital Equipment Corp. DECpc 2000-300 AXP Server

Digital Equipment Corp. DECpc 2000-500 AXP Server

Digital Equipment Corp. DECpc AXP 150

Digital Equipment Corp. DECpc AXP 150 Universal Platform


SCSI Host Adapters

The following SCSI adapters have been tested on the indicated platforms with the following scanner, CD-ROM, tape, fixed and removable drives (except as noted):  ArchiveST 4000 DAT, CD-Technologies CD Porta-DriveTM T-3401, Hewlett-Packard ScanJet® IIc, NEC Intersect CDR-74, Micropolis 1924, Peripheral Land Infinity 88, Procom Technology MCD-DS, Syquest® 5110, Toshiba TXM-3401E, WangTek 5150es.

x86	MIPS	ALPHA	SCSI Host Adapter
X			AdaptecTM AHA-1510
X	X	X	Adaptec AHA-1520
X	X	X	Adaptec AHA-1522
X	X	X17	Adaptec AHA-1540B 16
X	X	X17	Adaptec AHA-1542B 16
X		X17	Adaptec AHA-1540C 18
X		X17	Adaptec AHA-1542C 18
X			Adaptec AHA-1640
X			Adaptec AHA-1740 19
X			Adaptec AHA-1742 19
X	X	X	Adaptec AHA-1740A 20
X	X	X	Adaptec AHA-1742A 20
X	X	X	Adaptec AHA-2740
X	X	X	Adaptec AHA-2742
X21			Adaptec AIC-6260
X22			Adaptec AIC-7770c
X			Always IN-2000
X			AMIscsi Series 441 2,23
X			BusLogic BT-445S
X	X	X	BusLogic BT-542B
X		X	BusLogic BT-545S
X			BusLogic BT-640A
X			BusLogic BT-646S 24
X			BusLogic BT-742A
X	X	X	BusLogic BT-747S
X			CMD Tech CSA-6000/F 2
X			COMPAQ Fast SCSI-2 Controller
X			COMPAQ 6260 SCSI-2 Controller
X			DPT PM2011b
X			DPT PM2011b (with cache) 23
X		X	DPT PM2012b
X		X	DPT PM2012b (with cache) 23
X			DPT PM2021
X			DPT PM2021 (with Cache) 23
X			DPT PM2022
X			DPT PM2022 (with Cache) 23
X			DPT PM2122
X			DPT PM2122 (with Cache) 23
X	X	X17	Data Technology Corp. 3290
X			Data Technology Corp. 3292 25
X			Future Domain® MCS-600
X			Future Domain MCS-700
X			Future Domain TMC-845 26,27
X	X	X	Future Domain TMC-850 26,27
X	X	X	Future Domain TMC-850M(ER) 27
X			Future Domain TMC-860 26,27
X			Future Domain TMC-860M 27
X			Future Domain TMC-885 26,27
X			Future Domain TMC-885M 27
X	X	X	Future Domain TMC-1650
X	X	X	Future Domain TMC-1660
X	X	X	Future Domain TMC-1670
X	X	X	Future Domain TMC-1680
X	X	X	Future Domain TMC-7000EX
X28			IBM PS/2 Microchannel SCSI Host Adapter
X28			IBM PS/2 Microchannel SCSI Host Adapter (with cache)
X			Maynard 16-bit SCSI Adapter 24,29
X			MediaVision Pro Audio Spectrum-16
X			NCR 53C700 SCSI Adapter
X			NCR 53C710 SCSI Adapter
X30			NCR 53C90 SCSI Controller
X31	X		NCR 53C94 SCSI Controller
X			Olivetti ESC-1
X			Olivetti ESC-2
X			Procom Tech Xelerator - ISA 2
X			Q Logic EISA 2
X			Q Logic ISA 2
X			Q Logic VESA Local Bus 2
X			Trantor T-128 26,27,32
X			Trantor T-228 26,27,29,33
X			Trantor T-130B 26,32
X			Trantor T-348 MiniSCSI Plus 1
X	X	X	UltraStor 14f 34
X	X	X	UltraStor 24f 35
X		X	UltraStor 24fa
X			UltraStor 34f


SCSI CD-ROM Drives

The following SCSI CD-ROM drives have been tested with the following adapters:  Adaptec AHA-1510, AHA-1542C, AHA-1640 and AHA-1742A; Future Domain TMC-1670, TMC-850M and MCS-600; IBM PS/2 Microchannel SCSI Host Adapter (with cache); Ultrastor 24fa.  Drives have been tested for data access as well as for the audio capabilities indicated.

Standard (CD) Audio	Multimedia Audio	SCSI CD-ROM Drives
X	X	CD-Technology CD Porta-Drive T-3301
X	X	CD-Technology CD Porta-Drive T-3401
		Chinon® 431
		Chinon 435
X	X	Chinon CDS-535
X	X	Chinon CDX-535
X	X	COMPAQ DualSpeed CD-ROM Drive
X	X	DEC RRD42
X		Denon® DRD 253 36
X		Hitachi® CDR-1750S
X	X	Hitachi CDR-3750S
		IBM 3510
X	X	IBM Enhanced Internal CDROM II Drive 32G2958
X	X	IBM Enhanced External CDROM II Drive 3510005
X	X	IBM PS/2 CDROM II Drive
X	X	Laser Magnetic Storage CM-215 37
X	X	NEC Intersect CDR-73M 38
X	X	NEC Intersect CDR-83M
X	X	NEC Intersect CDR-74
X	X	NEC Intersect CDR-84
X	X	NEC Intersect CDR-74-1
X	X	NEC Intersect CDR-84-1
		Panasonic® CR-501
X	X	Pioneer® DRM-600 39
X	X	Procom Technology MCD-DS
X	X	Sony® CDU-541
X	X	Sony CDU-561
X	X	Sony CDU-6211
X	X	Sony CDU-7211
X	X	Sony CDU-7811
		Texel DM-5021
X	X	Texel DM-5024 40
		Toshiba TXM-3201
X	X	Toshiba TXM-3301E
X	X	Toshiba XM-3301B
X	X	Toshiba TXM-3401E
X	X	Toshiba XM-3401B


Other CD-ROM Drives

The following CD-ROM drives with proprietary interfaces have been tested. All drives listed support Standard (CD) Audio and MultiMedia Audio.  All drives listed require drivers supplied in the driver library (\DRVLIB) on the Windows NT CD-ROM.

x86	MIPS	ALPHA	CD-ROM Drive
X			Creative Labs Sound Blaster ProTM 41
X			Panasonic CR-521
X			Panasonic CR-523
X			Panasonic CR-563
X	X		Sony CDU 31a


SCSI Tape Drives

The following SCSI tape drives have been tested with the following adapters using the Windows NT Backup program:  Adaptec AHA-1510, AHA-1542C, AHA-1640 and AHA-1742A; Future Domain TMC-1670, TMC-850M and MCS-600; IBM PS/2 Microchannel SCSI Host Adapter (with cache); Ultrastor 24fa.  Drives are listed under their appropriate Tape entry in SETUP.

4 Millimeter DAT

    ArchiveST 2000DAT (4520NT)

    ArchiveST 2000DAT (EAX4350) 42

    ArchiveST 4000DAT (4324NP)

    ArchiveST 4000DAT (4352XP)

    DEC TLZ06 43

    Exabyte 4200 44

    Exabyte 4200c 45

    Hewlett-Packard JetStore 2000

    Hewlett-Packard JetStore 2000e

    Hewlett-Packard JetStore 2000i

    Hewlett-Packard JetStore 5000

    Hewlett-Packard JetStore 5000e

    Hewlett-Packard JetStore 5000i

    Hewlett-Packard 35470a

    Hewlett-Packard 35480a

    Hewlett-Packard C1503a

    Hewlett-Packard C1504a

    Hewlett-Packard C2224c

    Hewlett-Packard C2225b

    Maynard Maynstream 1300DAT 42

    Maynard 2000 DAT 42

    Tecmar® DataVault 2000

    Tecmar DataVault 4000

    WangDAT Model 1300XL

    WangDAT Model 3100

    WangDAT Model 3200

4 Millimeter Sony 2

    Sony SDT 2000

    Sony SDT 4000

    Sony SDT 5000

4MM DAT DDS2 tape drives 2

    Archive® 4326NP

    Archive 4326RP

    Archive 4356XP

    Compaq 4/16 Gigabyte TurboDAT

    Conner 4326NP

    Conner 4326RP

    Conner 4356XP

    Hewlett-Packard C1533a

    WangDAT Model 3400DX

Archive 2150S, 2525S, 2750

    Archive 2150/2250 46

    Archive 2525

    Archive 2750

    Archive 2800

Exabyte 2501 miniqic drive 2

    Exabyte 2501

Exabyte 8200 Series (SCSI-1)

    Exabyte EXB-8200 47

    Exabyte EXB-8200ST 47

    Exabyte EXB-8205 44

    Exabyte EXB-8205ST 44

Exabyte 8500 Series (SCSI-2)

    Exabyte EXB-8500

    Exabyte EXB-8500ST

    Exabyte EXB-8500c 47

    Exabyte EXB-8500cST 47

    Exabyte EXB-8505

    Exabyte EXB-8505ST

    IBM 5.0Gb 8mm Tape Drive Option

    IBM 3445 Model 001 5.0Gb 8mm Tape

        Drive

IBM 4mm DAT (API version) 2

    IBM 2.0Gb 4mm Tape Drive Option (part

        number 55F9428)

    IBM 2.0Gb 4mm DAT 3440 001

Sankyo QIC tape drive 2

    Sankyo CP150SE

    Sankyo CP-525SE

    Sankyo CP1000SE

Tandberg 3660, 3820, 4120, 4220

    DEC TZK10

    DEC TZK12

    IBM 3450 1.2Gb Tape Drive Model 001

    Tandberg 3660

    Tandberg 3820

    Tandberg 4120

    Tandberg 4220

Wangtek 525, 250

    Tecmar QT-525ES

    Wangtek 5150ES

    Wangtek 5525ES

    Wangtek 51000ES


Other Tape Drives

The following tape drives have been tested using the Windows NT Backup program.

QIC-40/QIC-80 Floppy Tape Drive 48

    Archive 51250Q (SuperHornet)

    Archive 5540

    Archive 5580

    Colorado Memory Systems Jumbo 250

    Iomega® Tape 250

    Summit Express SE120

    Summit Express SE250

    WangTek 3040

    WangTek 3080


SCSI Removable Media

The following SCSI removable media (cartridge) drives have been tested with the following adapters:  Adaptec AHA-1510, AHA-1542C, AHA-1640 and AHA-1742A; Future Domain TMC-1670, TMC-850M and MCS-600; IBM PS/2 Microchannel SCSI Host Adapter (with cache); Ultrastor 24fa.  Media must be mounted when installing Windows NT.

Hewlett-Packard Series 6300 650/C 49

Hewlett-Packard 1300T Rewritable Optical drive 49

IBM 0632 Model C2* 49

IBM 3 1/2-Inch 127mb Rewritable Optical Disk Drive MTA-3127

Insite 21mb Floptical

Iomega 21mb Floptical

Iomega Bernoulli Transportable 90 Pro

Iomega Bernoulli Transportable 150

Maxtor TMT 2m MO drive 49

Panasonic LF-7304 49

Peripheral Land Infinity 40 Turbo

Peripheral Land Infinity 88

Pinnacle Micro PMO-650 44,49

Pinnacle Micro Sierra 1.3 49

Quantum Passport XL 85

Quantum Passport XL 127

Sony SMO-S511A-11 49

Sony RMO-S350

Syquest 555 44mb cartridge

Syquest 5110 88mb cartridge


SCSI Scanners

The following SCSI scanners have been tested with the following adapters: Adaptec AHA-1510, AHA-1542c, AHA-1640 and AHA-1742A; Future Domain TMC-1670, TMC-850M and MCS-600; IBM PS/2 Microchannel SCSI Host Adapter (with cache); Ultrastor 24fa.

HP® ScanJet IIc 50

HP ScanJet IIp 50


Disk Controllers

The following disk controllers have been tested.

COMPAQ Intelligent Drive Array Controller

COMPAQ Intelligent Drive Array Controller-2

COMPAQ SMART Array Controller

DELL Drive Array Controller

DELL SCSI Array Controller 6

Olivetti EFP-2 51

UltraStor 124f EISA Disk Array Controller

Western DigitalTM 1003 (ESDI, IDE)


Hard Drives

The following hard drives have been tested.  SCSI hard drives have been tested with the following SCSI adapters:  Adaptec AHA-1510, AHA-1542C, AHA-1640 and AHA-1742A; Future Domain TMC-1670, TMC-850M and MCS-600; IBM PS/2 Microchannel SCSI Host Adapter (with cache); Ultrastor 24fa.

SCSI Hard Drives

    Conner CFP1060s

    Conner CR-6 RAID System 52,53

    Core Disk array LA-4G 54

    Maxtor MXT-540S

    Maxtor 7120SR

    Maxtor 7213SR

    Maxtor 7245SR

    Maxtor 7345SR

    Maxtor LXT340SY

    Maxtor MXT1240S

    Micropolis 1924

    Micropolis Raidion LT 2100 52,55

IDE Hard Drives

    Conner CFA540a

    Conner CFA810

    Conner CFA1080A

    Conner CFS210A

    Conner CFS420A

    Maxtor LXT340A

    Maxtor 7120AT

    Maxtor 7131AT

    Maxtor 7171AT

    Maxtor 7213AT

    Maxtor 7245AT

    Maxtor 7273AT

    Maxtor 7345AT

    Maxtor 7546AT

    Maxtor MXT-540AL


Storage Cabinets

The following peripheral storage cabinets have been tested.

Hewlett-Packard Storage System with HP EISA HBA 56,57

Hewlett-Packard Storage System with HP MCA HBA 56,57

StorageWorks Deskside Expansion Unit 58

StorageWorks Desktop Expansion Unit 58


Video Display Support

The following display adapters have been tested. Most common scan frequencies are supported.  Your video monitor should support the same resolutions and scan frequencies as your display adapter.  Please refer to README.WRI for more information on display support.

		640x480		800x600		1024x768
Display Adapter	Driver	x16	x256	x16	x256	x16	x256	Other Modes
ACTIX GRAPHICS ENGINE	S3		NI		NI		NI
ACTIX GRAPHICS ENGINE 32 PLUS	S3		NI		NI		NI
ARTIST GRAPHICS 1000i ISA 2,59	ART		NI		NI		NI	11,12
ARTIST GRAPHICS Xj1000 ISA 2,59	ART		NI		NI		NI	11,12
ATI 8514 ULTRA	ATI		NI		NI		NI
ATI GRAPHICS ULTRA PRO	ATI		NI		NI		NI	2,3,4,5,6,7,11
ATI GRAPHICS ULTRA PRO VLB	ATI		NI		NI		NI	2,3,4,5,6,7,11
ATI GRAPHICS ULTRA PLUS	ATI		NI		NI		NI	2,3,4,5,6,7,11
ATI GRAPHICS ULTRA	ATI		NI		NI		NI
ATI GRAPHICS VANTAGE	ATI		NI		NI		NI
COMPAQ AVGA	AVGA1	NI	NI	NI
COMPAQ QVISION 1024/I	QV		NI		NI		NI
COMPAQ QVISION 1024/E 59	QV		NI		NI		NI
COMPAQ QVISION 1024/I (ENHANCED)	QV		NI		NI		NI
COMPAQ QVISION 1024/E (ENHANCED)	QV		NI		NI		NI
COMPAQ QVISION 1280/I	QV		NI		NI		NI	11
COMPAQ QVISION 1280/E	QV		NI		NI		NI	11
DELL DGX	DGX		NI		NI		NI	2,5,7,9,10,11
DIAMOND SPEEDSTAR	ET4000	NI	NI	NI	NI	B	B
DIAMOND SPEEDSTAR 24X	WD	NI	NI	NI	NI	B	B
DIAMOND SPEEDSTAR PRO	CIRRUS	NI	NI	NI	NI	NI	NI
DIAMOND SPEEDSTAR PRO VLB	CIRRUS	NI	NI	NI	NI	NI	NI
DIAMOND STEALTH 24	S3		NI		NI		NI
DIAMOND STEALTH 24 VLB	S3		NI		NI		NI
DIAMOND STEALTH PRO	S3		NI		NI		NI
DIAMOND STEALTH PRO VLB	S3		NI		NI		NI
DIAMOND STEALTH VRAM	S3		NI		NI		NI
ELSA WINNER 1000	S3		NI		NI		NI
GENOA VLB	CIRRUS	NI	NI	NI	NI	NI	NI
IBM XGA	XGA®		NI				I
IBM XGA-2	XGA		NI		NI		B	1,8
MEDIAVISION THUNDER & LIGHTNING	CIRRUS	NI	NI	NI	NI	NI	NI
METHEUS PREMIER 928	S3		NI		NI		NI
METHEUS PREMIER VL-BUS 928	S3		NI		NI		NI
MICRONICS VL-BUS	S3		NI		NI		NI
NCR 77C22	NCR77C22	NI	NI	NI	NI	NI
NCR 77C22E	NCR77C22	NI	NI	NI	NI	NI	NI
NUMBER 9 GXE 59	S3		NI		NI		NI	11
ORCHID FAHRENHEIT 1280	S3		NI		NI		NI
ORCHID FAHRENHEIT VA	S3		NI		NI		NI
ORCHID FAHRENHEIT VA/VLB	S3		NI		NI		NI
ORCHID PRODESIGNER 2	ET4000	NI	NI	NI	NI	B	B
ORCHID PRODESIGNER IIS	ET4000	NI	NI	NI	NI	B	B
PARADISE WINDOWS GRAPHICS ACCELERATOR	WD	NI	NI	NI	NI	B	B
STB POWERGRAPH X-24	S3		NI		NI		NI
STB POWERGRAPH VL-24	S3		NI		NI		NI
STB WIND/X HC	S3		NI		NI		NI
TRIDENT 8900C	TRIDENT	NI	NI	NI	NI	B	B
TRIDENT 9000	TRIDENT	NI		NI		B
VIDEO SEVENTM VRAM	VIDEO7	NI	NI	NI		NI
VIDEO SEVEN VRAM II	VIDEO7	NI	NI	NI	NI	NI	NI
Common Modes in Table Above		Other Resolutions
NI	Non-Interlaced		1	640x400x256	5	800x60065k	9	1152x900x256
I	Interlaced		2	640x480x65k	6	800x600x16m	10	1152x900x65k
B	Both Interlaced and Non-Interlaced		3	640x480x16m	7	1024x768x65k	11	1280x1024x256
			4	640x480, true color	8	1040x768x256

Display adapters not listed above are expected to work if they use the following supported chip sets. Install first as Standard VGA, then select the corresponding driver from the Setup application in Program Manager.

Chip Set		Driver
ATI Mach 8		ATI
ATI Mach 32		ATI
Compaq QVision		QV
ET4000		ET4000
S3 801, 805, 911, 911A, 924, 928		S3
WD90C30		Western Digital/Paradise
WD90C31		Western Digital/Paradise
VGA		VGA

The following table shows the maximum display and color resolutions available with each video driver using different amounts of video RAM. Most display adapters can use the standard VGA driver for 16-color modes.

		Colors
Drivers	Video RAM	16	256	65k	16m	True Color
ATI	1Mb		1024x768	640x480	640x480
	2Mb		1280x1024	1024x768	800x600	640x480
Cirrus	1Mb	1024x768	1024x768
AVGA	512Kb	800x600	640x480
QV	512Kb	640x480
	1Mb		1024x768
	2Mb		1280x1024
DGX	2Mb		1280x1024	1152x900
ET4000	512Kb	1024x768	640x480
	1Mb	1024x768	1024x768
NCR 77C22	1Mb	1024x768	1024x768
S3	1Mb		1024x768
	3Mb		1280x1024
Trident	512Kb	1024x768
	1Mb	1024x768	1024x768
Video7	512Kb	1024x768	640x480
	1Mb	1024x768	1024x768
VGA	256Kb	640x480
	512Kb	800x600
WD	1Mb	1024x768	1024x768
XGA	1Mb		1040x768


Network Adapters

The following network adapters have been tested on the indicated platforms.

x86	MIPS	ALPHA	Network Adapter
X	X	X	3Com® 3C503 EtherLink II® (Coax & TP)
X	X	X	3Com 3C503/16 EtherLink® II/16 (Coax & TP)
X	X		3Com 3C507 EtherLink 16 (Coax & TP)
X	X	X	3Com 3C509 EtherLink III Parallel Tasking Adapter - ISA (Coax, TP and Combo)
X			3Com 3C523 EtherLink/MC (Coax & TP)
X			3Com 3C527 EtherLink/MC 32 Bus Mastering Adapter 2
X			3Com 3C529 EtherLink III Parallel Tasking Adapter - MCA (Coax & TP)
X	X	X	3Com 3C579 EtherLink III Parallel Tasking Adapter - EISA (Coax & TP)
X			3Com 3C770 FDDILink-F for Optical, UTP & STP 2,60
X			Advanced Micro Devices Am1500T Ethernet Adapter
X			Advanced Micro Devices Am2100 Ethernet Adapter
X			Advanced Micro Devices PCnet®
X			Advanced Micro Devices PCnet-ISA Single Chip Ethernet Controller
X			Cabletron T20XX 16/4 ISA Token Ring DNI 2
X			Cabletron T30XX 16/4 MCA Token Ring DNI 2
X			Cabletron F30XX MCA FDDI Adapter 2
X			Cabletron F70XX EISA FDDI Adapter 2
X			Cisco C321T-PC EISA FDDI EISA ADAPTER/PC 2,60
X	X		COMPAQ 32-Bit Dualspeed Token Ring Controller
X			COMPAQ 32-Bit Netflex Controller
X			COMPAQ 32-Bit Netflex Controller with Token Ring Module
X			COMPAQ 32-bit NetFlex-2 ENET-TR Controller 2
X			COMPAQ 32-bit NetFlex-2 TR Controller 2
X			COMPAQ 32-bit NetFlex-2 DualPort TR Controller 2
X			COMPAQ 32-bit NetFlex-2 DualPort ENET Controller 2
X			COMPAQ Ethernet 16TP Controller
X			COPS LTI ISA
X			Crescendo C321M-PC EISA FDDI ADAPTER/PC 2,60
X			DayStar Digital LocalTalk® Adapter
X			DCA IRMAtrac Token Ring/Convertible (incl. fiber) 2
X		X	DEC DC21040 Ethernet Controller 2
X	X	X	DEC DE100 EtherWORKS LC
X	X	X	DEC DE101 EtherWORKS LC/TP
X	X	X	DEC DE200 EtherWORKS Turbo
X	X	X	DEC DE201 EtherWORKS Turbo/TP
X	X	X	DEC DE202 EtherWORKS Turbo TP/BNC
X	X	X	DEC DE422 EtherWORKS EISA TP/BNC
X			Hewlett-Packard 27246A MC LAN Adapter/16 TP 2
X			Hewlett-Packard 27245A PC LAN Adapter/8 TP 2
X			Hewlett-Packard 27250A PC LAN Adapter/8 TL 2
X			Hewlett-Packard 27247A PC LAN Adapter/16 TP 2
X			Hewlett-Packard 27247B PC LAN Adapter/16 TP Plus 2
X			Hewlett-Packard 27252A PC LAN Adapter/16 TL Plus 2
X	X	X	IBM Token Ring Adapter 16/4
X			IBM Token Ring Adapter 16/4 /A
X			Intel 82595 Ethernet Adapter 2
X	X	X	Intel EtherExpressTM 16 PCLA8110
X	X	X	Intel EtherExpress 16C PCLA8100
X	X	X	Intel EtherExpress 16TP PCLA8120
X			Intel EtherExpress Flash 32 Ethernet Adapter 2
X	X	X	Intel EtherExpress FlashC PCLA8105
X			Intel TokenExpressTM ISA/16S 2
X			Intel TokenExpress MCA 16/4 2
X			Intel TokenExpress EISA 16/4 2
X			Intel TokenExpress EISA/32 2
X			Madge Smart 16/4 AT Ringnode 2
X			Madge Smart 16/4 EISA Ringnode 2
X			Madge Smart 16/4 MC Ringnode 2
X			Madge Smart 16/4 MC32 Ringnode 2
	X		National Semiconductor DP83932 (SONIC) Motherboard Ethernet Controller on MIPS ARC/R4000 systems
X			NCR WaveLAN/AT 2
X			NCR WaveLAN/MC 2
X	X	X	Network Peripherals NP-EISA/S FDDI
X			Network Peripherals NP-MCA/S FDDI
X			Novell®/Eagle Technology NE1000
X	X	X	Novell/Eagle Technology NE2000
X	X	X	Novell/Eagle Technology NE3200
X	X	X	Proteon ProNET-4/16 p1390 ISA Adapter
X			Olicom Token-Ring,PowerMAC MCA WS,OC-3129 2
X			Olicom Token-Ring,PowerMAC EISA WS,OC-3133 2
X			Olicom Token-Ring,PowerMAC ISA WS,OC-3117 2
X			Olicom Token-Ring,PowerMAC EISA SRV,OC-3135 2
X			Proteon ProNET-4/16 p1390 2
X			Proteon ProNET-4/16 p1392 2
X			Proteon ProNET-4/16 p1392plus 2
X			Proteon ProNET-4/16 p1892 2
X2		X	Proteon ProNET-4/16 p1990 EISA Adapter
X			Proteon ProNET-4/16 p1990plus 2
X	X	X	Standard Microsystems 8003EP EtherCardTM PLUS
X	X	X	Standard Microsystems 8013EBT EtherCard PLUS16
X	X	X	Standard Microsystems 8013EP EtherCard PLUS Elite16
X			Standard Microsystems 8013EP/A EtherCard PLUS Elite/A
X	X	X	Standard Microsystems 8013EPC EtherCard PLUS Elite16
X	X	X	Standard Microsystems 8013EW EtherCard PLUS EliteCombo
X	X	X	Standard Microsystems 8013EWC EtherCard PLUS EliteCombo
X	X	X	Standard Microsystems 8013W EtherCard PLUS Elite16T
X	X	X	Standard Microsystems 8013WB EtherCard PLUS
X	X	X	Standard Microsystems 8013WC EtherCard PLUS Elite16T
X			Standard Microsystems 8013WP/A EtherCard PLUS Elite10T/A
X			Standard Microsystems 8216C EtherCard Elite Ultra 2
X			Standard Microsystems 82M32 EtherCard Elite 32 Ultra 2
X			Thomas-Conrad TC4045 ISA Token Ring Adapter 2
X			Thomas-Conrad TC4046 MCA Token Ring Adapter 2
X			Ungermann-Bass® NIUpc
X	X		Ungermann-Bass NIUpc/EOTP
X			Ungermann-Bass NIUps/EOTPz
X			Xircom Pocket Ethernet II Adapter 2,61
X			Xircom Pocket Ethernet III Adapter 2,61


Multimedia Audio Adapters

The following multimedia audio adapters have been tested.

x86	MIPS	ALPHA	Multimedia Audio Adapter
X			COMPAQ Business Audio
X	X	X	Creative Labs Sound BlasterTM 1.x
X	X	X	Creative Labs Sound Blaster Pro 62
X	X	X	Media VisionTM Pro AudioSpectrum-16 63
X	X	X	Media Vision Pro AudioStudio 63
X	X	X	Media Vision Thunder Board 62
X	X	X	Microsoft Windows Sound System
	X		Built-in audio adapter on MIPS ARC/R4000 systems


Modems

The following modems are supported for use with Remote Access Service.

ATI 2400 etc/e

ATI 9600 etc/e

AT&T® 2224 CEO

AT&T Comsphere 3810

AT&T Comsphere 3811

AT&T Comsphere 3820

AT&T Comsphere 3830

AT&T Dataport

AT&T 4024

Bocamodem M1440

Cardinal 2400e

Cardinal 9600

Cardinal 14400

Cardinal 14400 Internal

Codex 2264

Codex 3220

Codex 3260

Codex 3261

Codex 3262

Codex 3263

Codex 3265

Codex 3260 Fast

Codex 3261 Fast

Codex 3262 Fast

Codex 3263 Fast

Codex 3265 Fast

Codex 3220 Plus

CXR Telcom 1445

DataRace RediModem V.32bis 64

Datatrek 2424AMH

Datatrek Elite 624D 65

Datatrek V.32 66

DEC PCXBF-AA 2400/9600FAX, V.42+BIS  (Data only)

DEC PCXCF-AA 2400/9600FAX, V.42+BIS  (Data only)

DEC PCXDF-AA 2400/9600FAX, V.42+BIS  (Data only)

Digicom Scout

Digicom Scout Plus

DSI 9624LE Plus

DSI 9624E

ETech UFOMATE P1496MX

Evercom 24

Evercom 24E

Evercom 24E+

Gateway 2000 Telepath Internal

GVC SM2400

GVC SM96

GVC FM14400

Hayes® Compatible 1200

Hayes Compatible 2400

Hayes Compatible 9600

Hayes Pocket Modem® 2400

Hayes SmartmodemTM 2400

Hayes Smartmodem 9600

Hayes Optima 9600

Hayes Optima 14400

Hayes Ultra 9600

Hayes Ultra 14400

Hayes V Series 9600

Intel SatisFaxtion® 100

Intel SatisFaxtion 400e

Intel 9600EX

Intel 14400EX

Macronix Maxlite Fax 9696

Macronix VOMAX 2000

Megahertz P2144 Pocket Faxmodem

Megahertz T3144 for Toshiba

Megahertz Z3144 for Zenith

Megahertz C5144 for COMPAQ LTE

MicroCom® QX 4232bis 65

MicroCom QX 4232HS

MicroGate MG96 64

MicroGate MG144 64

MicroPorte 1042

MultiTech MultiModem 224 67

MultiTech MultiModem MT932

NEC 9635E Plus

Octocom 8324 64

Octocom 8396

PDI-1000 66

Practical Peripherals 2400 Pocket

Practical Peripherals 2400SA 66

Practical Peripherals 2400MNP 65

Practical Peripherals 9600SA

Practical Peripherals 14400SA

Racal-RMD 2412

Racal-RMD 2412/2 68

Racal-RMD 3221

Racal-RMD 3222

Racal-RMD 3226

Racal-RMD 3223

Racal-RMD 9632PA

Racal-RMD 9642PA

SupraModem 2400

Supra Fax Modem 9624 Internal

Supra Fax Modem V32

Supra Fax Modem V32bis

Supra Fax Modem Plus

Telebit® QBlazer

Telebit T1000

Telebit T1500 66

Telebit T1600 65

Telebit T2000

Telebit T2500

Telebit T3000

Telebit TrailBlazer® Plus

Telebit WorldBlazer

Telebit WorldBlazer-Rackmount

UDS Motorola® V.3225 65

UDS Motorola V.3227 69

UDS Motorola V.3229

UDS Motorola FasTalk V.32/42b 69

US Robotics Courier Dual

US Robotics Courier HST

US Robotics Courier V.32bis

US Robotics Sportster 2400

US Robotics Sportster 9600

US Robotics Sportster 14400

Ven-Tel 9600 Plus II 70

Ven-Tel Pocket 24 V.42bis FAX

Ven-Tel 14400 Fax

Ven-Tel 14400 Fax Internal

Western Datacom Worldcom V32bis 66

Zoom AFX

Zoom FXTM 9624V

Zoom VFX V.32bis

ZyXel U-1496

ZyXel U-1496E


Hardware Security Hosts

The following hardware security hosts have been tested for use with Remote Access Service.

Digital Pathways Defender 1000D

Racal Gaurdata GSM

Security Dynamics ACM400


ISDN Adapters

The following ISDN adapters have been tested for use with Remote Access Service.

DigiBoard PCIMAC ISA Adapter

DigiBoard PCIMAC/4 Adapter


Multi-port Serial Adapters

The following multi-port serial adapters have been tested for use with Remote Access Service.

Comtrol Hostess 550 71

DigiBoard 2Port

DigiBoard 4Port

DigiBoard 8Port

DigiBoard CX Adapter

DigiBoard DigiCHANNEL PC/X Host Adapter for ISA bus 71

DigiBoard PC/4e Adapter

DigiBoard PC/8e Adapter

DigiBoard PC/8i Adapter

DigiBoard PC/Xem Adapter

Sealevel Systems COMM+232 /EX

Sealevel Systems VESA COMM+4

Star Gate Technologies ACL 2

Star Gate Technologies ACL MC 2

Star Gate Technologies ACL II+ 2

Star Gate Technologies ACL IIR+ 2

Star Gate Technologies AvanStar 100i 2

Star Gate Technologies AvanStar 100c 2

Star Gate Technologies AvanStar 100m 2

Star Gate Technologies Plus 8 71


Uninterruptible Power Supplies

The following uninterruptible power supplies have been tested.

American Power Conversion Back-UPS

American Power Conversion Smart-UPS

Para Systems MinuteMan

Tripp Lite BC400LAN 72

Tripp Lite BC500LAN 72

Tripp Lite BC600LAN 72

Tripp Lite BC750LAN 72

Tripp Lite BC800LAN 72

Tripp Lite BC900LAN 72

Tripp Lite BC1250LAN 72

Tripp Lite OMIN500LAN 72

Tripp Lite OMIN600LAN 72

Tripp Lite OMIN750LAN 72

Tripp Lite OMIN900LAN 72

Tripp Lite OMIN1250LAN 72

Tripp Lite OMIN2000LAN 72

Tripp Lite SMART200 72

Tripp Lite SMART400 72

Tripp Lite SMART500 72

Tripp Lite SMART600 72

Tripp Lite SMART750 72

Tripp Lite SMART900 72

Tripp Lite SMART1250 72

Tripp Lite Unison PS4.5 72

Tripp Lite Unison PS6.0 72

Tripp Lite Unison PS9.0 72

Unison (Tripp Lite) UNIPower PS


Keyboards

Any keyboard 100% compatible with those listed below.

101/102-key

IBM AT (84-key) 50


Pointing Devices

The following pointing devices have been tested. The Alpha platform supports mouseport-based pointing devices. The MIPS platform supports mouseport and serial pointing devices.

A4 Tech Serial Mouse

Acer M-SG14

AT&T 320 Mouse CA-93-6MD

CompuAdd Serial Mouse

Dexxa MF21-9F

Digital Equipment PCXAS-AA

Hewlett-Packard C1413A

Honeywell 2HW53-3E

IBM 33G3835

IBM 33G5430

ICL M-SF14-6MD

Kensington Expert Mouse Ver. 2.0

Kensington Expert Mouse Ver. 4.0

Key Tronic Trak101

Logitech CA-93-6MD

Logitech M-MD14-2

Logitech M-MD14-9F

Logitech M-MD15L

Logitech M-SF14-6MD

Logitech M-SF15-6MD

Logitech Mouseman, Bus

Logitech Mouseman, Cordless

Logitech Mouseman, Serial

Logitech PA-82-9MI

Logitech Series 9 CC-93-9F

Logitech Trackman Mouse

Logitech Trackman Portable Mouse

Logitech Trackman Stationary Mouse

Microsoft Bus Mouse (Original - Green Buttons)

Microsoft Mouse, BallPoint

Microsoft Mouse, Inport

Microsoft Mouse, PS/2 Compatible

Microsoft Mouse, Serial

Microsoft Mouse, Serial / PS/2

Microsoft Mouse 2.0, BallPoint

Microsoft Mouse 2.0, Bus

Microsoft Mouse 2.0, MousePort

Microsoft Mouse 2.0, Serial

Microsoft Mouse 2.0, Serial-MousePort

MotorMouse

Olivetti M-SE9-6MD

Sejin Electronics SWB-200

Ultra Mouse 260


Printers

Drivers are included for the following printers.  Tested models are listed with *.

Agfa Compugraphic 400PS

Agfa Compugraphic Genics

Agfa Matrix® ChromaScript v51.8

Agfa TabScript C500 PostScript® Printer v50®.3

Agfa-Compugraphic 9400P v49.3

Apple® LaserWriter® II NT v47.0

*Apple® LaserWriter II NTX v47.0

Apple LaserWriter II NTX v51.8

Apple LaserWriter II NTX-J v50.5

Apple LaserWriter IIf v2010.113

Apple LaserWriter IIg v2010.113

Apple LaserWriter Plus v38.0

Apple LaserWriter Plus v42.2

Apple LaserWriter v23.0

Apple Personal LaserWriter NTR v2010.129

Apricot Laser

APS-PS PIP with APS-6-108 v49.3 or 52.2

APS-PS PIP with APS-6-80 v49.3 or 52.2

APS-PS PIP with LZR 1200 v49.3 or 52.2

APS-PS PIP with LZR 2600 v49.3 or 52.2

AST TurboLaser-PS v47.0

AT&T 470/475

AT&T 473/478

Brother HJ-100

Brother HJ-100i

Brother HJ-770

Brother HL-10DV

Brother HL-10V

*Brother HL-4

Brother HL-4V

Brother HL-4Ve

*Brother HL-8

*Brother HL-8D

*Brother HL-8e

Brother HL-8V

Brother M-1309

Brother M-1324

Brother M-1809

Brother M-1818

Brother M-1824L

Brother M-1909

Brother M-1918

Brother M-1924L

*Bull Compuprint PageMaster 1025

Bull Compuprint PageMaster 413

Bull Compuprint PM 201

Canon® Bubble-Jet BJ-10e

Canon Bubble-Jet BJ-10ex

Canon Bubble-Jet BJ-10sx

Canon Bubble-Jet BJ-130

Canon Bubble-Jet BJ-130e

Canon Bubble-Jet BJ-20

Canon Bubble-Jet BJ-200

*Canon Bubble-Jet BJ-230

Canon Bubble-Jet BJ-300

*Canon Bubble-Jet BJ-330

Canon Bubble-Jet BJC-800

Canon LBP-4 PS-2 v51.4

Canon LBP-8III PS-1 v51.4

Canon LBP-8IIIR PS-1 v51.4

Canon LBP-8IIIT PS-1 v51.4

Canon PS-IPU Color Laser Copier v52.3

Canon PS-IPU Kanji Color Laser Copier v52.3

Citizen 120D

Citizen 120D+

Citizen 124D

Citizen 180D

Citizen 200GX

Citizen 200GX/15

Citizen 224

Citizen GSX 240 Scalable Font

Citizen GSX-130

Citizen GSX-140

Citizen GSX-140+

Citizen GSX-145

Citizen GSX-230

Citizen HSP-500

Citizen HSP-550

Citizen PN48

Citizen Prodot 24

Citizen Prodot 9

Citizen Prodot 9x

Citizen PROjet

Citizen Swift 200

Citizen Swift 24

Citizen Swift 240 Scalable Font

Citizen Swift 24e

Citizen Swift 24x

Citizen Swift 9

Citizen Swift 9x

C-Itoh 8510

Colormate PS v51.9

COMPAQ PAGEMARQ 15 v2012.015

COMPAQ PAGEMARQ 20 v2012.015

Dataproducts LZR 1260 v47.0

Dataproducts LZR 1560 v2010.127

Dataproducts LZR 960 v2010.106

Dataproducts LZR-2665 v46.2

Diconix 150 Plus

Digital Colormate PS v51.9

Digital DEClaser 1100 (LJ)

*Digital DEClaser 1100

Digital DEClaser 1150 v51.4

Digital DEClaser 1152 17 fonts

Digital DEClaser 1152 43 fonts

*Digital DEClaser 2100

Digital DEClaser 2100 plus (LJ)

Digital DEClaser 2150 plus v51.4

Digital DEClaser 2150 v51.4

*Digital DEClaser 2200

Digital DEClaser 2200 plus (LJ)

Digital DEClaser 2250 plus v51.4

Digital DEClaser 2250 v51.4

Digital DEClaser 3200 (LJ)

*Digital DEClaser 3200

Digital DEClaser 3250 v47

Digital DECmultiJET 1000

Digital DECmultiJET 2000

Digital DECwriter 95

Digital LA310

Digital LA324

Digital LA424

Digital LA70

Digital LA75

Digital LA75 Plus

Digital LN03R ScriptPrinter

Digital PrintServer 17 v48.3

Digital PrintServer 20 v48.3

Digital PrintServer 32 v48.3

Digital PrintServer 40 Plus v48.3

Digital turbo PrintServer 20

EPSON ActionLaser II

EPSON AP-3250 Scalable Font

EPSON AP-5000 Scalable Font

EPSON AP-5500 Scalable Font

EPSON Compatible 24 Pin

EPSON Compatible 9 Pin

EPSON DFX-5000

EPSON DLQ-2000

EPSON EPL-4000

EPSON EPL-4300

EPSON EPL-6000

EPSON EPL-7000

EPSON EPL-7500 v52.3

EPSON EPL-8000

EPSON EPL-8100

EPSON EX-1000

EPSON EX-800

EPSON FX-100

EPSON FX-100+

EPSON FX-1000

EPSON FX-105

EPSON FX-1050

EPSON FX-185

EPSON FX-286

EPSON FX-286e

EPSON FX-80

EPSON FX-80+

EPSON FX-800

*EPSON FX-85

EPSON FX-850

EPSON FX-86e

EPSON GQ-3500

EPSON JX-80

EPSON L-1000

EPSON L-750

EPSON LP-3000PS F2 v52.3

EPSON LP-3000PS F5 v52.3

EPSON LQ-100 Scalable Font

EPSON LQ-1000

EPSON LQ-1010

EPSON LQ-1050

EPSON LQ-1060

EPSON LQ-1070 Scalable Font

EPSON LQ-1170 Scalable Font

EPSON LQ-1500

EPSON LQ-200

*EPSON LQ-2500

*EPSON LQ-2550

EPSON LQ-400

EPSON LQ-450

EPSON LQ-500

*EPSON LQ-510

EPSON LQ-550

EPSON LQ-570 Scalable Font

EPSON LQ-800

EPSON LQ-850

EPSON LQ-850+

EPSON LQ-860

EPSON LQ-870 Scalable Font

EPSON LQ-950

EPSON LX-1050

EPSON LX-400

EPSON LX-80

EPSON LX-800

EPSON LX-810

EPSON LX-850

EPSON LX-850+

EPSON LX-86

EPSON MX-100

EPSON MX-80

EPSON MX-80 F/T

EPSON PostScript CARD v52.5

EPSON RX-100

EPSON RX-100+

EPSON RX-80

EPSON RX-80 F/T

EPSON RX-80 F/T+

EPSON SQ-1170 Scalable Font

EPSON SQ-2000

EPSON SQ-2500

EPSON SQ-2550

EPSON SQ-850

EPSON SQ-870 Scalable Font

EPSON T-750

EPSON T-1000

Fujitsu Breeze 100

Fujitsu Breeze 200

Fujitsu DL 1100

Fujitsu DL 1100 Colour

Fujitsu DL 1150

Fujitsu DL 1200

Fujitsu DL 1250

Fujitsu DL 2400

Fujitsu DL 2600

Fujitsu DL 3300

Fujitsu DL 3350

Fujitsu DL 3400

Fujitsu DL 3450

Fujitsu DL 3600

Fujitsu DL 4400

Fujitsu DL 4600

Fujitsu DL 5600

Fujitsu DL 900

Fujitsu DX 2100

Fujitsu DX 2200

Fujitsu DX 2300

Fujitsu DX 2400

Fujitsu RX7100PS v50.3

GCC BLP Elite v52.3

GCC BLP II v52.3

GCC BLP IIS v52.3

GCC Business LaserPrinter v49.2

GCC Business LaserPrinter v51.4

Generic IBM Graphics 9pin wide

Generic IBM Graphics 9pin

Gestetner GLP800-Scout v52.3

Hermes H 606 PS (13 Fonts)

Hermes H 606 PS (35 fonts)

*Hermes H 606

HP DeskJet®

*HP DeskJet 1200C

*HP DeskJet 500

HP DeskJet 510

HP DeskJet 500C

HP DeskJet 500C (Monochrome)

HP DeskJet 550C

HP DeskJet Plus

HP DeskJet Portable

HP LaserJet

HP LaserJet 2000

*HP LaserJet 4

HP LaserJet 4 PostScript v2011.110

*HP LaserJet 4Si

HP LaserJet 4Si/4Si MX PS

HP LaserJet 500+

HP LaserJet ELI PostScript v52.3

HP LaserJet IID PostScript Cartridge v52.2

*HP LaserJet IID

HP LaserJet III PostScript Cartridge v52.2

HP LaserJet III PostScript Plus v2010.118

*HP LaserJet III

HP LaserJet IIID PostScript Cartridge v52.2

HP LaserJet IIID PostScript Plus v2010.118

*HP LaserJet IIID

*HP LaserJet IIIP PostScript Cartridge v52.2

HP LaserJet IIIP PostScript Plus v2010.118

*HP LaserJet IIIP

*HP LaserJet IIISi PostScript v52.3

*HP LaserJet IIISi

HP LaserJet IIP Plus

*HP LaserJet IIP PostScript Cartridge v52.2

*HP LaserJet IIP

HP LaserJet Plus

*HP LaserJet Series II

*HP PaintJet®

*HP PaintJet XL

HP PaintJet XL 300

HP PaintJet XL 300 v2011.112

HP QuietJet®

HP QuietJet Plus

HP ThinkJet® (2225 C-D)

IBM 4019 LaserPriner PS17

*IBM 4019 LaserPrinter PS39

IBM 4029 LaserPrinter PS17

IBM 4029 LaserPrinter PS39

*IBM 4039 LaserPrinter

IBM 4039 LaserPrinter PS39

IBM 4070 IJ

IBM 4079 Color Jetprinter PS

IBM 4216-020 v47.0

IBM 4216-030 v50.5

IBM ExecJet® 4072

IBM Graphics

IBM Personal Page Printer II-31

IBM Personal Printer II 2380

IBM Personal Printer II 2381

IBM Personal Printer II 2390

IBM Personal Printer II 2391

IBM Portable 5183

*IBM Proprinter®

*IBM Proprinter II

IBM Proprinter III

IBM Proprinter X24

IBM Proprinter X24e

*IBM Proprinter XL

IBM Proprinter XL II

IBM Proprinter XL III

IBM Proprinter XL24

IBM Proprinter XL24e

IBM PS/1 2205

*IBM QuickWriter® 5204

IBM QuietWriter® III

Kodak® EktaPlus 7016

Kyocera® F-1000

Kyocera F-1000A

Kyocera F-1010

Kyocera F-1200S

Kyocera F-1800

Kyocera F-1800A

Kyocera F-2000A

Kyocera F-2010

Kyocera F-2200

Kyocera F-2200S

Kyocera F-3000

Kyocera F-3000A

Kyocera F-3010

Kyocera F-3300

Kyocera F-5000

Kyocera F-800

Kyocera F-800A

Kyocera F-820

Kyocera FS-1500 / FS-1500A

Kyocera FS-3500 / FS-3500A

Kyocera FS-5500 / FS-5500A

Kyocera FS-850 / FS-850A

LaserWriter Personal NT v51.8

LinotronicTM 100 v42.5

Linotronic 200 v47.1

Linotronic 200 v49.3

Linotronic 200/230

Linotronic 300 v47.1

Linotronic 300 v49.3

Linotronic 330 v52.3

Linotronic 330-RIP 30 v52.3

Linotronic 500 v49.3

Linotronic 530 v52.3

Linotronic 530-RIP 30 v52.3

Linotronic 630 v52.3

Mannesmann Tally® MT 130/24

Mannesmann Tally MT 131/24

Mannesmann Tally MT 150/24

Mannesmann Tally MT 151/24

Mannesmann Tally MT 230/24

Mannesmann Tally MT 330

Mannesmann Tally MT 350

Mannesmann Tally MT 360

Mannesmann Tally MT 730/735

Mannesmann Tally MT 82

Mannesmann Tally MT 90

Mannesmann Tally MT 904 Plus

Mannesmann Tally MT 908

Mannesmann Tally MT 91

Mannesmann Tally MT 92

Mannesmann Tally MT 92C

Mannesmann Tally MT 93

Mannesmann Tally MT 94

Mannesmann Tally MT 98/99

Microtek TrueLaser

Minolta SP 3000

Minolta SP 3500

Monotype® ImageMaster 1200 v52.3

Monotype Imagesetter v52.2

NEC Colormate PS/40 v51.9

NEC Colormate PS/80 v51.9

*NEC Jetmate 400

*NEC Jetmate 800

NEC Pinwriter CP6

NEC Pinwriter CP7

NEC Pinwriter P20

NEC Pinwriter P2200

NEC Pinwriter P2plus

NEC Pinwriter P30

NEC Pinwriter P3200

NEC Pinwriter P3300

NEC Pinwriter P5200

*NEC Pinwriter P5300

NEC Pinwriter P5XL

NEC Pinwriter P6

NEC Pinwriter P60

NEC Pinwriter P6200

NEC Pinwriter P6300

NEC Pinwriter P6plus

NEC Pinwriter P7

NEC Pinwriter P70

NEC Pinwriter P7plus

NEC Pinwriter P90

NEC Pinwriter P9300

NEC Pinwriter P9XL

NEC SilentWriter® 95 v2010.119

NEC Silentwriter 95 v2011.111

NEC Silentwriter 97 v2011.111

NEC Silentwriter LC 860

NEC Silentwriter LC 860 Plus

NEC Silentwriter LC890 v47.0

NEC Silentwriter LC890XL v50.5

NEC Silentwriter S102

NEC Silentwriter2 290 v52.0

NEC Silentwriter2 90 v52.2

NEC Silentwriter2 990 v52.3

OceColor G5241 PS

OceColor G5242 PostScript Printer v50.3

Oki MICROLINE 801PS+F v52.3

Oki ML 182 Elite (IBM)

Oki ML 192 Elite (IBM)

Oki ML 193 Elite (IBM)

Oki ML 280 Elite (IBM)

Oki ML 320 Elite (IBM)

Oki ML 321 Elite (IBM)

Oki ML 3410 Elite (IBM)

Oki ML 380 Elite

Oki ML 390 Elite

Oki ML 391 Elite

Oki ML 393 Elite

Oki ML 393C Elite

Oki ML 590

Oki ML 591

Oki OL-400

Oki OL-410

Oki OL-800/840

Oki OL-810

Oki OL830-PS v52.5

Oki OL840-PS v51.8

Okidata® LaserLine 6

Okidata ML 192

*Okidata ML 192-IBM

Okidata ML 192 Plus

Okidata ML 193

*Okidata ML 193-IBM

Okidata ML 193 Plus

Okidata ML 292

*Okidata ML 292-IBM

Okidata ML 293

*Okidata ML 293-IBM

Okidata ML 320

*Okidata ML 320-IBM

Okidata ML 321

*Okidata ML 321-IBM

Okidata ML 380

Okidata ML 390

Okidata ML 390 Plus

Okidata ML 391

Okidata ML 391 Plus

Okidata ML 393

Okidata ML 393 Plus

Okidata ML 393C

Okidata ML 393C Plus

Okidata ML 92-IBM

Okidata ML 93-IBM

Okidata OL-400

Okidata OL-800

Olivetti DM 109

Olivetti DM 124

Olivetti DM 124 C

Olivetti DM 124 L

Olivetti DM 309

Olivetti DM 309 L

Olivetti DM 309 S

Olivetti DM 309 SL

Olivetti DM 324

Olivetti DM 324 L

Olivetti DM 324 S

Olivetti DM 324 SL

Olivetti DM 600

Olivetti DM 600 S

Olivetti DM 624

Olivetti ETV 5000

Olivetti JP 150

Olivetti JP 350

Olivetti JP 350S

Olivetti PG 108

Olivetti PG 208 M2

Olivetti PG 306

Olivetti PG 306 PS (13 Fonts)

Olivetti PG 306 PS (35 Fonts)

Olivetti PG 308

Olivetti PG 308 HS

Olivetti PG 308 HS PostScript

Olivetti PG 404

Olivetti PG 408

Panasonic KX-P1081

Panasonic KX-P1123

Panasonic KX-P1124

Panasonic KX-P1124i

Panasonic KX-P1180

Panasonic KX-P1624

Panasonic KX-P1695

Panasonic KX-P2123

Panasonic KX-P2124

Panasonic KX-P2180

Panasonic KX-P2624

Panasonic KX-P4410

Panasonic KX-P4420

Panasonic KX-P4430

*Panasonic KX-P4450

Panasonic KX-P4450i

Panasonic KX-P4451

Panasonic KX-P4455 v51.4

QMS® 1725 Print System

QMS 2025 Print System

QMS 3225 Print System

QMS 420 Print System v2011.22 r15

QMS 4525 Print System

QMS 860 Print System v2011.22 r15

*QMS ColorScript 100 Model 10 v50.3

QMS ColorScript 100 Model 20 v50.3

QMS ColorScript 100 Model 30 v50.3

QMS ColorScript 100 Model 30si

QMS ColorScript 100 v49.4

QMS ColorScript 210 v2011.22

QMS ColorScript 230 v2011.22

QMS PS Jet Plus v46.1

QMS PS Jet v46.1

QMS-PS® 1700 v52.4

QMS-PS 2000 v52.4

QMS-PS 2200 v51.0 or 52.3

QMS-PS 2210 v51.0 or 52.3

QMS-PS 2220 v51.0 or 52.3

QMS-PS 410 v52.4

QMS-PS 800 Plus v46.1

QMS-PS 800 v46.1

*QMS-PS 810 Turbo v. 51.7

*QMS-PS 810 v47.0

QMS-PS 815 MR v52.4

QMS-PS 815 v52.4

QMS-PS 820 Turbo v51.7

QMS-PS 820 v51.7

QMS-PS 825 MR v52.4

QMS-PS 825 v52.4

QuadLaser I

Qume ScripTEN v47.0

Ricoh LP-1200

Ricoh PC Laser 6000-PS v50.5

*Royal CJP 450

Scantext 2030-51 v49.3 or 52.2

Schlumberger 5232 Color PostScript Printer v50.3

Seiko ColorPoint PS Model 04

Seiko ColorPoint PS Model 14

*Seiko Professional ColorPoint 8BPP

Seikosha LT-20

Seikosha SL-80 IP

Seikosha SL-92

Seikosha SL-92 Plus

Seikosha SP-1900

Seikosha SP-1900+

Seikosha SP-2000

Seikosha SP-2400

Seikosha SP-2415

Sharp JX-9300

Sharp JX-9500

Sharp JX-9500E

Sharp JX-9500H

Sharp JX-9600

Sharp JX-9700

Sharp JX-9700E

Shinko Color CHC-746PSJ PostScript Printer v52.2

Star FR-10

Star FR-15

Star LaserPrinter 4

Star LaserPrinter 4 III

Star LaserPrinter 5

Star LaserPrinter 5 EX

Star LaserPrinter 8

Star LaserPrinter 8 DB

Star LaserPrinter 8 DX

Star LaserPrinter 8 II

Star LaserPrinter 8 III

Star LC-10

Star LC-10 Colour

Star LC-100 Colour

Star LC-15

Star LC-20

Star LC-200

Star LC24-10

Star LC24-100

Star LC24-15

Star LC24-20

Star LC24-200

Star LC24-200 Colour

Star NB24-10

Star NB24-15

Star NL-10

Star NX-1000

Star NX-1000 Rainbow

Star NX-1001

Star NX-1020 Rainbow

Star NX-1500

Star NX-2400

Star NX-2410

Star NX-2415

Star NX-2420

Star NX-2420 Rainbow

Star NX-2430

Star SJ-48

Star XB-2410

Star XB-2415

Star XB-2420

Star XB-2425

Star XB24-10

Star XB24-15

Star XB24-200

Star XB24-250

Star XR-1000

Star XR-1020

Star XR-1500

Star XR-1520

Star ZA-200

Star ZA-250

Tandy LP-1000

Tegra Genesis

Tektronix® PhaserTM 200e with 17 fonts v2011.108(3)

Tektronix Phaser 200e with 39 fonts v2011.108(3)

Tektronix Phaser 200i v2011.108(3)

Tektronix Phaser II PX

Tektronix Phaser II PXe v2010.128 with 17 fonts

Tektronix Phaser II PXe v2010.128 with 39 fonts

Tektronix Phaser II PXi v2010.116

Tektronix Phaser II PXi v2011.108

Tektronix Phaser II PXiJ v2011.108

Tektronix Phaser III PXi v2010.116

*Tektronix Phaser III PXi v2011.108

Tektronix Phaser III PXiJ v2011.108

Tektronix Phaser IISD v2011.108

Tektronix Phaser PX

TI® 2115 13 fonts v47.0

TI 2115 35 fonts v47.0

TI 850/855

TI microLaser PS17 v.52.1

TI microLaser PS35 v.52.1

TI microLaser XL PS17 v.52.1

TI microLaser XL PS35 v.52.1

TI microLaser16 Turbo v2010.119

TI microLaser6 Turbo v2010.119

TI microLaser9 Turbo v2010.119

TI OmniLaserTM 2108 v45.0

TI Omnilaser 2115 v47.0

Toshiba GX-400

Toshiba PageLaser12

Triumph Adler SDR 7706

Triumph Adler SDR 7706 PS13

Triumph Adler SDR 7706 PS35

Unisys AP9210

Unisys AP9210 17 Fonts v52.1

Unisys AP9210 39 Fonts v52.1

Unisys AP9415 v47.0

Varityper 4000-L300 v52.3

Varityper 4000-L330 v52.3

Varityper 4000-L500 v52.3

Varityper 4000-L530 v52.3

Varityper 4200B-P v49.3 or 52.2

Varityper 4300P v49.3 or 52.2

Varityper Series 4000-5300 v49.3 or 52.2

Varityper Series 4000-5330 v49.3 or 52.2

Varityper Series 4000-5500 v52.2

Varityper VT-600P

Varityper VT 600P v48.0

Varityper VT 600W v48.0

Varityper VT4_510A v52.3

Varityper VT4990 v52.3

VT4_530A v52.3

VT4_530B v52.3

VT4_530C v52.3

VT4_533B v52.3

VT4_533C v52.3

VT4_53EA v52.3

VT4_53EB v52.3

VT4_550A v52.3

VT4_550B v52.3

VT4_550C v52.3

VT4_551A v52.3

VT4_563A v52.3

VT4_563B v52.3

Wang LCS15 FontPlus

Wang LCS15

Wang LDP8

Xerox® DocuTech 135 v2010.130

Xerox DocuTech 85 v2010.130

Xerox DocuTech 90 v2010.130


Technical Notes

The Windows NT Driver Library is provided on the Windows NT CD-ROM in the \DRVLIB directory, as well as several locations for electronic transmission. Please see the section at the end of this document for instructions on downloading and accessing Windows NT Driver Library drivers.

     1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

     2	This device requires a driver from the Windows NT driver Library.  See the following section on accessing these drivers.

     3	Tested with the Mylex DAC 960 SCSI Host Adapter.

     4	If this model was purchased prior to March 1993, contact Data Storage Marketing for compatibility verification.

     5	To install Windows NT on this system, TMV1.sys on the Windows NT Setup disk 1 must be renamed or removed.

     6	Refer to SETUP.TXT for information on configuring this machine/device before installation.

     7	Windows NT does not currently support Advanced Power Management (APM).

     8	This system requires an ABIOS.SYS driver dated after 11/1/93 to support IDE drives.  Call Microsoft Product Support Services to obtain this update.

     9	To run Windows NT 3.1 on this system contact the IBM HelpCenter at 1-800-772-2227.

    10	This system only supports 640x480x16 video resolution.

    11	Patch required for this IBM Thinkpad model.  It is available on CompuServe in the WINNT forum in library 2 and also in the same locations as the Windows NT Driver Library.

    12	Contact the manufacturer for information on running Windows NT on this machine.

    13	IDE drives greater than 500MB are only supported with BIOS Version 1.23 or later, with BIOS setting for IDE in standard mode.

    14	Tested with the DPT 2012b SCSI Host Adapter.

    15	Only the NCR 53c710 SCSI Host Adapter is supported in this machine.

    16	Tested with firmware revisions 3.10 and 3.20.

    17	Problems may be encountered using SCSI Removable Media (cartridge) drives on this adapter on this platform.

    18	This adapter requires an active terminator for proper performance.

    19	This adapter must be configured for 5 MB/second asynchronous I/O to work with listed CD-ROM drives from NEC.

    20	This adapter must be configured for 5 MB/second asynchronous I/O to work with listed CD-ROM drives from Chinon, Hitachi, and NEC.

    21	Tested with the Unisys PW2 Advantage 3256 (Flemington).

    22	Tested with the Unisys PW2 Advantage Plus MPE 4668.

    23	Adapter should be configured for write through cache when used with Removable Media Drives.

    24	Scanners are not supported with this adapter.

    25	CD-audio, tape drives, and scanners are not supported on this controller.

    26	To use this adapter, at least one device on the bus must provide termination power.

    27	Refer to SETUP.TXT for information on configuring this adapter.

    28	SCSI BIOS dated before 1991 requires PS/2 Reference Diskette version 1.12 or later.

    29	This adapter cannot be used for CD Setup.  To install Windows NT with this adapter, use the WINNT.EXE Setup method.

    30	Tested with COMPAQ Portable 486c.

    31	Tested with NCR System 3000 Model 3350.

    32	This adapter is only supported on IRQ-5.

    33	This adapter is only supported for use with scanners and CD-ROM drives.

    34	Tested with firmware revision 005.

    35	Tested with firmware revision 008.

    36	This drive is not supported for use with the Adaptec AHA-1542c.

    37	This drive is not supported for use with the Future Domain TMC-850M and TMC-1670 adapters.

    38	This drive requires double-termination when used with the Adaptec AHA-1742A.

    39	The Adaptec AHA-1640 and Ultrastor 24f support only a single disk when used with this drive.  This drive is not supported for use with the Future Domain MCS-600 adapter.

    40	Requires firmware revision 1.10C to function properly with Windows NT.

    41	Supported with CD-ROM drives based on Panasonic CR-52x and CR-56x models only.

    42	This drive is not supported with the Adaptec AHA-1640 adapter.

    43	Requires firmware version 484 or later for proper operation.

    44	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).

    45	This drive is not supported with the Future Domain TMC-850M(ER).

    46	This drive is not supported with the UltraStor 24fa adapter.

    47	This drive is not supported with the Adaptec AHA-1742A adapter.

    48	For use with floppy controllers.  Separate interface controllers for these types of drives are not supported.

    49	Requires that 512-byte sector-sized media be mounted during installation.

    50	Supported on x86 only.

    51	This adapter is currently supported in its ESC-1/ESC-2 compatibility mode only.

    52	This has been Fault-Tolerance (RAID) tested using Windows NT Advanced Server.

    53	Also tested with the BusLogic BT-747 supplied with this unit.

    54	Tested with Firmware V. 0.30.

    55	Not supported with the Future Domain TMC-850m.

    56	Tested with HP C2225B tape drive, HP C2229B disk drive, and HP C2226A CD-ROM drive.

    57	HP Storage Systems were tested with the appropriate HP SCSI Host Adapters.

    58	Tested with appropriate StorageWorks options including CD-ROM, Tape, and Hard Drives.

    59	Also supported on Alpha platforms.

    60	FDDI tested only.

    61	Not compatible with IBM Thinkpad 700.

    62	Supported in Sound Blaster 1.x compatibility mode.

    63	Not supported in Sound Blaster 1.x compatibility mode.

    64	Error control and flow control forced on.

    65	Advanced features disabled.

    66	Supported as a client modem only.

    67	Flow control forced on.

    68	Maximum DTE speed set to 2400.

    69	Maximum DTE speed set to 9600.

    70	Modem compression forced on.

    71	Tested as standard serial ports only.

    72	Using Tripp Lite cable PN 73-0665, set Power Failure Signal, Low Battery Signal, and Remote UPS Shutdown to Positive.


Updates
How To Find New Drivers in the Windows NT Driver Library (WNTDL)

COMPUSERVE

A.	If you are using WinCIMSM:

1.	From the Services menu, select GO.

2.	Type MSL in the GO dialog box.

3.	Select 2 to scan.

4.	Search for WNTDL to view the whole WNTDL list or another key word to view specific files.

B.	If you are not using WinCIM, log onto CompuServe, type GO MSL, then follow instructions 3 and 4 above.

ONLINE

A.	Log onto OnLine.

1.	From the Database menu, select the option to Select DB.

2.	Choose the Software Library option.

3.	From the Software Library option, select the option Host Items.

4.	In the Query box, type WNTDL to review the whole WNTDL list or another key word to view a specific file.

B.	To get more information on a specific file, highlight the file with the cursor and press <Enter>. This brings up more details about the file.

GENieTM

Log onto Genie.

1.	From the main menu, select option 5 - Computing Services.

2.	From the Computing Services menu, select option 6 - IBM PC/TANDY Roundtables.

3.	From the IBM PC/TANDY Roundtables menu, select option 3 - Software Libraries.

4.	From the Software Libraries Menu, select option 3 - Search File Directory.

5.	Type WNTDL as the search string to view the WNTDL list or any other key word to view a specific file.

MICROSOFT DOWN LOAD SERVICES

Log onto MSDL by calling (206) 936-6735.

1.	Enter name and location.

2.	From the main menu, press F for File index.

3.	Select L to list the whole WNTDL list or E to examine a specific file.

IF YOU DO NOT HAVE A MODEM

You can obtain an individual driver from the WNTDL on a disk by calling Microsoft Product Support Services at (206) 637-7098.


Disclaimer

While we have endeavored to supply as complete and accurate a list as possible, MICROSOFT MAKES NO WARRANTIES, EXPRESS OR IMPLIED, AS TO THE COMPLETENESS AND ACCURACY OF THIS LIST.  This list does not constitute an endorsement of any particular manufacturer.

Microsoft and BallPoint are registered trademarks and Windows and Windows NT are trademarks of Microsoft Corporation.


1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.


2	This device requires a driver from the Windows NT driver Library.  See the following section on accessing these drivers.


3	Tested with the Mylex DAC 960 SCSI Host Adapter.


4	If this model was purchased prior to March 1993, contact Data Storage Marketing for compatibility verification.


5	To install Windows NT on this system, TMV1.sys on the Windows NT Setup disk 1 must be renamed or removed.


6	Refer to SETUP.TXT for information on configuring this machine/device before installation.


7	Windows NT does not currently support Advanced Power Management (APM).


8	This system requires an ABIOS.SYS driver dated after 11/1/93 to support IDE drives.  Call Microsoft Product Support Services to obtain this update.


9	To run Windows NT 3.1 on this system contact the IBM HelpCenter at 1-800-772-2227.


10	This system only supports 640x480x16 video resolution.


11	Patch required for this IBM Thinkpad model.  It is available on CompuServe in the WINNT forum in library 2 and also in the same locations as the Windows NT Driver Library.


12	Contact the manufacturer for information on running Windows NT on this machine.


13	IDE drives greater than 500MB are only supported with BIOS Version 1.23 or later, with BIOS setting for IDE in standard mode.


14	Tested with the DPT 2012b SCSI Host Adapter.


15	Only the NCR 53c710 SCSI Host Adapter is supported in this machine.


16	Tested with firmware revisions 3.10 and 3.20.


17	Problems may be encountered using SCSI Removable Media (cartridge) drives on this adapter on this platform.


18	This adapter requires an active terminator for proper performance.


19	This adapter must be configured for 5 MB/second asynchronous I/O to work with listed CD-ROM drives from NEC.


20	This adapter must be configured for 5 MB/second asynchronous I/O to work with listed CD-ROM drives from Chinon, Hitachi, and NEC.


21	Tested with the Unisys PW2 Advantage 3256 (Flemington).


22	Tested with the Unisys PW2 Advantage Plus MPE 4668.


23	Adapter should be configured for write through cache when used with Removable Media Drives.


24	Scanners are not supported with this adapter.


25	CD-audio, tape drives, and scanners are not supported on this controller.


26	To use this adapter, at least one device on the bus must provide termination power.


27	Refer to SETUP.TXT for information on configuring this adapter.


28	SCSI BIOS dated before 1991 requires PS/2 Reference Diskette version 1.12 or later.


29	This adapter cannot be used for CD Setup.  To install Windows NT with this adapter, use the WINNT.EXE Setup method.


30	Tested with COMPAQ Portable 486c.


31	Tested with NCR System 3000 Model 3350.


32	This adapter is only supported on IRQ-5.


33	This adapter is only supported for use with scanners and CD-ROM drives.


34	Tested with firmware revision 005.


35	Tested with firmware revision 008.


36	This drive is not supported for use with the Adaptec AHA-1542c.


37	This drive is not supported for use with the Future Domain TMC-850M and TMC-1670 adapters.


38	This drive requires double-termination when used with the Adaptec AHA-1742A.


39	The Adaptec AHA-1640 and Ultrastor 24f support only a single disk when used with this drive.  This drive is not supported for use with the Future Domain MCS-600 adapter.


40	Requires firmware revision 1.10C to function properly with Windows NT.


41	Supported with CD-ROM drives based on Panasonic CR-52x and CR-56x models only.


42	This drive is not supported with the Adaptec AHA-1640 adapter.


43	Requires firmware version 484 or later for proper operation.


44	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).


45	This drive is not supported with the Future Domain TMC-850M(ER).


46	This drive is not supported with the UltraStor 24fa adapter.


47	This drive is not supported with the Adaptec AHA-1742A adapter.


48	For use with floppy controllers.  Separate interface controllers for these types of drives are not supported.


49	Requires that 512-byte sector-sized media be mounted during installation.


50	Supported on x86 only.


51	This adapter is currently supported in its ESC-1/ESC-2 compatibility mode only.


52	This has been Fault-Tolerance (RAID) tested using Windows NT Advanced Server.


53	Also tested with the BusLogic BT-747 supplied with this unit.


54	Tested with Firmware V. 0.30.


55	Not supported with the Future Domain TMC-850m.


56	Tested with HP C2225B tape drive, HP C2229B disk drive, and HP C2226A CD-ROM drive.


57	HP Storage Systems were tested with the appropriate HP SCSI Host Adapters.


58	Tested with appropriate StorageWorks options including CD-ROM, Tape, and Hard Drives.


59	Also supported on Alpha platforms.


60	FDDI tested only.


61	Not compatible with IBM Thinkpad 700.


62	Supported in Sound Blaster 1.x compatibility mode.


63	Not supported in Sound Blaster 1.x compatibility mode.


64	Error control and flow control forced on.


65	Advanced features disabled.


66	Supported as a client modem only.


67	Flow control forced on.


68	Maximum DTE speed set to 2400.


69	Maximum DTE speed set to 9600.


70	Modem compression forced on.


71	Tested as standard serial ports only.


72	Using Tripp Lite cable PN 73-0665, set Power Failure Signal, Low Battery Signal, and Remote UPS Shutdown to Positive.


 10	This system only supports 640x480x16 video resolution.

 11	Patch required for this IBM Thinkpad model.  It is available on CompuServe in the WINNT forum in library 2 and also in the same locations as the Windows NT Driver Library.


 6	Refer to SETUP.TXT for information on configuring this machine/device before installation.

 10	This system only supports 640x480x16 video resolution.


 12	Contact the manufacturer for information on running Windows NT on this machine.

 15	Only the NCR 53c710 SCSI Host Adapter is supported in this machine.


 2	This device requires a driver from the Windows NT driver Library.  See the following section on accessing these drivers.

 23	Adapter should be configured for write through cache when used with Removable Media Drives.


 26	To use this adapter, at least one device on the bus must provide termination power.

 27	Refer to SETUP.TXT for information on configuring this adapter.


 24	Scanners are not supported with this adapter.

 29	This adapter cannot be used for CD Setup.  To install Windows NT with this adapter, use the WINNT.EXE Setup method.


 26	To use this adapter, at least one device on the bus must provide termination power.

 27	Refer to SETUP.TXT for information on configuring this adapter.

 32	This adapter is only supported on IRQ-5.


 26	To use this adapter, at least one device on the bus must provide termination power.

 27	Refer to SETUP.TXT for information on configuring this adapter.

 29	This adapter cannot be used for CD Setup.  To install Windows NT with this adapter, use the WINNT.EXE Setup method.

 33	This adapter is only supported for use with scanners and CD-ROM drives.


 26	To use this adapter, at least one device on the bus must provide termination power.

 32	This adapter is only supported on IRQ-5.


 44	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).

 49	Requires that 512-byte sector-sized media be mounted during installation.


 52	This has been Fault-Tolerance (RAID) tested using Windows NT Advanced Server.

 53	Also tested with the BusLogic BT-747 supplied with this unit.


 52	This has been Fault-Tolerance (RAID) tested using Windows NT Advanced Server.

 55	Not supported with the Future Domain TMC-850m.


 56	Tested with HP C2225B tape drive, HP C2229B disk drive, and HP C2226A CD-ROM drive.

 57	HP Storage Systems were tested with the appropriate HP SCSI Host Adapters.


 2	This device requires a driver from the Windows NT driver Library.  See the following section on accessing these drivers.

 59	Also supported on Alpha platforms.


 2	This device requires a driver from the Windows NT driver Library.  See the following section on accessing these drivers.

 60	FDDI tested only.


 2	This device requires a driver from the Windows NT driver Library.  See the following section on accessing these drivers.

 61	Not compatible with IBM Thinkpad 700.