Windows NT 3.5 HCL Contents

Microsoft Windows NT Version 3.5

Hardware Compatibility List

The following computers and peripherals have been tested and have passed compatibility testing with Windows NT 3.5 as of November, 1994.  Some computers may be sold with peripherals that are not yet supported by the Windows NT operating system, or that require a device driver supplied by the manufacturer. We have not tested every computer and/or device in all possible configurations.  Please refer to the SETUP.TXT file on the install media for additional compatibility information when installing Windows NT 3.5.

Attached as an addendum is the September 1994 update of the Windows NT 3.1 x86 Architecture Uniprocessor Computers Hardware Compatibility List. All computer systems listed on the addendum are expected to run with the Windows NT 3.5 Product.  If you encounter problems while running Windows NT 3.5, please file a bug report by filling out 'PROBREP.TXT' located in the \i386 directory on Windows NT 3.5 CD-ROM or floppy disk #2 of the Windows NT 3.5 installation disks and submit it as instructed in PROBREP.TXT.

Items listed with footnote number 1 require one of the device drivers available in the \DRVLIB directory on the Windows NT 3.5 CD-ROM.

Items listed with footnote number 2 are supported with device drivers available in the Windows NT Driver Library.  Please see the section at the end of this document for information on accessing this library.

Updates to these lists will appear in Library 1 of the WINNT (GO WINNT) forum or Library 17 of the MSWIN32 forum (GO MSWIN32) on CompuServe® Information Services.


Systems Menu
Microsoft Windows NT Version 3.5

Hardware Compatibility List

Systems Menu

x86 Architecture Uniprocessor Computers

x86 Architecture Multiprocessor Computers

MIPS® RISC Architecture Computers

MIPS RISC Multiprocessor Architecture Computers

Digital Alpha AXP™ RISC Architecture Computers

Digital Alpha AXP RISC Multiprocessor Architecture Computers

Processor Upgrade Products


SCSI Menu
Microsoft Windows NT Version 3.5

Hardware Compatibility List

SCSI Menu

SCSI Host Adapters

SCSI CD-ROM Drives

SCSI Tape Drives

SCSI Removable Media

SCSI Scanners


Non-SCSI Menu
Microsoft Windows NT Version 3.5

Hardware Compatibility List

Non-SCSI Menu

Non-SCSI CD-ROM Drives

Non-SCSI Tape Drives


Drive Systems Menu
Microsoft Windows NT Version 3.5

Hardware Compatibility List

Drive Systems Menu

Hard Drives

RAID Systems

Disk ControllersStorage Cabinets


Communications Menu
Microsoft Windows NT Version 3.5

Hardware Compatibility List

Communications Menu

Network Adapters

Modems

Hardware Security Hosts

ISDN Adapters

Multi-port Serial Adapters

X.25 Adapters

Third Party Remote Access Servers


Accessories Menu
Microsoft Windows NT Version 3.5

Hardware Compatibility List

Accessories Menu

Keyboards

Pointing Devices

Uninterruptible Power Supplies

Multimedia Audio Adapters


Information Menu
Microsoft Windows NT Version 3.5

Hardware Compatibility List

Information Menu

Technical Notes

Updates

Disclaimer


x86 Architecture Uniprocessor Computers

The following systems have been tested.

Absolute Computer 486/66 EISA CD SERVER

ACD OPTIMA 486 DX 33 VL

ACD Optima VLB 486SX-33

ACER 17000 SMP (Model AA17853N)

ACER AcerAcros 486DX2/66 (Desktop)

ACER AcerAltos 6030 (486DX2/66, Desktop)

ACER AcerAltos 6030 (Pentium™/60, Desktop)

ACER AcerAltos 6031 (486DX2/66, Mini-tower)

ACER AcerAltos 6031 (Pentium/60, Mini-Tower)

ACER AcerAltos 6031 (Pentium/90, Desktop)

ACER AcerAltos 6031 (Pentium/90, Mini-Tower)

ACER AcerAltos 6051 (486DX2/66)

ACER AcerAltos 6051 (486DX4/100)

ACER AcerAltos 6051-8 (Pentium/60, Mini-Tower)

ACER AcerAltos 6051-C (Pentium/90, Mini-Tower)

ACER AcerAltos 700/e (486DX2/66)

ACER AcerAltos 700/e (486DX4/100)

ACER AcerAltos 700/e (Pentium/100)

ACER AcerAltos 700/e (Pentium/60, Mini-Tower)

ACER AcerAltos 700/e (Pentium/90, Mini-Tower)

ACER AcerAltos 700/i® (486DX2/66, Desktop)

ACER AcerAltos 700/i (DX2/66, Mini-Tower)

ACER AcerAltos 700/i (Pentium/60, Desktop)

ACER AcerAltos 700/i (Pentium/60, Mini-Tower)

ACER AcerAltos 700/i (Pentium/90, Desktop)

ACER AcerAltos 700/i (Pentium/90, Mini-Tower)

ACER AcerAltos 7000 (486DX2/66)

ACER AcerAltos 7000 (Model F566TU)

ACER AcerAltos 7000 (Model F590TU)

ACER AcerAltos 7000 (Model FT00TU)

ACER AcerAltos 7000 (Model FT66TU)

ACER AcerAltos 7000 (Pentium/60)

ACER AcerAltos 7000 (Pentium/90)

ACER AcerAltos 7055 (Pentium/100)

ACER AcerAltos 7055-8 (Pentium/60, Tower)

ACER AcerAltos 7055-C (Pentium/90, Tower)

ACER AcerAltos 800 Model AA868C

ACER AcerAltos 900 (486DX2/66, Desktop)

ACER AcerAltos 900 (486DX2/66, Mini-Tower)

ACER AcerAltos 900 (Pentium/60, Desktop)

ACER AcerAltos 900 (Pentium/60, Mini-Tower)

ACER AcerAltos 900 (Pentium/90, Desktop)

ACER AcerAltos 900 (Pentium/90, Mini-Tower)

ACER AcerAltos 9000 (486DX2/66)

ACER AcerAltos 9000 (486DX4/100)

ACER AcerAltos 9000 (Pentium/100)

ACER AcerAltos 9000 (Pentium/60, Desktop/Mini-Tower/Tower)

ACER AcerAltos 9000 (Pentium/90, Desktop/Mini-Tower/Tower)

ACER AcerFrame 1000 (Model 1750)

ACER AcerMate 433sp (486SX/33)

ACER AcerMate 466d (Model MT66D3)

ACER AcerMate 466dp (486DX2/66)

ACER AcerPower /M (486DX2/66)

ACER AcerPower /M (486DX4/100)

ACER AcerPower /M (Pentium/100)

ACER AcerPower /M (Pentium/60, Mini-Tower)

ACER AcerPower /M (Pentium/90, Mini-Tower)

ACER AcerPower 400de (Model PT100E)

ACER AcerPower 433sp (486SX/33)

ACER AcerPower 466d (486DX2/66, Desktop)

ACER AcerPower 466de (486DX2/66)

ACER AcerPower 466dp (486DX2/66)

ACER AcerPower 466dvp (486DX2/66, Desktop)

ACER AcerPower 466dvp (486DX2/66, Minitower)

ACER AcerPower 486/33

ACER AcerPower 486vp (486DX2/66)

ACER AcerPower 486vp (486DX4/100)

ACER AcerPower 486vp (486DX4/100, Minitower)

ACER AcerPower 500h (Pentium/100, Mini-Tower)

ACER AcerPower 500p (Pentium/100)

ACER AcerPower 5010 (486DX2/66, Desktop)

ACER AcerPower 5010 (486DX4/100, Desktop)

ACER AcerPower 5011 (486DX4/100, Minitower)

ACER AcerPower 560e (Pentium/60)

ACER AcerPower 560p (Pentium/60)

ACER AcerPower 560pt (Model P560M)

ACER AcerPower 560tu (Model P560TU)

ACER AcerPower 566e (Pentium/66)

ACER AcerPower 566p (Pentium/66)

ACER AcerPower 566pt (Model P560M)

ACER AcerPower 566tu (Model P560TU)

ACER AcerPower 575h (Pentium/75)

ACER AcerPower 575p (Pentium/75)

ACER AcerPower 590e (Model P590E)

ACER AcerPower 590h (Pentium/90)

ACER AcerPower 590p (Pentium/90)

ACER AcerPower 9000 (Model P560E)

ACER AcerPower 9000 (Model P566E)

ACER AcerPower 9000 (Model P590E)

ACER AcerPower 9000 (Model PT100E)

ACER AcerPower 9000 (Model PT66E)

ACER AcerPower 9000 Series Model 9813N

ACMA 486/66

ACMA P66

ACMA P90

Actech ACTion 486-33 PCI

Actech ACTion 486DX-33 GREEN VLB

Actech ACTion 486DX-50 GREEN VLB

Actech ACTion 486DX-50 PCI

Actech ACTion 486DX/2-66 GREEN VLB

Actech ACTion 486DX/2-66 PCI

Actech ACTion 486DX/4-100 GREEN VLB

Actech ACTion EISA 486DX-50

Actech ACTion EISA 486DX2-66

Actech ACTion P60 Pentium PCI

Actech ACTion Systems P90 Pentium

ADD-X TYPHON

ADD-X XENON 2

ADD-X ZEPHYR

ADS INTEGRATION SERIES 486 VESA®

ADS IS PENTIUM 60 VESA

ADS PRO 486 EISA+VESA

ADS PRO 486 PCI

ADS PRO 586 EV PENTIUM

ADS PRO 586 PENTIUM

ADS PRO 586 VESA/PCI

ADS PRO SERIES 486 VESA

ADS PRO SERIES 590

Advance Interface EXPRESSSM MICRO PENTIUM 66

Advance Interface EXPRESS MICRO PENTIUM 90

Akhter Group  S486SXL-40

Alfa DELTACOM PCI/VLB 486

ALR® BusinessVEISA 4/33D

ALR Classic® Xe (1p)

ALR Evolution IV 4/33s

ALR Evolution IV 4/66d

ALR Evolution IV 4E/33s

ALR Evolution IV 4E/66d

ALR Evolution IV ST 4/33s

ALR Evolution IV ST 4/66d

ALR Evolution IV ST 4/DX4

ALR Evolution V ST/60 VL

ALR Evolution V ST/66 PCI

ALR Evolution V ST/66 VL

ALR Evolution V ST/90

ALR Evolution V STe

ALR Evolution V STP/60

ALR Evolution V X/66 PCI

ALR Evolution V X/90

ALR Evolution V-Q/60 3

ALR Evolution V-Q/66 3

ALR Evolution V/60

ALR Evolution V/66

ALR Evolution VQ-90 3

ALR Evolution X 4/33s

ALR Evolution X 4/66d

ALR Evolution X 4/DX4

ALR Flyer SD32 4/66d

ALR POWERPRO SMP 4/33

ALR POWERPRO/MC SMP 4/50D

ALR PROVEISA LT 4/66d

ALR PROVEISA LT 4/DX4

ALR PROVEISA SMP 4/66D

ALR Revolution MP P/60

ALR Revolution MP P/66

ALR Revolution MP P/90 (1p) 3

ALR Revolution Q-SMP P/100 (1p) 3

ALR Revolution Q-SMP P/90 (1p) 3

Amax Engineering 486DX2/66 PowerStation™

Amax Engineering P6 PowerStation

Amax Engineering P9 PowerStation

Ambra 486DX/50

Ambra D466E/VL

Ambra DP60/PCI

Ambra DP60E/VL 4

Ambra DP66E/VL

Ambra TP60E/VL 4

American Multisystems InfoGOLD P60NT

AMI® ATLAS PCI

AMI ATLAS VIP

AMI Enterprise III

AMI Enterprise IV

AMI EXCALIBUR II PCI

AMI Excalibur PCI

AMI Excalibur PCI/EISA

AMI Excalibur VLB

AMI Super Voyager PCI

AMI Super Voyager VLB II

AMI Super Voyager VLB III

AMI Titan II PCI EISA

AmPAQ DaVinci PCI466S

AmPAQ DaVinci Pentium PCI60S

AmPAQ DaVinci VLB433D

AmPAQ DaVinci VLB466D

AOX mcmaster 486250

Apricot® FT//ex 486DX2/66

Apricot FT//ex Pentium 90

Apricot FTe 486DX2/66

Apricot LS-Pro 486DX4/100

Apricot XEN-PC 486

Apricot XEN-PC 560

Apricot XEN-PC 590

ARCHE Artec Green 486DX2/66

Area Electronics AES-560GPIP Pentium 60 ISA/PCI

Area Electronics AES-560PA

Area Electronics AES-590DP Pentium 90 EISA/PCI

Area Electronics AES-590GPIP Pentium 90 ISA/PCI

Area Electronics AES-590PSI

Ares 486-33 VLB

Ariel 486DX2-66EVS

Ariel 486DX2-66VLS3

Ariel Atlas 90 Pentium PS Workstation

ASEM 410M

ASEM 433M

ASEM 450M

ASEM 466M

ASEM 486DM-100 (incl. DP and DE Models)

ASEM 486DM-33 (incl DP and DE Models)

ASEM 486DM-33E (incl. DP and DE Models)

ASEM 486DM-40E (incl. DP and DE Models)

ASEM 486DM-50 (incl DP and DE Models)

ASEM 486DM-50E (incl. DP and DE Models)

ASEM 486DM-66 (incl. DP and DE Models)

ASEM 486DM-S50 (incl. DP and DE Models)

ASEM 486DX-33 ELP

ASEM 486DX-33 Mini

ASEM 486DX-33 Mini 72P

ASEM 486DX-33 Tower

ASEM 486DX-33E Mini

ASEM 486DX2-50 ELP

ASEM 486DX2-50 Mini

ASEM 486DX2-50 Mini 72P

ASEM 486DX2-50 Tower

ASEM 486DX2-50E ELP

ASEM 486DX2-50E Mini

ASEM 486DX2-66 ELP

ASEM 486DX2-66 Mini

ASEM 486DX2-66 Mini 72P

ASEM 486DX2-66 Tower

ASEM 486DX4-100 Mini

ASEM 486SX-25 ELP

ASEM 486SX-25 Mini

ASEM 486SX-33 ELP

ASEM 486SX-33 Mini

ASEM 486SX-33 Tower

ASEM 560M

ASEM DM-S33 (incl. DP and DE Models)

ASEM LT433C Notebook

ASEM Platinum® DM90

ASEM Platinum DP90

ASEM Plato P54C

ASEM PROSERVER 5/60

ASEM SMP50P

ASEM SMP66P

Aspect 486DX-33 PCI

Aspect 486DX-33 VL

Aspect 486DX-40 VL

Aspect 486DX4-100 VL

Aspect 486SX-33 PCI

Aspect PENTIUM 60 PCI

Aspect PENTIUM 60 PCI/EISA

Aspect SMART WEAPONS 486 DX2-66 VL

Aspect SMART WEAPONS 486DX-33 PCI/VL

Aspect SMART WEAPONS 486DX-40 PCI/VL

Aspect SMART WEAPONS 486DX2 PCI 66

Aspect SMART WEAPONS 486DX2 PCI/EISA 66

Aspect SMART WEAPONS 486DX2-66 PCI/VL

Aspect SMART WEAPONS 486DX4-100 PCI/VL

Aspect SMART WEAPONS 486SX-33 PCI/VL

Aspect SMART WEAPONS 486SX-33 VL

Aspect SMART WEAPONS PENTIUM 66 PCI

Aspect SMART WEAPONS PENTIUM PCI/VL 90

Aspect SMART WEAPONS PENTIUM-90 PCI

Aspect SMART WEAPONS PENTIUM-90 PCI/EISA

AST® Ascentia 900N 4/50

AST Ascentia 900N 4/75

AST Bravo LC 4/100t 5

AST Bravo MS 4/66d

AST Bravo MS P/90

AST Manhattan P Series 5090 (1p)

AST Manhattan V Series 5090 (1p)

AST Manhatten G 5/60

AST Premium II 386/33 Model 213V

AST Premium II 486/33

AST Premium SE 4/33 Model 333

AST Premmia 4/66d 6

AST Premmia GX P/90 (1p)

AT&T® 3406

AT&T 3416

AT&T Globalyst 330 (Desktop) DX2-66

AT&T Globalyst 330 (Desktop) Pentium 60

AT&T Globalyst 330 (Desktop) SX2-50

AT&T Globalyst 360 (Mini-Tower) DX2-66

AT&T Globalyst 360 (Mini-Tower) Pentium 60

AT&T Globalyst 360 (Mini-Tower) SX2-50

AT&T Globalyst 510 (3228) 486 ISA

AT&T Globalyst 515 (3232) 486 ISA

AT&T Globalyst 525 (3253) 486 ISA/VL

AT&T Globalyst 550 (3246) 486 ISA/PCI

AT&T Globalyst 575 (3347) 486 ISA/PCI

AT&T Globalyst 590 (3346) Pentium ISA/PCI

AT&T Globalyst 600 (3356) Pentium ISA/PCI

Athena SERVER 486DX2/66 HQ

Atima MB486FG

Atima MB586MFG-66

Atima MB586SLB-90

Austin 486/50 EISA Tower PATRIOT

Austin 486DLC

Austin Business Audio DX4 100 Color Notebook

Austin Business Audio DX4 100 TFT Notebook

Austin Business Audio DX4 75 Color Notebook

Austin Business Audio DX4 75 TFT Notebook

Austin Power System 60

Austin Power System 90

Austin Premier 486DX33 PCI

Axik Ace Power 486DX2-66VG2/Green

BAJTEX S.A. i486DX2/66MHz

BB Data AB Grizzly 266 Alfredo

BB Data AB Grizzly P66 Batman

BB Data AB Grizzly S33 Alfredo

Beyond 2000 Systems STRATUS NT 90

Black Cat 486/66 VL

BROTHER® BCR3486

BROTHER BCR4486

BROTHER BCR4486/PCI

BROTHER BCR4486/VIP

BROTHER BCR4486DL

BROTHER BCR4586

BROTHER BCR4586/PCI

BROTHER BCR4P54C/PCI

BROTHER BCR5486

BROTHER BCR5486/PCI

BROTHER BCR5486/VIP

BROTHER BCR5586

BROTHER BCR5586/PCI

BROTHER BCR5P54C/PCI

BROTHER BCR7486

BROTHER BCR7586/PCI

BROTHER BCR8486

BROTHER BCR8486/PCI

BROTHER BCR8486/VIP

BROTHER BCR8586

BROTHER BCR8586/PCI

BROTHER BCR8P54C/PCI

Burgoyne Rocket 60

C&S Computer AMICS EISA VLB IV (486DX2-66)

C&S Computer AMICS P5 Pentium VLB 60

C&S Computer AMICS Pentium EISA PCI 60

Caliber SMART WEAPONS 486 DX2-66 VL

Caliber SMART WEAPONS 486DX-33 PCI

Caliber SMART WEAPONS 486DX-33 VL

Caliber SMART WEAPONS 486DX-40 VL

Caliber SMART WEAPONS 486DX2 PCI 66

Caliber SMART WEAPONS 486DX4-100 VL

Caliber SMART WEAPONS 486SX-33 PCI

Caliber SMART WEAPONS 486SX-33 PCI/VL

Caliber SMART WEAPONS 486SX-33 VL

Caliber SMART WEAPONS DX-33 PCI/VL

Caliber SMART WEAPONS DX-40 PCI/VL

Caliber SMART WEAPONS DX2-66  PCI/VL

Caliber SMART WEAPONS DX4-100 PCI/VL

Caliber SMART WEAPONS PENTIUM 60 PCI

Caliber SMART WEAPONS PENTIUM 60 PCI/EISA

Caliber SMART WEAPONS PENTIUM 66 PCI

Caliber SMART WEAPONS PENTIUM PCI/EISA 66

Caliber SMART WEAPONS PENTIUM PCI/VL 90

Caliber SMART WEAPONS PENTIUM-90 PCI

Caliber SMART WEAPONS Pentium-90 PCI/EISA

Cascade PCI-60S

Cascade VLB-66

Cascade PCI-Pentium-60

CELEM 486DX/33 C (ISA)

CELEM 486DX/33 VL (VESA)

CELEM 486DX2/66 DC (EISA+VESA)

CELEM 586/60 (PCI+ISA)

CELEM 586/66 (PCI+EISA)

CELEM 586/90 (PCI+EISA)

CELEM DX4/100 (VL+ISA)

CENSUS 4D266AGVL DT (incl. MT, IT, FT Models)

CENSUS 4D266DGVL DT (incl. MT, IT, FT Models)

CENSUS 4D4100AGVL DT (incl. MT, IT, FT Models)

CENSUS P90AGPCI DT (incl. MT, IT, FT Models)

Centis PowerTech model P60-G3

Centis Profi model 466-G5

Centis ProfiLite 466-G3

Chicony Electronics CH-1451A

Chicony Electronics CH-471A

Chicony Electronics CH-471B

Chicony Electronics CH-498B

Chicony Electronics CH-881A

Chicony Electronics CH-890A

Cincinnati Milicron Acramatic 2100 CNC

Cinet ET-100

Cinet FSE-100

Cinet HI-100

Cinet LS-100

Cinet MP-100

Cinet PPI-100

Cinet VL-100

Comark  VL-PENTIUM-66 CIDE

Comark Pentium-60/VL

Comark VL-PENTIUM-66

COMPAQ® CONTURA 400C

COMPAQ Deskpro 386®/25e

COMPAQ Deskpro 386/33®

COMPAQ Deskpro 386™/33L

COMPAQ Deskpro® 4/66i

COMPAQ Deskpro 486/33i

COMPAQ Deskpro 486/33L

COMPAQ Deskpro 486/33M

COMPAQ Deskpro 66M

COMPAQ Deskpro XL 466

COMPAQ Deskpro XL 566

COMPAQ LTE® Lite 4/25C

COMPAQ Presario 660

COMPAQ Presario CDS 633

COMPAQ ProLiant 1000 486DX2/66

COMPAQ ProLiant 1000 Model 5/60

COMPAQ ProLiant 1000R Model 486DX2/66

COMPAQ ProLinea 3/25s

COMPAQ ProLinea 4/50

COMPAQ ProLinea 4/66

COMPAQ ProLinea MT 4/66

COMPAQ ProSignia 486DX/33

COMPAQ ProSignia 486DX2/66

COMPAQ ProSignia 5/60

COMPAQ ProSignia 500 Model 5/90

COMPAQ ProSignia VS 486DX/33

COMPAQ ProSignia VS 486DX2/66

COMPAQ ProSignia VS 486SX/33

COMPAQ Systempro®/LT 486DX2/50

COMPAQ Systempro/LT™ 486DX2/66

COMPAQ Systempro®/LT 486DX33

COMPAQ Systempro/LT 486SX/25

Compu Partner Pentium 60

Compu Partner Pentium 90

CompuAdd® 466/DX2

CompuAdd 466E DX2

CompuAdd 486-33DLC

COMPUCON 486DX/33 EISA+VESA

COMPUCON 486DX/33 PCI+ISA/GREEN

COMPUCON 486DX/33 PCI+VESA+ISA

COMPUCON 486DX/33 VESA/GREEN

COMPUCON 486DX/40 VESA/GREEN

COMPUCON 486DX/50 EISA+VESA

COMPUCON 486DX/50 VESA/GREEN

COMPUCON 486DX2/50 EISA+VESA

COMPUCON 486DX2/50 PCI+ISA

COMPUCON 486DX2/50 PCI+ISA/GREEN

COMPUCON 486DX2/50 PCI+VESA+ISA

COMPUCON 486DX2/50 VESA/GREEN

COMPUCON 486DX2/66 EISA+VESA

COMPUCON 486DX2/66 GX4

COMPUCON 486DX2/66 PCI+ISA/GREEN

COMPUCON 486DX2/66 PCI+VESA+ISA

COMPUCON 486DX2/66 VESA/GREEN

COMPUCON 486DX266 PCI + ISA

COMPUCON 486DX33 PCI+ISA

COMPUCON 486DX4/100 PCI+VESA+ISA

COMPUCON 486DX4/100 VESA/GREEN

COMPUCON 486SX/25 EISA+VESA

COMPUCON 486SX/25 PCI+ISA

COMPUCON 486SX/25 PCI+ISA/GREEN

COMPUCON 486SX/25 PCI+VESA+ISA

COMPUCON 486SX/25 VESA/GREEN

COMPUCON 486SX/33 EISA+VESA

COMPUCON 486SX/33 PCI+ISA

COMPUCON 486SX/33 PCI+ISA/GREEN

COMPUCON 486SX/33 PCI+VESA+ISA

COMPUCON 486SX/33 VESA/GREEN

COMPUCON DX266VB

COMPUCON DX33G

COMPUCON PCI/IP-60

COMPUCON Pentium/60 PCI+EISA

COMPUCON Pentium/60 PCI+ISA

COMPUCON Pentium/66 PCI+EISA

COMPUCON Pentium/66 PCI+ISA

COMPUCON Pentium90/S PCI+EISA

Computer Dealers Source ISA-VESA 486DX2-66MHZ

Computer Resources PRECISION 486/40 VL

Computer Resources PRECISION PENTIUM

Computer Sales Prof. 486DX2/66

Computer Systems Resouces 486DX-50 16M WS

Computer Systems Resources 486DX2-66WS16M

Computrade Express 486-50/VLB

Computrend PREMIO 486DX2-66

Computrend PREMIO Pentium PCI 66

Computrend PREMIO Pentium PCI 90

Comtrade EISA GigaByte Ultima 486DX2-66

Comtrade VESA/PCI WIN-Station P90

Crescent AMI VLB III 486-66VL

CSS Labs MaxFrame 2000-462OPTIVL

CSS Labs MaxFrame 3000-462OPTIVL

CSS Labs MaxSys 462MTEVL Minitower

CSS Labs MaxSys 462REVL Rackmount

CSS Labs MaxSys 462TEVL Tower

CSS Labs Preferred 462GAVLESP (Inc. Full, Mid and Tower models)

CSS Labs Preferred 462MGEVLESP (Inc. Full, Mid and Tower Models)

CTM Fontek 486DX-33 VL

CTM Fontek 486DX2-50 VL

CTM Fontek 486DX2-66 VL

CTM Fontek 486DX4-100 VL

CTM Fontek PENTIUM 90

CTM Polaris 486DX-33 VESA

CTM Polaris 486DX2-50 VESA

CTM Polaris 486DX2-66 VESA

CTM Pronic 486DX-33 VESA

CTM Pronic 486DX2-50 VESA

CTM Pronic 486DX2-66 VESA

Cube 466 ATX Local Bus

Cybermax AMD486DX2-66

Cybermax P5/66

Cybermax P5/90

Daewoo VESA PENTIUM(60)

Daewoo Winpro™ 486 Vesa Green/2900G(DX2-50)

Daewoo Winpro 486DLC-40

Daewoo Winpro 486DX250 Green Deskop

Daewoo Winpro 486DX250 Vesa

Daewoo Winpro 486DX266 Vesa Green System/2800

Daisy 69 BusinessStar AT486DX2/66 VESA/ISA

Dakota Computer PCI 486DX4/100MHz

Danjen 486-50VL(Inc. Lunch Box, Mini, Mid,and Full Tower)

Dassault AT CUSTOMER ACTIVATED TERMINAL D633

Data General® P60/TE2 Pentium Tower

Data General P90/TE2

Data General P90MT

Data Stor 486 P66

Data Stor 486-33-8

Data Stor 486-66DX2E Desktop/Tower

Data Stor 486-66V

Data Stor ECS 90

Data Stor ECSP66

Data Stor p5-66 intel®

DATAFILEN PROFF 486DX2-66

Debis Deskside 5/60

Debis Desktop 486DX2/66

DELL® 325 NC Notebook

DELL 433/DE

DELL 433/M

DELL 450/M

DELL 450/ME

DELL 450DE

DELL 4560/XE

DELL 466/ME

DELL 466/T

DELL 466DE

DELL Dimension 433SV

DELL Dimension XPS P60

DELL Dimension XPS P90

DELL OmniPlex 450

DELL OmniPlex 466

DELL OmniPlex 560

DELL OmniPlex 566

DELL OmniPlex 590

DELL PowerLine System 433E

DELL PowerLine System 433SE

DELL PowerLine System 450DE/2 DGX

DELL PowerLine System 450SE

DELL PowerLine System 486D/50

Delphi Comet 466NT model 400

Delta Micro Systems Gold Line 4D33V

DELTACOM EISA/VLB 486

DELTACOM Pentium PCI

DELTACOM Super Server

DELTACOM VL Bus 486

DFI CCV 486DX2-66

DFI D486CCI-33C

DFI D486CCI-40A

DFI D486ICP-66

DFI D486ICP-66 (with AMD486DX2/66)

DFI D486P-PRO-x50-AMD

DFI D486V-PRO

DFI DP5-Pro-66 Intel

DFI DP5-PRO90

DFI DP586-PRO90

DFI E586IPE-60I

DFI G466EVA

DFI G466EVAx50I

DFI G486ECV

DFI G486ECV-33

DFI G486EVA-33I

DFI G486EVA-40AMD

DFI G486EVA-50AMD

DFI G486EVA-66AMD

DFI G486EVA/E-AIO-66I

DFI G486EVB-66

DFI G486VVP

DFI P486-PRO 486DX-33

Diamond DT 486DX Versa (AMD DX/40)

Diamond DT 486DX Versa (DX2/66)

Digital Equipment Corp. Celebris 4100

Digital Equipment Corp. Celebris 466

Digital Equipment Corp. Celebris 560

Digital Equipment Corp. Celebris 590

Digital Equipment Corp. Celebris FP590

Digital Equipment Corp. DECpc 4100 MTE

Digital Equipment Corp. DECpc 433

Digital Equipment Corp. DECpc 433dx DT

Digital Equipment Corp. DECpc 433dx MTE

Digital Equipment Corp. DECpc 433T

Digital Equipment Corp. DECpc 466d2 DT

Digital Equipment Corp. DECpc 466d2 MTE

Digital Equipment Corp. DECpc LPv+ 4100

Digital Equipment Corp. DECpc LPv+ 433dx

Digital Equipment Corp. DECpc LPv+ 433sx

Digital Equipment Corp. DECpc LPv+ 450d2

Digital Equipment Corp. DECpc LPv+ 466d2

Digital Equipment Corp. DECpc LPx 560

Digital Equipment Corp. DECpc LPx 566

Digital Equipment Corp. DECpc LPx+ 4100

Digital Equipment Corp. DECpc LPx+ 433dx

Digital Equipment Corp. DECpc LPx+ 433sx

Digital Equipment Corp. DECpc LPx+ 450d2

Digital Equipment Corp. DECpc LPx+ 450sx

Digital Equipment Corp. DECpc LPx+ 466d2

Digital Equipment Corp. DECpc XL 4100

Digital Equipment Corp. DECpc XL 433

Digital Equipment Corp. DECpc XL 466d2

Digital Equipment Corp. DECpc XL 560

Digital Equipment Corp. DECpc XL 566

Digital Equipment Corp. DECpc XL 590

Digital Equipment Corp. DECpc XL Server  590

Digital Equipment Corp. DECpc XL Server 4100

Digital Equipment Corp. DECpc XL Server 466d2

Digital Equipment Corp. DECpc XL Server 560

Digital Equipment Corp. DECpc XL Server 566

Digital Equipment Corp. DECpc XL Server 590

Digital Equipment Corp. DECstation® 425c

Digital Equipment Corp. Starion 200

Digital Equipment Corp. Starion 300

Digital Equipment Corp. Starion 400

Digital Equipment Corp. Starion 500

Digital Equipment Corp. Starion 700

Digital Equipment Corp. Venturis 4100

Digital Equipment Corp. Venturis 433sx

Digital Equipment Corp. Venturis 450s2

Digital Equipment Corp. Venturis 466

Digital Equipment Corp. Venturis 560

Digital Equipment Corp. Venturis FP 4100

Digital Equipment Corp. Venturis FP 450s2

Digital Equipment Corp. Venturis FP 466

Digital Equipment Corp. Venturis FP i466

DTK FEAT-39 DX4-100

DTK FEAT-39D

DTK FEAT-39M

DTK FEAT-39T

DTK QUIN-02

DTK QUIN-02 P66

DTK QUIN-32

DTK QUIN-33

Duracom 486/66DX2-CCV

Duracom DESKSAVER DX2/66

Duracom G486/66DX2-EVB

Duracom G486/66DX2-VVP

Duracom Pentium/66-ipe

Dyna Micro GEMLIGHT VL486G/DX4

Dyna Micro SUPER P54VLPCI

Dynamic Decisions DYNEX EXECUTIVE 486-33D SV2GX4

Dynamic Decisions DYNEX EXECUTIVE 486-66 DX2 SV2G

Dynamic Decisions DYNEX EXECUTIVE 486-66 SP3G

Dynamic Decisions DYNEX EXECUTIVE 586-60 MP3

Dynamic Decisions DYNEX EXECUTIVE 586-66 ISA/PCI

Dynamic Decisions DYNEX EXECUTIVE 586-90 4SP4

Dynamic Decisions DYNEX EXECUTIVE 586-90 EISA/PCI

Dynamic Decisions DYNEX EXECUTIVE ISA-486-33 SV2G

Dynamic Decisions EXECUTIVE 486-33 ISA/PCI

Dynamic Decisions EXECUTIVE 486-33 VL/EISA

Dynamic Decisions EXECUTIVE 486-33 VL/ISA

Dynamic Decisions EXECUTIVE 486-66 DX2 PCI

Dynamic Decisions EXECUTIVE 486-66 VL/EISA

Dynamic Decisions EXECUTIVE ISA-486-33 SX GREEN VL

Dynamic Decisions EXECUTIVE ISA-486-50 SV2

Dynamic Decisions EXECUTIVE ISA-486-50 VL

Dynamic Decisions EXECUTIVE ISA-486-66 DX2 GREEN VL

Dynamic Decisions EXECUTIVE ISA-486-66D2 SV2

Dynamic Decisions ISA-486-33 PCI GREEN

Dynamic Decisions PROFESSIONAL 486-33 GREEN VL ISA

Dynamic Decisions PROFESSIONAL 486-33DX VL/EISA E3

Dynamic Decisions PROFESSIONAL 486-50DX VL/EISA E4

Dynamic Decisions PROFESSIONAL 486-66 VL/ISA

ECE DATA i486™/VLB-GREEN

Edge Technology EDGE-PCI P60

Elonex PC-466/R

Elonex PC-466/VL

Eltech Model 4660VB

Eltech P54C-90P

Epson® ActionPC 3000

Epson ActionPC 5000

Epson Endeavor P60

Epson Endeavor WG 4DX2/50

Epson Equity 4DX/33

Epson Equity 4SX/25

Epson PowerSpan 486DX2/66

Epson PowerSpan P90

Epson Progression 4DX2/50

Ergo PowerBrick 100

Ergo PowerBrick 33

Ergo PowerBrick 66

ERIDAN Onyx DE433

ERIDAN Onyx DE466

ERIDAN ONYX DVL4-100

Everex™ Step 486/33 ISA

Everex Step DP (1p)

Everex Tempo 486/33

Everex Tempo 486/33E

Evesham Micros Premier PCI 486DX2-66 /340

Expo-Tech 410M

Expo-Tech 433M

Expo-Tech 450M

Expo-Tech 486DM-100 (incl. DP and DE Models)

Expo-Tech 486DM-33 (incl DP and DE Models)

Expo-Tech 486DM-33E (incl. DP and DE Models)

Expo-Tech 486DM-40E (incl. DP and DE Models)

Expo-Tech 486DM-50 (incl DP and DE Models)

Expo-Tech 486DM-50E (incl. DP and DE Models)

Expo-Tech 486DM-66 (incl. DP and DE Models)

Expo-Tech 486DM-S50 (incl. DP and DE Models)

Expo-Tech 486DX-33 ELP

Expo-Tech 486DX-33 Mini

Expo-Tech 486DX-33 Mini 72P

Expo-Tech 486DX-33 Tower

Expo-Tech 486DX-33E Mini

Expo-Tech 486DX2-50 ELP

Expo-Tech 486DX2-50 Mini

Expo-Tech 486DX2-50 Mini 72P

Expo-Tech 486DX2-50 Tower

Expo-Tech 486DX2-50E ELP

Expo-Tech 486DX2-50E Mini

Expo-Tech 486DX2-66 ELP

Expo-Tech 486DX2-66 Mini

Expo-Tech 486DX2-66 Mini 72P

Expo-Tech 486DX2-66 Tower

Expo-Tech 486DX4-100 Mini

Expo-Tech 486SX-25 ELP

Expo-Tech 486SX-25 Mini

Expo-Tech 486SX-33 ELP

Expo-Tech 486SX-33 Mini

Expo-Tech 486SX-33 Mini 72P

Expo-Tech 486SX-33 Tower

Expo-Tech DM-S33 (incl. DP and DE Models)

Expo-Tech Pentium 566M

Expo-Tech Platinum DM90

Expo-Tech Platinum DP90

Expo-Tech Plato P54C

Expo-Tech SMP50P

Expo-Tech SMP66P

Fast 486DY66S520

First 486-GACV-2

First 486-GAV

First 486-GIO-VP

First 486-PAK3

First 486GAC-2

First 486VIP-IO

First COUGAR661

First CUB671

First FIC PM-900

First LEO 486-GIO-VT2

First LEO 486-GVT2

First LEO 486-PVT

First LEO 486-VIP

First LEO PA-2000

First LEO PSK-2000

First PA-1000

Forte Company DELTA 486/33M

Forte Company DELTA 486DX2/66

Forte Company GAMMA DX 386DX/40

Fountain Technology 486DX2/66

Fountain Technology 486DX4/100

Fountain Technology P5/66

Fountain Technology P5/90

Free F38X-486VESA

Free F39X-486VESA

Fujitech 486DX2/66-EVL

Fujitech 486DX2/66-VL

Fujitech 486DX4/100-VL

Fujitech 486DX4/100-VL2

Fujitech i486DX2/66-VLG

Fujitsu® S-3000

Fujitsu S-500

Fujitsu S-5000MP

Fujitsu S-510

FutureTech 486DX2-66 VLB

Gateway 2000 386/33c

Gateway 2000 486/33C

Gateway 2000 486DX2/50E

Gateway 2000 486DX2/50V

Gateway 2000 486DX2/66V Desktop

Gateway 2000 486DX2/66V Tower

Gateway 2000 4DX-33V

Gateway 2000 4DX/33

Gateway 2000 4DX2-66P

Gateway 2000 4DX2/66E

Gateway 2000 4SX/25

Gateway 2000 P5-60

Gateway 2000 P5-66

Gateway 2000 P5-90

GCH AEGIS 466

GCH AEGIS 466D2V

GCH Aegis 466ES

GCH EasyData GD600

GCH EasyDate 466HI VL

GCH EiSYS Ei600 Series

GEKKO Power+ Energia 90 (Pentium)

GEKKO Power+ Manager

GEKKO Power+ Nirvana

Genitech Capricorn HF60 E/PCI P5

Genitech Steller Orion 2 System

Getek PCI PENTIUM

GMX EISAMB 486DX2/66

GoldStar GS450DT

GoldStar GS466DT

GoldStar GS486ID50L

GoldStar GS486ID66L

GRiD® 486ei-25 SVR

GRiD 486ei-33

H.D.Microsystèmes AX7 486 DX-33

H.D.Microsystèmes AX7 486 DX-50

H.D.Microsystèmes AX7 486 DX2-50

H.D.Microsystèmes AX7 486 DX2-66

H.D.Microsystèmes AX7 486 DX2-66 EISA

H.D.Microsystèmes AX7 Pentium 60 PCI

H.D.Microsystèmes AX7 Pentium 90 PCI

Hancke & Peter 486 DX4-100 VL/ISA Professional

Hancke & Peter 486-66 EISA/VL Professional

Hancke & Peter 486-66 PCI Professional

Hancke & Peter 486-66 VLG Professional

Hancke & Peter Pentium/66 EISA/PCI Professional

Hancke & Peter Pentium/90 PCI Professional

HARPO 4DX FIRMA

HARPO NT 486DX2

Harris 486DX2/66 VESA

Harris Pentium/66 PCI

Hewlett-Packard® NetServer 4/100 LC

Hewlett-Packard NetServer 4/100 LF

Hewlett-Packard NetServer 4/66 LC

Hewlett-Packard NetServer 4/66 LF

Hewlett-Packard NetServer 4d/66 LE

Hewlett-Packard NetServer 4d/66 LM

Hewlett-Packard NetServer 5/100 LM

Hewlett-Packard NetServer 5/60 LM

Hewlett-Packard NetServer 5/66 LC

Hewlett-Packard NetServer 5/66 LF

Hewlett-Packard NetServer 5/66 LM

Hewlett-Packard NetServer 5/90 LM

Hewlett-Packard Vectra® 486/33N

Hewlett-Packard Vectra 486/33T

Hewlett-Packard Vectra 486/50U

Hewlett-Packard Vectra 486/66ST

Hewlett-Packard Vectra 486/66U

Hewlett-Packard Vectra 486S/20

Hewlett-Packard Vectra XU 590/C (1p)

Hi-Tech USA 486DX2-50/256K

Hi-Tech USA 486DX266 VLB SYSTEM

Hi-Tech USA 486DX33 VLB SYSTEM

Hi-Tech USA 486DX4-100/256K VLB

Hi-Tech USA P5-60/256K PCI-VLB

Hi-Tech USA P5-66/256K VLB

Hi-Tech USA PENTIUM-90/256K

HiQuality Systems HIQ D66 SVL

HiQuality Systems HIQ P66 PCI

HiQuality Systems HIQ P90 PCI

HM Systems Minstrel XPentium P90

HM Systems Minstrel XPentium Server P90

HYPERTEC SYSTEMS CIARA Discovery

Hyundai 425s

Hyundai 466d2

IBM® PC 300 Series Model 6571 486DX/33

IBM PC 300 Series Model 6575 Pentium/60

IBM PC 300 Series Model 6581 486DX/33

IBM PC 300 Series Model 6585 Pentium/60

IBM PC 700 Series Model 6875 Pentium/90

IBM PC 700 Series Model 6885 Pentium/90

IBM PC Server 486DX2/66 8640-0N*

IBM PC Server 500 Pentium/90 8641-1Y*

IBM PC Server 500 Pentium/90 8641-OY*

IBM PC Server Pentium/60 8640-0P*

IBM PS/1 2155-xxx 486DX/33

IBM PS/1 2155-xxx 486DX2/50

IBM PS/1 2168-xxx 486DX/33

IBM PS/1 2168-xxx 486DX2/50

IBM PS/2® Model 50/50Z System Board Upgrade 486SLC2/50

IBM PS/2 Model 53 9553-xxx 486SLC2/50 7

IBM PS/2 Model 56 9556-xxx 486SLC2/50

IBM PS/2 Model 57 9557-xxx 486SLC2/50

IBM PS/2 Model 70 8570-xxx 386DX/25

IBM PS/2 Model 70 8570-xxx 486DX/25

IBM PS/2 Model 76 9576-xxx 486DX2/66

IBM PS/2 Model 76 9576-xxx 486SX/33

IBM PS/2 Model 76i 9576-xxx 486DX2/50 7

IBM PS/2 Model 76i 9576-xxx 486DX2/66 7

IBM PS/2 Model 76s 9576-xxx 486DX2/50 7

IBM PS/2 Model 76s 9576-xxx 486DX2/66 7

IBM PS/2 Model 77 9577-xxx 486DX2/66

IBM PS/2 Model 77 9577-xxx 486SX/33

IBM PS/2 Model 77i 9577-xxx 486DX2/50 7

IBM PS/2 Model 77i 9577-xxx 486DX2/66 7

IBM PS/2 Model 77s 9577-xxx 486DX2/50 7

IBM PS/2 Model 77s 9577-xxx 486DX2/66 7

IBM PS/2 Model 80 8580-xxx 386DX/25

IBM PS/2 Model 90 XP 486 8590-0J* 486DX/25

IBM PS/2 Model 90 XP 486 8590-0L* 486DX2/50

IBM PS/2 Model 90 XP 486 9590-0L* 486DX2/50

IBM PS/2 Model 95 486 XP 8595-xxx with IBM PS/2 90MHz Processor Upgrade Option with Pentium Technology

IBM PS/2 Model 95 486 XP 9595-xxx with IBM PS/2 90MHz Processor Upgrade Option with Pentium Technology

IBM PS/2 Model 95 XP 486 8595-0J* 486DX/25

IBM PS/2 Model 95 XP 486 8595-0M* 486DX/50

IBM PS/2 Model 95 XP 486 8595-xxx with 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 8595-xxx with Enhanced 486DX/50 processor upgrade

IBM PS/2 Model 95 XP 486 8595-xxx with Enhanced 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 8595-xxx with processor upgrade with Pentium Technology

IBM PS/2 Model 95 XP 486 9595-0M* 486DX/50

IBM PS/2 Model 95 XP 486 9595-xxx with 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 9595-xxx with Enhanced 486DX/50 processor upgrade

IBM PS/2 Model 95 XP 486 9595-xxx with Enhanced 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 9595-xxx with processor upgrade with Pentium Technology

IBM PS/2 Model P75 8573-xxx 486DX/33

IBM PS/2 Server 85 433 9585-0K*

IBM PS/2 Server 85 466 9585-0N*

IBM PS/2 Server 85 9585-0X* with 486DX2/66 processor upgrade

IBM PS/2 Server 95 566 9595-0QT

IBM PS/2 Server 95 Array 466 9595-3N* 8

IBM PS/2 Server 95 Array 560 9595-3P* 8

IBM PS/2 Server 95 Array 566 9595-3Q* 8

IBM PS/2 Ultimedia™ DV M57 9557-xxx 486SLC2/50

IBM PS/2 Ultimedia M57 9557-xxx 486SLC2/50

IBM PS/2 Ultimedia M77 9577-xxx 486DX2/66

IBM PS/2 Ultimedia M77 9577-xxx 486SX/33

IBM PS/ValuePoint 433DX/S 6472-xxx

IBM PS/ValuePoint 433SX/D 6384-Kxx

IBM PS/ValuePoint 433SX/S 6382-Kxx

IBM PS/ValuePoint 466DX2/D 6384-Wxx

IBM PS/ValuePoint 466DX2/T 6387-Wxx

IBM PS/ValuePoint P60/D

IBM ThinkPad® 360CS 9

IBM ThinkPad 720 9,10

IBM ThinkPad 720C 9,10

IBM ThinkPad 750 9

IBM ThinkPad 750C 9

IBM ThinkPad 755C 486DX2/50 9

IBM ThinkPad 755C 486DX4/75 9

ICD Compatibles ICD P5-90

ICL ErgoPRO D4/33d

ICL ErgoPRO D4/50 V

ICL ErgoPRO D4/50de P

ICL ErgoPRO D4/66d

ICL ErgoPRO D4/66d P

ICL ErgoPRO D4/66d XGi

ICL ErgoPRO D5/60

ICL ErgoPRO D5/60 P

ICL ErgoPRO D5/90 P

ICL ErgoPRO E5/60

ICL System Platform FX486/33

ICL TEAMSERVER E180i

ICL TEAMSERVER E380i

ICL TEAMSERVER E430i

ICL TEAMSERVER H180i

ICL TEAMSERVER H430i

ICL ValuePlus DL/100d i

ICL ValuePlus DL/66d i

ICL ValuePlus MD™/66

ICL ValuePlus MD/P60

Image® 486DX/50 EISA

ImAtrex Predator Series ProV 90

Innovax Aurora 486DX/33

Innovax Aurora 486DX2/66

Insight 60MHz-PCI

Intel Classic / PCI LP

Intel Classic-R

Intel Classic-R Plus

Intel Classic/PCI Expandable Desktop

Intel L486-Series/Professional GX

Intel L486-Series/Professional Workstation

Intel PLATO_100

Intel Premiere 60/PCI Baby AT OEM Platform

Intel Premiere 66/PCI Baby-AT

Intel Premiere/PCI 66 LPX

Intel Premiere/PCI Baby AT

Intel Premiere/PCI II Baby-AT

Intel Premiere/PCI II LX Low Profile™ Desktop

Intel Premiere/PCI LPX

Intel X486/50E

Intel Xpress Deskside/MX Pentium 90Mhz Pentium Processor

Intel Xpress LXS/ 60Mhz Pentium Processor

Intel Xpress/MX 486/33

Intel Xpress/MX 486/50

Intel Xpress/MX 486DX2/66

Intel Xpress/MX 66Mhz Pentium Pentium

Intelicom 486DX/33 EISA

Intelicom 486DX/33 ISA

Intelicom 486DX/33 VESA EISA

Intelicom 486DX/33 VLB

Intelicom 486DX/50 EISA

Intelicom 486DX/50 ISA

Intelicom 486DX/50 VESA EISA

Intelicom 486DX/50 VLB

Intelicom 486DX2/50 EISA

Intelicom 486DX2/50 ISA

Intelicom 486DX2/50 VESA EISA

Intelicom 486DX2/50 VLB

Intelicom 486DX2/66 EISA

Intelicom 486DX2/66 ISA

Intelicom 486DX2/66 VESA EISA

Intelicom 486DX2/66 VLB

Intelicom 486DX4/100 VESA

Intelicom PENTIUM/60 PCI

Intelicom PENTIUM/66 PCI

INTERCOMP Digit 486DX/33 VLB

INTERCOMP Digit 486DX2/50 VLB

INTERCOMP Digit 486DX2/66

INTERCOMP Digit 486DX2/66 VLB

INTERCOMP Entry DX-33

INTERCOMP Entry SX-25

INTERCOMP Explorer DX2/66

INTERCOMP IDAS8000

INTERCOMP IDAS8000/H

INTERCOMP IDAS8000/H Pentium 66

INTERCOMP IDAS8000/P 60

INTERCOMP Master DX2/50 PCI

INTERCOMP Master EISA DX/33

INTERCOMP Master EISA DX2/66

INTERCOMP Master PENTIUM 90 PCI

INTERCOMP Master PENTIUM/66

INTERCOMP Target EN DX/33

INTERCOMP Target EN DX/33 VLB

INTERCOMP Target EN DX2/50 PCI

INTERCOMP Target EN DX2/66

INTERCOMP Target EN DX2/66 VLB

INTERCOMP Target EN Pentium 90 PCI

Interface Electronic 486DX2/66

Interface Electronic System X EISA

Intergraph® PC 433

Intergraph PC 466

Intergraph TD 1 Personal Workstation

Intergraph TD 2 Personal Workstation

Intergraph TD 3 Personal Workstation

International Instrumentation BLUE MAX 486 DX66 PCI

International Instrumentation BLUE MAX P-60 PCI

International Instrumentation Business Partner P-90

Investronica INVES BS-486 VL

Investronica INVES BS-486 VS

Investronica INVES BS-486VT+

Investronica INVES IFS-1000

Investronica INVES IFS-900

Investronica INVES MP-900 XM UniProcessor

Investronica INVES WS-1000

Investronica INVES WS-900 EVL

INWAR S.A. AS5PCI

INWAR S.A. WS4VL

Iolair Engineering Silicon Valley Online SVO-1

IPC DYNASTY HE (GREEN) 486DX-33

IPC DYNASTY HE (GREEN) 486DX2-50

IPC DYNASTY HE (GREEN) 486DX2-66

IPC DYNASTY HE (GREEN) 486SX-25

IPC DYNASTY HE (GREEN) 486SX-33

IPC DYNASTY HE 486DX-33

IPC DYNASTY HE 486DX2-50

IPC DYNASTY HE 486DX2-66

IPC DYNASTY HE 486SX-25

IPC DYNASTY HE 486SX-33

IPC DYNASTY SE 486DX-33C

IPC DYNASTY SE 486DX2-66C PCI

IPC DYNASTY SE P5-60C

IPC DYNASTY SE P5-90C

IPC DYNASTY SEL 486DX-33C

IPC DYNASTY SEL 486DX2-66C

IPC DYNASTY SEL P5-60C

IPC DYNASTY SEL P5-66C

IPC DYNASTY SEL P5-90C

IPC VALUEMAGIC 486DX-33

IPC VALUEMAGIC 486DX2-50

IPC VALUEMAGIC 486DX2-66

IPC VALUEMAGIC 486SX-25

IPC VALUEMAGIC 486SX-33

IPC VALUEMAGIC P5-60C

IPC VALUEMAGIC P5-66C

IPC VALUEMAGIC P5-90C

Ipex 486DX-33 Green Centra 1000 ISA/VESA/PCI

Ipex 486DX-33 Green Centra 2000 ISA/VESA/PCI

Ipex 486DX-33 Green Centra 5000 ISA/VESA/PCI

Ipex 486DX-33 Green Desk Top ISA/VESA

Ipex 486DX-33 Green Desktop ISA/VESA/PCI

Ipex 486DX-33 Green Mini Tower ISA/VESA/PCI

Ipex 486DX-33 Green Ultimate ISA/VESA/PCI

Ipex 486DX2-66 Centra 1000 ISA/VESA

Ipex 486DX2-66 Centra 2000 ISA/VESA

Ipex 486DX2-66 Centra 5000 ISA/VESA

Ipex 486DX2-66 Green Centra 1000 ISA/VESA/PCI

Ipex 486DX2-66 Green Centra 2000 ISA/VESA/PCI

Ipex 486DX2-66 Green Centra 5000 ISA/VESA/PCI

Ipex 486DX2-66 Green Desk Top ISA/VESA

Ipex 486DX2-66 Green Desktop ISA/VESA/PCI

Ipex 486DX2-66 Green Mini Tower ISA/VESA

Ipex 486DX2-66 Green Mini Tower ISA/VESA/PCI

Ipex 486DX2-66 Green Ulti-mate ISA/VESA

Ipex 486DX2-66 Green Ultimate ISA/VESA/PCI

Ipex 486DX2-66 Slimline ISA/VESA

Ipex 486DX33 Green Centra 1000 ISA/VESA

Ipex 486DX33 Green Centra 2000 ISA/VESA

Ipex 486DX33 Green Centra 5000 ISA/VESA

Ipex 486DX33 Green Mini Tower ISA/VESA

Ipex 486DX33 Green Slimline ISA/VESA

Ipex 486DX33 Green Ulti-mate ISA/VESA

Ipex 486DX4-100 Green Centra 1000 ISA/VESA

Ipex 486DX4-100 Green Centra 1000 ISA/VESA/PCI

Ipex 486DX4-100 Green Centra 2000 ISA/VESA

Ipex 486DX4-100 Green Centra 2000 ISA/VESA/PCI

Ipex 486DX4-100 Green Centra 5000 ISA/VESA

Ipex 486DX4-100 Green Centra 5000 ISA/VESA/PCI

Ipex 486DX4-100 Green Desk Top ISA/VESA

Ipex 486DX4-100 Green Desk Top ISA/VESA/PCI

Ipex 486DX4-100 Green Mini Tower ISA/VESA

Ipex 486DX4-100 Green Mini Tower ISA/VESA/PCI

Ipex 486DX4-100 Green Ultimate ISA/VESA

Ipex 486DX4-100 Green Ultimate ISA/VESA/PCI

Ipex 486SX-33 Green Centra 1000 ISA/VESA

Ipex 486SX-33 Green Centra 2000 ISA/VESA

Ipex 486SX-33 Green Centra 5000 ISA/VESA

Ipex 486SX-33 Green Desktop ISA/VESA

Ipex 486SX-33 Green Mini Tower ISA/VESA

Ipex 486SX-33 Green Ultimate ISA/VESA

Ipex Pentium/60 Centra 1000 EISA/PCI

Ipex Pentium/60 Centra 1000 ISA/PCI

Ipex Pentium/60 Centra 2000 EISA/PCI

Ipex Pentium/60 Centra 2000 ISA/PCI

Ipex Pentium/60 Centra 5000 EISA/PCI

Ipex Pentium/60 Centra 5000 ISA/PCI

Ipex Pentium/60 Desk Top EISA/PCI

Ipex Pentium/60 Desk Top ISA/PCI

Ipex Pentium/60 Mini Tower EISA/PCI

Ipex Pentium/60 Mini Tower ISA/PCI

Ipex Pentium/60 Slimline 1000 EISA/PCI

Ipex Pentium/60 Slimline ISA/PCI

Ipex Pentium/60 Ulti-mate EISA/PCI

Ipex Pentium/60 Ulti-mate ISA/PCI

Ipex Pentium/66 Centra 1000 EISA/PCI

Ipex Pentium/66 Centra 1000 ISA/PCI

Ipex Pentium/66 Centra 2000 EISA/PCI

Ipex Pentium/66 Centra 2000 ISA/PCI

Ipex Pentium/66 Centra 5000 EISA/PCI

Ipex Pentium/66 Centra 5000 ISA/PCI

Ipex Pentium/66 Desk Top EISA/PCI

Ipex Pentium/66 Desk Top ISA/PCI

Ipex Pentium/66 Mini Tower EISA/PCI

Ipex Pentium/66 Mini Tower ISA/PCI

Ipex Pentium/66 Slimline EISA/PCI

Ipex Pentium/66 Slimline ISA/PCI

Ipex Pentium/66 Ulti-mate EISA/PCI

Ipex Pentium/66 Ulti-mate ISA/PCI

Ipex Pentium/90 Centra 1000 EISA/PCI

Ipex Pentium/90 Centra 2000 EISA/PCI

Ipex Pentium/90 Centra 5000 EISA/PCI

Ipex Pentium/90 Desk Top EISA/PCI

Ipex Pentium/90 Mini Tower EISA/PCI

Ipex Pentium/90 Ultimate EISA/PCI

ITG NT 486DX-50

ITG NT Pentium/60

ITOS Peacock CTM 8564

ITOS Peacock SSE 8364

JAI PC 845-66-32VL

JAI PC 852/PENTIUM-66/64 BR

JV R-STYLE MARSHALL-PCI/ISA-PENTIUM/90

Kraftway GEG Express 56De

Kraftway GEG Express 59De

Kraftway GEG Prestige® 45D2v

Kraftway GEG Prestige 45Dv

Kraftway GEG Prestige 46Dv

Kraftway GEG Prestige 56Ds

Kraftway Prestige 41Dv

LANIX BRAIN 486DX2-66

LANIX BRAIN PENTIUM 60

LANIX MART 486DX2-50

LANIX MART 486DX2-66

LANIX MART 486SX-25

LASER 410M

LASER 433M

LASER 450M

LASER 486DM-100 (incl. DP and DE Models)

LASER 486DM-33 (incl DP and DE Models)

LASER 486DM-33E (incl. DP and DE Models)

LASER 486DM-40E (incl. DP and DE Models)

LASER 486DM-50 (incl DP and DE Models)

LASER 486DM-50E (incl. DP and DE Models)

LASER 486DM-66 (incl. DP and DE Models)

LASER 486DM-S50 (incl. DP and DE Models)

LASER 486DX-33 ELP

LASER 486DX-33 Mini

LASER 486DX-33 Mini 72P

LASER 486DX-33 Tower

LASER 486DX-33E Mini

LASER 486DX2-50 ELP

LASER 486DX2-50 Mini

LASER 486DX2-50 Mini 72P

LASER 486DX2-50 Tower

LASER 486DX2-50E ELP

LASER 486DX2-50E Mini

LASER 486DX2-66 ELP

LASER 486DX2-66 Mini

LASER 486DX2-66 Mini 72P

LASER 486DX2-66 Tower

LASER 486DX4-100 Mini

LASER 486SX-25 ELP

LASER 486SX-25 Mini

LASER 486SX-33 ELP

LASER 486SX-33 Mini

LASER 486SX-33 Mini 72P

LASER 486SX-33 Tower

LASER DM-S33 (incl. DP and DE Models)

LASER Pentium 566M

LASER Platinum DM90

LASER Platinum DP90

LASER Plato P54C

LASER SMP50P

LASER SMP66P

Leading Edge® DT4000 DX-33

Leading Edge DT4000 DX2-50

Leading Edge DT4000 DX2-66

Leading Edge DT4000 SX-33

Leading Edge DT4000 SX-33

Leading Edge Fortiva 5000, model 5900

Leading Edge Fortiva Series 3000

Leading Edge Fortive series 4000

Leading Edge MT4000 Cyrix DX2-50

Leading Edge MT4000 DX-33

Leading Edge MT4000 DX2-66

Leading Edge SL4000 DX-33

Leading Edge SL4000 DX2-50

Leading Edge SL4000 DX2-66

Leading Edge SL4000 SX-33

Leading Edge Valiance DT 4000

Leading Edge WinPro 486e/DX-33

Leading Edge WinPro 486e/DX2-50

Leading Edge WinPro 486e/DX2-66

Leading Edge WinPro 486e/SX-25

Leading Edge WinPro D DLC/40

Leading Edge WinTower 486 DX-33

Leading Edge WinTower 486 DX2-50

Leading Edge WinTower 486 DX2-66

Leading Edge WinTower 486 SX-25

Leading Edge WinTower Cyrix DX2-50

Liuski G-MD266D-34-8

Liuski G-MP60F-34-8

Master PENTIUM/60  PCI

Maximus 486-50MHz Maxi-CAD

Maximus P5-90 PCI/ISA

Mega Computer ECO Series 486 DX2/66 VLB

Memory and More PDS ELITRA PENT-90 VIP

Memory and More PDS NETSTATION PENT-90 PCI

Memory and More PDS SLIMLINE 486-66

Metro Computers Pentium 60

Micro Express ME 486DX2/66

Micro Express Notebook Computer 486DX2/66

Microbits EISA/PCI Pentium

Microbits Me5PI-s

Microbits VESA/ISA PT586V Pentium

Micron 4100 PCI Magnum

Micron 4100 VL Magnum

Micron 486PCI WINSTATION CD

Micron P5PCI Platinum CD

Micron P5PCI PowerStation CD

Micron P66PCI PowerServer™

Micron P90PCI PowerStation

Microniche MIS Computer Systems M466EV

Microniche MIS Computer Systems M466VL

Microniche MIS Computer Systems M560P

Microniche MIS Computer Systems M560PE

Microniche MIS Computer Systems M590P

Micronics Mpro 486DX/50

Microtec MYTHUS 486DX2/50

Microtec MYTHUS 486DX2/66

Microtec MYTHUS D4100

Midwest Micro 486DX2/50 Vesa/ISA

Midwest Micro Elite Cx486DX2-50

Mikrolink Office Pentium90 PCI

Mikrolink Office Plus 486DX2/66

MIND 306x-460

MIND 306x-464

MIND 306x-464 SERVER

MIND 486DX/33 EISA

MIND 486DX/33 VLB

MIND 486DX/40 EISA

MIND 486DX/40 VLB

MIND 486DX2/50 VLB

MIND 486DX2/66 EISA

MIND 486DX2/66 VLB

MIND 486DX2/66 VLB ALI

MIND 486DX4/100

MIND Pentium 60 PCI/EISA

MIND Pentium 60 VLB

MIND Pentium 66 PCI/EISA

Minitronics MINTEC 486DX2-66 VL/16

MiTAC 4021GC/T

MiTAC 4022GC

MiTAC 5080i

MiTAC DM4077C

MiTAC DM4500A

MiTAC DM5500C

MiTAC DV4033D

MiTAC DV4033H

MiTAC DV4050D

MiTAC DV4050H

MiTAC DV4077C

MiTAC DV4077D

MiTAC DV4080D

MiTAC DV4080H

MiTAC DV4450D

MiTAC DV4466D

MiTAC DV4466H

MiTAC DV4500A

MiTAC DV4533A

MiTAC DV4550A

MiTAC DV4566A

MiTAC DV4580A

MiTAC DV4599A

MiTAC DV5500C

MiTAC DV5560C

MiTAC DV5566C

MiTAC TF5500C

MiTAC TF5560C

MiTAC TF5566C

MiTAC TM4033D

MiTAC TM4033H

MiTAC TM4050D

MiTAC TM4050H

MiTAC TM4080D

MiTAC TM4080H

MiTAC TM4450D

MiTAC TM4466D

MiTAC TM4466H

MiTAC TM4500A

MiTAC TM4533A

MiTAC TM4550A

MiTAC TM4566A

MiTAC TM4580A

MiTAC TM4599A

MiTAC TM5500C

MiTAC TM5560C

MiTAC TM5566C

Mitsuba M-South Series 560 Model AP5MP3-5A

Mitsuba M-South Series 566 Model 5A

Mitsuba M-South Series 590 Model 5A

Mitsuba M-South Series 590 Model 5B

Modular Server Module 450

Modular Server Module 466

Modular Server Module Pentium

Monydata Modula 300 / 90

Monydata Station 486 / 90

Multitech OCS 486DX2-66 ISA/VLB

Multitech OCS PENTIUM 60 PCI/ISA

Multitech ProSpec 486DX2-66 ISA/VLB

Multitech ProSpec PENTIUM 60 PCI/ISA

Multitech ProSpec PENTIUM 90 EISA /PCI

Multitech ProSpec PENTIUM 90 ISA/PCI

Mustek MECER3486-VL

Mustek MECER486DL

Mustek MECER7486-PCI

Mustek MECER7486-VIP

Mustek MECER7486-VL

Mustek MECER7586

Mustek MECER7586-PCI

Mustek MECER7P54C-PCI

Mustek MECER8586/PCI

National Microcomputers Power System DX2-66

NCR® StarStation

NCR System 3000 Model 3314

NCR System 3000 Model 3335

NCR System 3000 Model 3350

NCR System 3000 Model 3355

NCR System 3000 Model 3410

NCR System 3000 Model 3431

NCR System 3000 Model 3445

NCR System 3000 Model 3525

NEC® Express 4100ST

NEC Express/II P601 LT

NEC Express/II P60ST

NEC Image 4100es

NEC Image 466

NEC PowerMate 466D

NEC PowerMate 466es

NEC PowerMate 486/33e

NEC Ready 466D

NEC Ready 466es

NEC Versa E

NETiS 486DX-40 PCI

NETiS 486DX/33 VL

NETiS 486DX/50 VL

NETiS 486DX2/50

NETiS 486DX2/50 PCI

NETiS 486DX2/66 PCI

NETiS 486DX2/66 VL

NETiS 486DX33 PCI

NETiS AMD 486 DX 40 VL

NETiS AMD 486 DX2/50

NETiS AMD 486DX2/50 PCI

NETiS Pentium 60 PCI

NETiS Pentium 66 PCI

NETiS Pentium 90

Network Connection Triumph® M2

Network Connection Triumph M2V

Network Connection Triumph T3000

Network Connection Triumph T4000

Network Connection Triumph TNX

Nienschaunz Favourite Entry Server 466P

Nienschaunz Favourite Giant 590P

Nienschaunz Favourite Giant 592EP

Nienschaunz Favourite Graphics Station 566P

Nienschaunz Favourite Server 590P

Nienschaunz Favourite Server M566PE

Nienschaunz Professional 4100VP

Northgate® Elegance 333

Northgate Elegance 433i

Northgate Elegance SP 433

Northwest Micro OfficePRO-G 486DX/33

Northwest Micro OfficePRO-G 486DX2/66

Northwest Micro OfficePRO-GP 486DX/33

Northwest Micro OfficePRO-GP 486DX2/66

OKI if 486VX550D

OKI if Server 466/SL

OKI if Server 566/SL

OKI if Station 425/DL

OKI if Station 433/DE

OKI if Station 466/DE

OKI if Station 560/DE

Olidata MDS-P60/A

Olidata MDS-P90/A

Olivetti® LSX5010

Olivetti LSX5015

Olivetti LSX5025

Olivetti LSX5025 E

Olivetti M4-40

Olivetti M4-452

Olivetti M4-464

Olivetti M4-60

Olivetti M4-82

Olivetti M400-40

Olivetti M400-60

Olivetti M6-440

Olivetti M6-460

Olivetti M6-540

Olivetti M6-620

Olivetti M6-640

Olivetti M6-770

Olivetti M6-880

Olivetti SNX 140 Systema

Olivetti SNX 140/R Systema

Olivetti SNX 160 Systema

Olivetti SNX 160/R Systema

Olympia Olystar 400D-66 EISA

Omni Tech 5100

Omni Tech 5300

Omni Tech 8600 486DX2-66

Optima OCT 486DX/33 VL Green Desktop

Optima OCT 486DX/4 100 PCI Local Bus

Optima OCT 486DX/4 100 Vesa  Local Bus

Optima OCT 486DX2/50 VL Desktop Green

Optima OCT 486DX2/50 VL Mini Tower Green

Optima OCT 486DX2/50 VL Slimeline WorkStation Green

Optima OCT 486DX2/50 VL Tower Green

Optima OCT 486DX2/66 PCI Desktop

Optima OCT 486DX2/66 PCI Mini Tower

Optima OCT 486DX2/66 PCI Slimline WorkStation

Optima OCT 486DX2/66 PCI Tower

Optima OCT 486DX2/66 VL

Optima OCT 486DX2/66 VL Green Desktop

Optima OCT 486DX2/66 VL Mini Tower Green

Optima OCT 486DX2/66 VL Slimline WorkStation Green

Optima OCT 486DX2/66 VL Tower Green

Optima OCT 486DX33 PCI Desktop

Optima OCT 486DX33 PCI Mini Tower

Optima OCT 486DX33 PCI Slimline WorkStation

Optima OCT 486DX33 PCI Tower

Optima OCT 486DX33 VL Mini Tower Green

Optima OCT 486DX33 VL Slimline WorkStation Green

Optima OCT 486DX33 VL Tower Green

Optima OCT 486DX4/100 VL Desktop

Optima OCT 486SX33 PCI Bus Desktop

Optima OCT 486SX33 PCI Mini Tower

Optima OCT 486SX33 PCI Slimline WorkStation

Optima OCT 486SX33 PCI Tower

Optima OCT 486SX33 VL

Optima OCT DX4/100 VL Mini Tower Green

Optima OCT DX4/100 VL Slimline WorkStation Green

Optima OCT DX4/100 VL Tower Green

Optima OCT PENTIUM 60 PCI Desktop

Optima OCT PENTIUM 60 PCI Tower

Optima OCT PENTIUM 66 PCI Desktop

Optima OCT PENTIUM 66 PCI MXpress

Optima OCT PENTIUM 66 PCI Tower

Optima OCT PENTIUM 90 PCI Tower

Optima Pentium 90 PCI Desktop

Optima Sprinter 486DX2/50 VL Desktop Green

Optima Sprinter 486DX2/50 VL Mini Tower Green

Optima Sprinter 486DX2/50 VL Slimline WorkStation Green

Optima Sprinter 486DX2/50 VL Tower Green

Optima Sprinter 486DX2/66 PCI Desktop

Optima Sprinter 486DX2/66 PCI Mini Tower

Optima Sprinter 486DX2/66 PCI Slimline WorkStation

Optima Sprinter 486DX2/66 PCI Tower

Optima Sprinter 486DX2/66 VL

Optima Sprinter 486DX2/66 VL Desktop Green

Optima Sprinter 486DX2/66 VL Mini Tower Green

Optima Sprinter 486DX2/66 VL Slimline WorkStation  Green

Optima Sprinter 486DX2/66 VL Tower Green

Optima Sprinter 486DX33 PCI Desktop

Optima Sprinter 486DX33 PCI Mini Tower

Optima Sprinter 486DX33 PCI Slimline WorkStation

Optima Sprinter 486DX33 PCI Tower

Optima Sprinter 486DX33 VL Desktop Green

Optima Sprinter 486DX33 VL Mini Tower Green

Optima Sprinter 486DX33 VL Slimline WorkStation Green

Optima Sprinter 486DX33 VL Tower Green

Optima Sprinter 486SX33 PCI Desktop

Optima Sprinter 486SX33 PCI Mini Tower

Optima Sprinter 486SX33 PCI Slimline WorkStation

Optima Sprinter 486SX33 PCI Tower

Optima Sprinter 486SX33 Vesa Local Bus

Optima Sprinter DX4/100 VL Desktop Green

Optima Sprinter DX4/100 VL Mini Tower Green

Optima Sprinter DX4/100 VL Slimline WorkStation Green

Optima Sprinter DX4/100 VL Tower Green

Optima Sprinter P560 PCI

Optima Sprinter P566 PCI ISA

Optima Sprinter PENTIUM 60 PCI Desktop

Optima Sprinter PENTIUM 60 PCI Tower

Optima Sprinter PENTIUM 66 PCI Desktop

Optima Sprinter PENTIUM 66 PCI MXpress

Optima Sprinter PENTIUM 66 PCI Tower

Optima Xpress/ MX PENTIUM 60 EISA

Optima Xpress/ MX PENTIUM 66 EISA

Osborne DX4-100

Osborne LP4D-33

Osborne LP4D-50

Osborne LP4D-50A

Osborne LP4D-66

Osborne LP4D-66A

Osborne LP4S-33

Osborne LP4S-50

Osborne MT4D-66E

Osborne MT5D-60P

Osborne MT5D-66P

Osborne Pentium 90

Osborne Wedgetail 1

Packard Bell 430ES-DX334

Packard Bell 430ES-SX254

Packard Bell 486MT250 AUS

Packard Bell 486SX170 AUS (incl. 486SXMM AUS)

Packard Bell A400

Packard Bell A430

Packard Bell A440

Packard Bell ALG115

Packard Bell ALG1166

Packard Bell ALG207 (incl ALG233)

Packard Bell ALG2276MT

Packard Bell ALG747MT

Packard Bell ALLURA25

Packard Bell AX 120CD

Packard Bell AX 121CD

Packard Bell AX 122CDT

Packard Bell AX 43CD

Packard Bell AX 45CDT

Packard Bell AX 46CD

Packard Bell AX 47CD

Packard Bell AX 48CD

Packard Bell AX 49CDT

Packard Bell AX 51CDT

Packard Bell AX1033

Packard Bell AX105 (incl. AX106)

Packard Bell AX1066

Packard Bell AX2005+MM (incl. AX2005MM, AX2005MMH Models)

Packard Bell AX2007MM

Packard Bell AX2008MM MT

Packard Bell AX2033MT

Packard Bell AX2047MM

Packard Bell AX205 (incl. AX230)

Packard Bell AX2066 (incl. AX2066+MT,  AX2066MT Models)

Packard Bell AX2077+MT (inc. AX2077MT, AX2078+ Models)

Packard Bell AX410E

Packard Bell AX410H

Packard Bell AX410WG

Packard Bell AX4500 (incl. AX4700MM)

Packard Bell AX450G

Packard Bell AX533H

Packard Bell AX533H (incl. AX533J)

Packard Bell AX533J

Packard Bell AX630+MT(incl. AX630MT, AX635+MT, AX535MT Models)

Packard Bell Axcel 105

Packard Bell Axcel 1066

Packard Bell Axcel 130

Packard Bell Axcel 2005

Packard Bell Axcel 2033 Minitower

Packard Bell Axcel 205

Packard Bell Axcel 205 (incl Axcel 230)

Packard Bell Axcel 2066 Minitower

Packard Bell Axcel 230

Packard Bell Axcel 630 Minitower

Packard Bell BC425

Packard Bell BLG2133MT

Packard Bell BLG2276MT

Packard Bell BLG233

Packard Bell CAX1033

Packard Bell CAX105 (incl CAX106)

Packard Bell CAX1066 (incl. CAX2066, CAX2066+ Models)

Packard Bell CAX2005+HMM (incl. CAX2005MM)

Packard Bell CAX205 (incl. CAX230, CAX630 Models)

Packard Bell CAX4500 (incl. CAX4700MM)

Packard Bell CF110

Packard Bell CF1137

Packard Bell CF1177 (incl. CF1178)

Packard Bell CF200 (incl. CF204)

Packard Bell CF2020+

Packard Bell CF2068 (incl CF2386, CF2386+, CD2387 Models)

Packard Bell CF4800 (incl. CF4900MM)

Packard Bell CF715

Packard Bell CLG1133 (incl. CLG1134 ELITE)

Packard Bell CLG115 (incl. CLG115+)

Packard Bell CLG1166 (incl. CLG1166+, CLG1176 Models)

Packard Bell CLG1910SMM (incl CLG2000MM)

Packard Bell CLG2016MM (incl. CLG2035MM)

Packard Bell CLG2075 MM

Packard Bell CLG2133

Packard Bell CLG2176 ELITE (incl. CLG2276, CLG2276+ Models)

Packard Bell CLG233 (incl. CLG233+, CLG234 ELITE,CLG236 Models)

Packard Bell CLG33D SUPR (incl. CLG33T SUPR)

Packard Bell CLG5000 (incl. CLG5200MM)

Packard Bell CLG695 SUPR (incl. CLG725 SUP)

Packard Bell CLG747F

Packard Bell CLG780 SUPR (incl. CLG790 SUP)

Packard Bell CLG896 SUP

Packard Bell CPB1020MM

Packard Bell CPB1030MM

Packard Bell CPB1060MT

Packard Bell CPM1950 (incl. CPM1950+MM, CPM2050MM Models)

Packard Bell CPM1984MM

Packard Bell CPM633

Packard Bell CPM67

Packard Bell CPM733

Packard Bell CPM766

Packard Bell D1725+MM (incl. D1725MM)

Packard Bell DMM 70

Packard Bell DPM 6800CD

Packard Bell F 101CD

Packard Bell F 102CD

Packard Bell F 103CD

Packard Bell F 111CDT

Packard Bell F 15

Packard Bell F 53CD

Packard Bell F 54CD

Packard Bell F 55CDT

Packard Bell F 55CDT Plus

Packard Bell F 56CD

Packard Bell F 57CD

Packard Bell F 57CDT

Packard Bell F 58CD

Packard Bell F 59CDT

Packard Bell F1066 (incl. F1177, F1177+ Models)

Packard Bell F107 (incl. F107 Plus)

Packard Bell F1135 (incl. F1137)

Packard Bell F1150

Packard Bell F200 (incl. F204, F205, F250 Models)

Packard Bell F2030MM

Packard Bell F2040MM (incl. F2048MM, F2049MM Models)

Packard Bell F2067MM (incl. F2068MM)

Packard Bell F2133MT (incl. F2233MT)

Packard Bell F2280MT (incl. F2386+, , F2386MT Models)

Packard Bell F2376 (incl. F2376F) F2386+, F2280MT, F2386MT Mod)

Packard Bell F4800 (incl. F4900MM)

Packard Bell F486DX/DH

Packard Bell F486DX/DH (incl. F486DX/DJ, F486DX/DJ-W Models)

Packard Bell F486DX/DJ

Packard Bell F486DX/DJ-W

Packard Bell F486SX-WG

Packard Bell F486SX/BE

Packard Bell F486SX/BH2

Packard Bell F715MT

Packard Bell FIDX2-504 TWR (incl. FIDX2-504 4X4)

Packard Bell Force 1066

Packard Bell Force 107

Packard Bell Force 1135 (incl. Force 1137)

Packard Bell Force 200

Packard Bell Force 200 (incl. Force 250)

Packard Bell Force 2040 Minitower

Packard Bell Force 2233 Minitower

Packard Bell Force 2376

Packard Bell Force 2376F

Packard Bell Force 2386 Minitower

Packard Bell Force 250

Packard Bell Force 386

Packard Bell Force 715 Minitower

Packard Bell Force 715 Mintower

Packard Bell GP321DX2-508 TWR

Packard Bell L430G

Packard Bell L430WG

Packard Bell L435E Elite

Packard Bell L435E2 Elite

Packard Bell LC321DX2-504 4X4

Packard Bell Legend 102 Elite

Packard Bell Legend 102H

Packard Bell Legend 1133 (incl. Legend 1134 Elite)

Packard Bell Legend 1135 (incl. Legend 1136)

Packard Bell Legend 115

Packard Bell Legend 1166

Packard Bell Legend 1176

Packard Bell Legend 120 (incl Legend 125)

Packard Bell Legend 127

Packard Bell Legend 128

Packard Bell Legend 135H

Packard Bell Legend 140

Packard Bell Legend 1900

Packard Bell Legend 1910

Packard Bell Legend 2000

Packard Bell Legend 207

Packard Bell Legend 207 (incl. Legend 233)

Packard Bell Legend 2133 Minitower (incl Legend 2135 Minitower)

Packard Bell Legend 2176 Elite MT

Packard Bell Legend 2266 Minitower

Packard Bell Legend 2270 Minitower

Packard Bell Legend 2276 Minitower

Packard Bell Legend 2300 Minitower

Packard Bell Legend 233

Packard Bell Legend 234 Elite

Packard Bell Legend 234 Elite (incl. Legend 245)

Packard Bell Legend 245

Packard Bell Legend 66D Supreme

Packard Bell Legend 66T Supreme

Packard Bell Legend 695 Supreme

Packard Bell Legend 747 Minitower

Packard Bell Legend 747 Minitower (incl Legend 780 Minitower)

Packard Bell Legend 780 Supreme

Packard Bell Legend 840 Minitower

Packard Bell Legend 840 Minitower (incl. Legend 845 Minitower)

Packard Bell Legend 845 Minitower

Packard Bell Legend 848 Minitower

Packard Bell LG 100CD

Packard Bell LG 104CD SUP

Packard Bell LG 105CD

Packard Bell LG 110CDT

Packard Bell LG 11CD

Packard Bell LG 12CD

Packard Bell LG 14CDT

Packard Bell LG 18CD

Packard Bell LG 200CD

Packard Bell LG 205CD

Packard Bell LG 20CD

Packard Bell LG 210CDT

Packard Bell LG 21CD

Packard Bell LG 22CD

Packard Bell LG 23CD

Packard Bell LG 24CD

Packard Bell LG 25CDT

Packard Bell LG 26CDT

Packard Bell LG 27CDT

Packard Bell LG 28CDT

Packard Bell LG 29TV

Packard Bell LG 30CD SUP

Packard Bell LG 34CD SUP

Packard Bell LG 35CD SUP

Packard Bell LG 38CD SUP

Packard Bell LG 39CD

Packard Bell LG 42CD

Packard Bell LG 5

Packard Bell LG 61CD

Packard Bell LG 62CDT

Packard Bell LG 63CDT

Packard Bell LG 64TV

Packard Bell LG 9CD

Packard Bell LG101H (incl. LG115, LG115 PLUS, LG120 Models)

Packard Bell LG1050 (incl. LG1140)

Packard Bell LG1133 (incl. LG1134 ELITE, LG1135, LG1136 Models)

Packard Bell LG1150 (incl. LG1155MT, LG1156 Models)

Packard Bell LG1166 (incl. LG1166+, LG1166A Models)

Packard Bell LG1170 (incl. LG1170MT, LG1170C, LG1176 Models)

Packard Bell LG1333

Packard Bell LG145 (incl LG207, LG230E, LG233, LG233+ Models)

Packard Bell LG1900MM (incl. LG1910SMM)

Packard Bell LG1956SUP MM

Packard Bell LG1966SUPMM

Packard Bell LG2000E+MM (incl LG2000EMM)

Packard Bell LG2000MM (incl. LG2000+MM)

Packard Bell LG2009+MM (incl. LG2009MM, LG2012MM Models)

Packard Bell LG2016MM (incl. LG2033MM, LG2035MM Models)

Packard Bell LG2037MM (incl. LG2040MM, LG2078MM MT Models)

Packard Bell LG2038E MM (incl LG2045MM, LG2059MM Models)

Packard Bell LG2050MM

Packard Bell LG2064MM (incl. LG2066MM,LG2068MM,LG2069MM Models)

Packard Bell LG2070MM (incl. LG2075MM)

Packard Bell LG2133 (incl. LG2135MT)

Packard Bell LG2150MM

Packard Bell LG2176EMT (incl. LG2177EMT)

Packard Bell LG2266MT

Packard Bell LG2270MT (incl. LG2271MT)

Packard Bell LG2276+MT (incl. LG2276MT, LG2276MTC Models)

Packard Bell LG2280MT (incl. LG2280MTC)

Packard Bell LG2300MM (incl. LG23040)

Packard Bell LG234 ELITE (incl. LG245)

Packard Bell LG25TVSUPMM

Packard Bell LG33T SUPR

Packard Bell LG430WG Elite

Packard Bell LG445E2 Elite

Packard Bell LG445G Elite

Packard Bell LG445G2 Elite

Packard Bell LG5000 (incl. LG5200MM)

Packard Bell LG5900SUPMM

Packard Bell LG635J

Packard Bell LG635J (incl. LG660H)

Packard Bell LG660H

Packard Bell LG66D SUPR (incl. LG66T, LG896SUP Models)

Packard Bell LG695 SUPR

Packard Bell LG747DMT (incl . LG747F, LG747 MT, LG749MT)

Packard Bell LG760 Supreme

Packard Bell LG780 SUPR (incl. LG790SUP)

Packard Bell LG810MT (incl. LG840MT, LG843+MT, LG843MT Models)

Packard Bell LG845MT (incl. LG845MTH, LG 848MT, LG855MT Models)

Packard Bell LG855MTH (incl. LG860MT, LG933MT S Models)

Packard Bell LG885SUP

Packard Bell M PM65

Packard Bell MF 2133S MT (incl MF 2233S)

Packard Bell MF1066S

Packard Bell MF1137S

Packard Bell MLG1136 (incl.MLG1136S)

Packard Bell MLG115

Packard Bell MLG1166 (incl MLG1166S)

Packard Bell MLG207 (incl. MLG233)

Packard Bell MLG2276MT

Packard Bell MLG747MT

Packard Bell MPB1120SH

Packard Bell MPB400

Packard Bell MPB430

Packard Bell MPB440

Packard Bell PackMate 733 C MT

Packard Bell PB 1110

Packard Bell PB 1120

Packard Bell PB 1150

Packard Bell PB 11CD

Packard Bell PB 1555CD

Packard Bell PB 209

Packard Bell PB 20CD

Packard Bell PB 20CD+

Packard Bell PB 25 (incl PB26CD)

Packard Bell PB 28CDT

Packard Bell PB1020MM

Packard Bell PB1030MM (incl. PB1520MM)

Packard Bell PB1103 AUS (incl. PB104 AUS, 1108 AUS Models)

Packard Bell PB1108HMM (incl. PB1110MM AU)

Packard Bell PB1120 (incl. PB1120H+)

Packard Bell PB1150+MM (incl. PB1150MM)

Packard Bell PB2002MM (incl. PB2008MM)

Packard Bell PB2011MM (incl. PB2034MM)

Packard Bell PB208CD

Packard Bell PB2555CD

Packard Bell PB410SX/25

Packard Bell PB410SX/33

Packard Bell PB4200

Packard Bell PB420DX/33

Packard Bell PB420DX2/66

Packard Bell PB420SX/33

Packard Bell PB430DX/25

Packard Bell PB430DX/33

Packard Bell PB430DX2/50

Packard Bell PB430DX2/66

Packard Bell PB430SX/25

Packard Bell PB430SX/33

Packard Bell PB450DX/33

Packard Bell PB450DX2/50

Packard Bell PB450DX2/66

Packard Bell PB450SX/25

Packard Bell PB450SX/33

Packard Bell PB486DX2/50A

Packard Bell PB486SX/33A

Packard Bell PB486T66

Packard Bell PB520R

Packard Bell PB527-60

Packard Bell PB550

Packard Bell PB566

Packard Bell PB609H (incl. PB610, PB610 W/PRINT, PB610H Models)

Packard Bell PB7622MT

Packard Bell PM 2050

Packard Bell PM 27

Packard Bell PM 3900G

Packard Bell PM 48CD

Packard Bell PM 4CD

Packard Bell PM 50CD (incl. PM 52CD)

Packard Bell PM 66CD

Packard Bell PM 67

Packard Bell PM 74CD

Packard Bell PM M65

Packard Bell PM1950+MM (incl. PM2050MMC)

Packard Bell PM1950MM

Packard Bell PM1981MM

Packard Bell PM1988MM (incl. 1990MMC)

Packard Bell PM486DX/33X

Packard Bell PM486DX33X

Packard Bell PM486DX33Y

Packard Bell PM486SX/25W

Packard Bell PM486SX25U

Packard Bell PM486SX25U2

Packard Bell PM486SX25X

Packard Bell PM5900GMM

Packard Bell PM733MTC (incl. PM750C)

Packard Bell PM76

Packard Bell PM766MTC

Packard Bell PM850C

Packard Bell PM966

Panasonic® CF-41/100M

Panasonic CF-41/50M

Patch Computers Supra 3600 PENTIUM 60 NOTEBOOK

Patch Computers Supra PENTIUM 90 PCI/EISA

PC Expanders VANGUARD 486DX ISA/VESA 33Mhz

PC Expanders VANGUARD PENTIUM VESA/PCI 90Mhz

PC Tech 486DX2/66 (AMD) VL

PC Tech 486DX33 (AMD) VL

PC Tech 486VL33

PC Tech VLB 486DX-4/100

PC Tech VLB 486DX2/66

Peacock Server Modell SSE 8364

PEX 410M

PEX 433M

PEX 450M

PEX 466M

PEX 486DM-100 (incl. DP and DE Models)

PEX 486DM-33 (incl DP and DE Models)

PEX 486DM-33E (incl. DP and DE Models)

PEX 486DM-40E (incl. DP and DE Models)

PEX 486DM-50 (incl DP and DE Models)

PEX 486DM-50E (incl. DP and DE Models)

PEX 486DM-66 (incl. DP and DE Models)

PEX 486DM-S50 (incl. DP and DE Models)

PEX 486DX-33 ELP

PEX 486DX-33 Mini

PEX 486DX-33 Mini 72P

PEX 486DX-33 Tower

PEX 486DX-33E Mini

PEX 486DX2-50 ELP

PEX 486DX2-50 Mini

PEX 486DX2-50 Mini 72P

PEX 486DX2-50 Tower

PEX 486DX2-50E ELP

PEX 486DX2-50E Mini

PEX 486DX2-66 ELP

PEX 486DX2-66 Mini

PEX 486DX2-66 Mini 72P

PEX 486DX2-66 Tower

PEX 486DX4-100 Mini

PEX 486SX-25 ELP

PEX 486SX-25 Mini

PEX 486SX-33 ELP

PEX 486SX-33 Mini

PEX 486SX-33 Tower

PEX 560M

PEX DM-S33 (incl. DP and DE Models)

PEX LT433C Notebook

PEX Platinum DM90

PEX Platinum DP90

PEX Plato P54C

PEX SMP50P

PEX SMP66P

Pionex 486DX2-66

Pionex 486DX4-100

Pionex P5/66

Pionex P5/90

Polaris 486DX4-100 VL

Polaris Pentium 90

Poly 486-50E

Poly 486SX-25Y

Poly 586EP2

Polywell Poly 486EISA-100

Polywell Poly 590P1

Polywell Poly 590P5

Polywell Poly 590VP

Porchester  SKAI EISA DX2-66

Porchester  SKAI PCI DX2-66

Porchester  SKAI PCI DX4-100

Porchester  SKAI PCI PENTIUM-60

Porchester  SKAI VLB DX2-66

Porchester  SKAI VLB PENTIUM-60

Porchester  SKAI VLB/G DX2-66

POWER DESK 486/33

POWER DESK EISA/ISA/VESA

POWER DESK GREEN

POWER DESK PCI Pentium

Powerland Power2  486dx-2/66 VLB

Powerland Power2 Pent-60 PCI

Powerland Power2 Pent-90 PCI

Precision 486/66 VL-Bus

Precision Pentium Eisa-Vesa

Professional 486DX4-100 VL

Professional Concepts Beeker 4-33/VL2

Professional Concepts Beeker 4-66/VL2

Professional Concepts Beeker 6900

Professional Concepts Quinn 4-33/VLE

Professional Concepts Quinn 4-66/VLE

Professional Concepts Saavij 4-33/VL3

Professional Concepts Saavij 4-33/VL3 Model E

Professional Concepts Saavij 4-50/VL3

Professional Concepts Saavij 4-66/VL3

Professional Concepts Saavij 4-66/VL3 Model E

Professional Concepts Saavij 4-66/VL3 Model S

Professional Pentium 90

Progress Systems Inc. Ideal Pentium 90

ProSpec 486DX-33 ISA/VLB

ProSpec 486DX-50 EISA/VLB

ProSpec PENTIUM 60 EISA/PCI

Protech 486-66Mhz ISA/VL

Protech Pentium PCI/ISA

QTech 486 DX2/66

Quantex 486DX2/66

Quantex 486DX4-100

Quantex P5/66

Quantex P5/90

Quattro® Prompt486/66 VL

Quattro Prompt586

Radisys EPC-7

Radisys EPC-8

RDIpc Systeme Pentium-90

Reason Technology 4 LX Plus 486DX2/66

Reason Technology Square 4LX W32i Mitsumi FX001D

Reason Technology Square 4LX/AIO

Reason Technology Square 5 P/I-60

Reason Technology Square 5 P/I-90

Reason Technology Square 5VL

Repco Data Pentium/I

Repco Data R33VLB486

Repco Data R50VLB486

Repco Data R66VLB486

Reply PS/2 Model 50/50SX Power Board Upgrade 486DX4/100

Reply PS/2 Model 50/50SX System Board Upgrade 486SLC2/50

Reply PS/2 Model 55/55SX Power Board Upgrade 486DX

Reply PS/2 Model 56/57 PowerBoard Upgrade 486DX4-100

Reply PS/2 Model 60/80 System Board Upgrade 486DX2/66

Reply PS/2 Model 70 PowerBoard Upgrade 486DX4/100

Reply PS/2 Model 70 System Board Upgrade 486DX2/66

Research Machines RM D Series PC-466

Research Machines SYSTEMBASE

Robotech Cobra P90

Robotech Cobra RS 486DX2-66

Rolta STATION 486/66 ENGG.

Samsung P5 Workstation

Samsung SPC5800N

Samsung SPC7600P VW234L

Samsung SPC7600P VW242H

Sanyo MBC-20CV

Sanyo MBC-NJ

Sanyo MBC-SNJ

SCA Professional 486DX4-100 PCI

SCA Professional EISA 486

SCA Professional Pentium 66 EISA-PCI

SCA Professional Pentium 90 EISA/PCI

Seanix ASI 9000 9D266AV08C

Seanix ASI 9000 9D266IV08C

Seanix ASI 9000 9D499IO16C

Seanix ASI 9000 9P590IO16C

Seanix ASI 9000 9P599IO16C

Seanix ASI 9000 EFAR 486DX2-66

Seanix ASI 9000 P5PCI-VL

Seanix ASI 9000 PREMIERE PENTIUM PCI-60

Seanix ASI 9000 YUKON 486DX-33

Seanix ASI 9000 YUKON 486DX2-66

Seanix ASI 9000 YUKON 486DX4-100

Seanix ASI 9000 YUKON S801 486DX2-50

Serius Systems Technology 486/66 EISA

Shuttle HOT-407 EISA/VESA/DX2-66

Shuttle HOT-409 VLB/DX2-50

Shuttle HOT-409 VLB/DX2-66

Shuttle HOT-419 DX-50

Shuttle HOT-419 DX2-50

Shuttle HOT-419 DX2-80

Shuttle HOT-419 DX4-100

Shuttle HOT-419 VLB/DX2-66

Shuttle HOT-428 PCI/VESA/ISA

Shuttle HOT-503 PENTIUM/60

Shuttle HOT-503 PENTIUM/66

Shuttle HOT-523 PCI/PENTIUM/60

Shuttle HOT-523 PCI/PENTIUM/66

Shuttle HOT-523 PENTIUM/60/VESA/ISA/PCI

Shuttle HOT-523 PENTIUM/66/VESA/ISA/PCI

Shuttle HOT-528 EISA/PCI PENTIUM/60

Shuttle HOT-543 VESA/ISA/PCI/P90

Siemens-Nixdorf PCD-4H

Siemens-Nixdorf PCD-4H PCI

Siemens-Nixdorf PCD-4H VL

Siemens-Nixdorf PCD-4L

Siemens-Nixdorf PCD-4L VL

Siemens-Nixdorf PCD-4ND

Siemens-Nixdorf PCD-4T

Siemens-Nixdorf PCD-5H

Siemens-Nixdorf PCD-5T 90 E

Siemens-Nixdorf PCD-5T/PCI 60E

Siemens-Nixdorf PCE-5S/60

Siemens-Nixdorf SCENIC 4H

Siemens-Nixdorf SCENIC 4T

Siemens-Nixdorf SCENIC 4T VL

Siemens-Nixdorf SCENIC 5H

Siemens-Nixdorf SCENIC 5T PCI

SKAI AXIOM 486DX-33

SKAI AXIOM 486DX2-66

SKAI PCI 486DX2-66

SKAI SPECTRUM 486SX-33

Softlet Standard 486DX2-66 VL/PCI

Softlet Standard Pentium 60/PCI

Softlet Standard Pentium 90/PCI I/O

SPC™ TRADING AB SPC P-90 Ergoline

SRC Systems 486 VL

SRC Systems 486 VL Plus

SRC Systems Pentium 90

SRC Systems Pentium 90S

SRC Systems Pentium PCI

STD GOLD 560D

STD PLATINUM 590D

STS Tecom Gmbh STS-486DX/PCIG

STS Tecom Gmbh STS-486SL/40

STS Tecom Gmbh STS-P5/66IS

STS Tecom Gmbh STS-P54/90IS

SUPERCOM 3/486

Supra 486DX-33 VESA/ISA

Supra 486DX2-66 VESA/ISA

Supra 486DX4-100 VESA/ISA

Supra 486SX-33 VESA/ISA

Supra 9200 i486DX2-66 NOTEBOOK

Supra PENTIUM 60 PCI/ISA

Svensk LAPLINE 3600

Swan 486DX2/66 EISA-DB

Syncomp Mega 486DX2/EISA

Syncomp Mega 486DX2/VLG

Syncomp Mega 486DX2/VLPCI

Syncomp Mega 486DX4/VLPCI

Syncomp Mega 486SX/VLB

Syncomp Mega 486SX/VLPCI

Syncomp Mega PENTIUM EISA/PCI

Syncomp Mega PENTIUM/PCI

Syncomp Microstar 486DX2/VLB

Syncomp Microstar 486DX4/VLB

Syncomp Microstar 486SX/VLB

Syncomp Mini 486DX2 /PCI PC

Syncomp Mini 486DX2/EISA

Syncomp Mini 486DX2/VLB

Syncomp Mini 486DX2/VLPCI

Syncomp Mini 486DX4/VLPCI

Syncomp Mini 486SX/EISA PC

Syncomp Mini 486SX/PCI PC

Syncomp Mini 486SX/VLB

Syncomp Mini 486SX/VLPCI

Syncomp Mini PENTIUM EISA/PCI

Syncomp Mini PENTIUM/PCI

T-DATA LIN 486-40 DX

T-DATA LIN 486-50 DX2

T-DATA LIN 486-66 DX2

T-DATA LIN Pentium

Tandy® 4100 MT

Tandy MMPC

Tangent Just N' Case Dual SMP Server

Tangent Just N' Case Dual SMP Server 250

Tangent P590 PCI EISA Dual SMP /M

Tangent P590 PCI EISA Dual SMP /T

Tangent P590 PCI EISA Dual SMP PowerStation

Tangent P590 PCI EISA Dual SMP Server

Tangent VL433 Server

Tangent VL433sd

Tangent VL433sm

Tangent VL433st

Tangent VL450 Server

Tangent VL450d

Tangent VL450m

Tangent VL450t

Tatung TCS-5600P5 PCI/EISA

Tatung TCS-9130DX266 VL/PCI

Tatung TCS-9130DX4 VL/PCI

Tatung TCS-9130SX33 VL/PCI

Tatung TCS-9345DX266 VL/PCI

Tatung TCS-9345DX4 VL/PCI

Tatung TCS-9345SX33 VL/PCI

Tatung TCS-9510 VL ISA

Tatung TCS-9545DX266 ISA/PCI

Tatung TCS-9545DX4 ISA/PCI

Tatung TCS-9545SX33 ISA/PCI

Tatung TCS-9546DX266 ISA/PCI

Tatung TCS-9546DX4 ISA/PCI

Tatung TCS-9560DX266 ISA/PCI

Tatung TCS-9560DX4 ISA/PCI

Tatung TCS-9730DX266 VL/PCI

Tatung TCS-9730DX4 VL/PCI

Tatung TCS-9730SX33 VL/PCI

Techway Endeavour E62VL

Techway Endeavour E62VL-D SX33 Green

Techway Endeavour E62VL-GX4

Techway Endeavour E62VL-M SX33 Green

Techway Endeavour E62VL-T SX33 Green

Techway Endeavour E77VL

Techway Endeavour E77VL-D DX2/66 Green

Techway Endeavour E77VL-D DX33 Green

Techway Endeavour E77VL-D DX4/100 Green

Techway Endeavour E77VL-GX4

Techway Endeavour E77VL-M DX2/66 Green

Techway Endeavour E77VL-M DX33 Green

Techway Endeavour E77VL-M DX4/100 Green

Techway Endeavour E77VL-T DX2/66 Green

Techway Endeavour E77VL-T DX33 Green

Techway Endeavour E77VL-T DX4/100 Green

Techway Endeavour E84VL

Techway Endeavour E84VL-GX4

Techway Endeavour E84VL100-GX4

TELEMECANIQUE FTX507-8C

Texas Instruments® TravelMate™ 4000 WinDX2 11

Texas Instruments TravelMate 4000E in TravelMate DeskTop

Texas Instruments TravelMate TM4000E TFT

Texas Instruments TravelMate TM4000M TFT

Tomtronic HIGHNAME DX2 66MHz PCI /ISA

Tomtronic HIGHNAME Pentium 90MHz  PCI

Toshiba® T1910CS/200

Toshiba T1950CT/320

Toshiba T2400CS/250

Toshiba T2400CT/320

Toshiba T3600CT/250 12

Toshiba T4400SX

Toshiba T4400SXC

Toshiba T4600C/200 12

Toshiba T4700CT/320

Toshiba T4800CT/500

Toshiba T4850CT/500

Toshiba T4900CT/810

Touch 410M

Touch 433M

Touch 450M

Touch 466M

Touch 486DM-100 (incl. DP and DE Models)

Touch 486DM-33 (incl DP and DE Models)

Touch 486DM-33E (incl. DP and DE Models)

Touch 486DM-40E (incl. DP and DE Models)

Touch 486DM-50 (incl DP and DE Models)

Touch 486DM-50E (incl. DP and DE Models)

Touch 486DM-66 (incl. DP and DE Models)

Touch 486DM-S50 (incl. DP and DE Models)

Touch 486DX-33 ELP

Touch 486DX-33 Mini

Touch 486DX-33 Mini 72P

Touch 486DX-33 Tower

Touch 486DX-33E Mini

Touch 486DX2-50 ELP

Touch 486DX2-50 Mini

Touch 486DX2-50 Mini 72P

Touch 486DX2-50 Tower

Touch 486DX2-50E ELP

Touch 486DX2-50E Mini

Touch 486DX2-66 ELP

Touch 486DX2-66 Mini

Touch 486DX2-66 Mini 72P

Touch 486DX2-66 Tower

Touch 486DX4-100 Mini

Touch 486SX-25 ELP

Touch 486SX-25 Mini

Touch 486SX-33 ELP

Touch 486SX-33 Mini

Touch 486SX-33 Tower

Touch 560M

Touch DM-S33 (incl. DP and DE Models)

Touch LT433C Notebook

Touch Platinum DM90

Touch Platinum DP90

Touch Plato P54C

Touch SMP50P

Touch SMP66P

Tri-Star SOHO Pentium 60

Tri-Star Tri-CAD I PCI/90Mhz

Tri-Star Tri-CAD Ultimate 464V PCI P60

TriGem 486/66VC

TriGem 486G/T10(incl. 486H+ T10G model)

TriGem 486G/T15(incl. 486G+ T15 model)

TriGem 486G/T20

TriGem 486G/T25(incl. 486G+ T25 model)

TriGem 486G/T40(incl. 486H+ T40G,T43G models)

TriGem 486G/T45(incl. 486G+ T45 model)

TriGem 486G/T50

TriGem 486G/T55(incl. 486G+ T55 model)

TriGem 486GP T15

TriGem 486GP T25

TriGem 486GP T45

TriGem 486GP T55

TriGem Gempower 4420

TriGem P5/PT

TriGem P5/T

TriGem P54C/CM

Tulip® DT 4/50

Tulip Vision Line DE 4/100

Tulip Vision Line DE 4/33S

Tulip Vision Line DE 4/50

Tulip Vision Line DE 4/50S

Tulip Vision Line DE 5/60

Tulip Vision Line DE 5/90

Tulip Vision Line DS 4/100

Tulip Vision Line DS 5/60

Tulip Vision Line DS 5/90

Tulip Vision Line DT 4/100

Tulip Vision Line DT 4/33S

Tulip Vision Line DT 4/50S

Tulip Vision Line DT 5/60

Tulip Vision Line DT 5/90

Tulip Vision Line WS 4/33S

U.S. Micro Jet 386DX-33

U.S. Micro Jet 386DX-40

U.S. Micro Jet 486DLC-33

U.S. Micro Jet 486DLC-40

U.S. Micro Jet 486DX-33

U.S. Micro Jet 486DX-40

U.S. Micro Jet 486DX-50

U.S. Micro Jet 486DX2-50

U.S. Micro Jet 486DX2-66

U.S. Micro Jet 486SX-25

U.S. Micro Jet P5-60 PCI/EISA

U.S. Micro Jet P5-60 PCI/ISA

U.S. Micro Jet P5-66 PCI/EISA

U.S. Micro Jet P5-66 PCI/ISA

U.S. Micro Jet P5-90 PCI/ISA

U.S. Micro Jet PCI 486DX-33

U.S. Micro Jet PCI 486DX2-50

U.S. Micro Jet PCI 486DX2-66

U.S. Micro Jet PCI 486SX-25

U.S. Micro Jet VL 486BL-75

U.S. Micro Jet VL 486DX-33

U.S. Micro Jet VL 486DX-40

U.S. Micro Jet VL 486DX-50

U.S. Micro Jet VL 486DX2-50

U.S. Micro Jet VL 486DX2-66

U.S. Micro Jet VL 486DX4-100

U.S. Micro Jet VL 486DX4-75

U.S. Micro Jet VL 486SLC2-50

U.S. Micro Jet VL 486SLC2-66

U.S. Micro Jet VL 486SX-25

U.S. Micro Jet VL/EISA 486DX-33

U.S. Micro Jet VL/EISA 486DX-40

U.S. Micro Jet VL/EISA 486DX-50

U.S. Micro Jet VL/EISA 486DX2-50

U.S. Micro Jet VL/EISA 486DX2-66

U.S. Micro Jet VL/EISA 486SX-25

U.S. Micro Jet VL/PCI 486DX-33

U.S. Micro Jet VL/PCI 486DX2-50

U.S. Micro Jet VL/PCI 486DX2-66

U.S. Micro Jet VL/PCI 486DX4-100

U.S. Micro Jet VL/PCI 486DX4-75

U.S. Micro Jet VL/PCI 486SX-25

Ultra Technologies UL P5 60

Ultra Technologies UL486DX 50

Ultra Technologies UL486DX/2 66

Ultra-Comp 486DX24913

Unidata Power Desk 486 66Mhz PCI

Unique Computers, Ltd. Pentium 60

Unisys® Pathway Series 5669

Unisys Pathway Series CWP41003

Unisys Pathway Series MDP 56052

Unisys Pathway Series PS243-331

Unisys Pathway Series PS243-661

Unisys Pathway Series PS246-331

Unisys Pathway Series PS246-661

Unisys Pathway Series PS255-601

Unisys Pathway Series PSA445-661

Unisys Pathway Series PSA458-601

Unisys PW2 Advantage 3256

Unisys PW2 Advantage 3336

Unisys PW2 Advantage Plus 4668

Unisys SuperGen Series 3500

Unisys SuperGen Series 4000

Unisys SuperGen Series 4100

Unisys SuperGen Series 6000

Unisys SuperGen Series 6100

Unisys SuperGen Series 7000

Unisys SuperGen Series 7100

Unisys SVE 56681

Unisys SVE 590101

Unisys SVE 56691-FDD

Unisys SVI 59071

UNITEK Power Vesa 486DX2

Vektron PCI Power Station P66

Vextrec Technologies VTI-486D66SG

Vextrec Technologies VTIP566PCI

Vextrec Technologies VTIP590PCI

Viglen Contender II

Viglen Eisa Express Single Processor.

Viglen Genie™ 4DX33

Viglen Genie PCI 486DX2/66

Viglen Genie PCI Pentium 66

Viglen Genie PCI Pentium 90

Viglen PCI Pentium 60MHz

Vtech 410M

Vtech 433M

Vtech 450M

Vtech 466M

Vtech 486DM-100 (incl. DP and DE Models)

Vtech 486DM-33 (incl DP and DE Models)

Vtech 486DM-33E (incl. DP and DE Models)

Vtech 486DM-40E (incl. DP and DE Models)

Vtech 486DM-50 (ncl. DP and DE Models)

Vtech 486DM-50E (incl. DP and DE Models)

Vtech 486DM-66 (incl. DP and DE Models)

Vtech 486DM-S33 (incl. DP and DE models)

Vtech 486DM-S50 (incl. DP and DE Models)

Vtech 486DX-33

Vtech 486DX-33 ELP

Vtech 486DX-33 Mini

Vtech 486DX-33 Mini 72P

Vtech 486DX-33 Tower

Vtech 486DX-33E Mini

Vtech 486DX2-50 ELP

Vtech 486DX2-50 Mini

Vtech 486DX2-50 Mini 72P

Vtech 486DX2-50 Tower

Vtech 486DX2-50E ELP

Vtech 486DX2-50E Mini

Vtech 486DX2-66 ELP

Vtech 486DX2-66 Mini

Vtech 486DX2-66 Mini 72P

Vtech 486DX2-66 Tower

Vtech 486DX4-100 Mini

Vtech 486SX-25 ELP

Vtech 486SX-25 Mini

Vtech 486SX-33 ELP

Vtech 486SX-33 Mini

Vtech 486SX-33 Mini 72P

Vtech 486SX-33 Tower

Vtech 560M

Vtech 566M

Vtech LT432 Notebook

Vtech LT433C Color Notebook

Vtech LT433C Notebook

Vtech Platinum DM90

Vtech Platinum DP90

Vtech Plato P54C

Vtech SMP50P

Vtech SMP66P

Wang® DT266

Wang Microsystems PC 350/40C

Western 486V-100 DX4 EISA

Western 486V-100 DX4 VESA

Western 486V-33 DX EISA

Western 486V-33 DX VESA

Western 486V-33 SX VESA

Western 486V-50 DX EISA

Western 486V-50 DX VESA

Western 486V-66 DX2 EISA

Western 486V-66 DX2 VESA

Western 586G 60 EISA/PCI

Western 586G 66 EISA/PCI

WIPRO E-590

WIPRO Fusion 510

WIPRO LANDMARK E SQUARE - MODEL 200

Wyse® Decision 486se-66DX2

Wyse Decision 486si-66DX2

Wyse Forte` GSV

Wyse Series 6000i, Model 665

Zenith® Data Systems Desktop/Tower P5-60

Zenith Data Systems Z-386/33E

Zenith Data Systems Z-486/33E

Zenith Data Systems Z-486/33ET

Zenith Data Systems Z-486SX/25E

Zenith Data Systems Z-NOTEFLEX 486DX4/75

Zenith Data Systems Z-NOTEFLEX 486SX/33

Zenith Data Systems Z-SELECT 100 DX2/66

Zenith Data Systems Z-SELECT PT 58660m

Zenith Data Systems Z-SERVER EX 90E Model 2000

Zenith Data Systems Z-SERVER EX P60E Model 1000A (incl. Model 2000A)

Zenith Data Systems Z-SERVER EX P60E Model 500 (incl. Model 1000)

Zenith Data Systems Z-SERVER EX P90E MODEL 1000

Zenith Data Systems Z-SERVER LT 466XE Model 500 (incl. Model 1000)

Zenith Data Systems Z-SERVER LT P60E Model 1000A (incl. Model 2000A)

Zenith Data Systems Z-SERVER LT P60E Model 500 (incl. Model 1000)

Zenith Data Systems Z-STATION 500 Model 450

Zenith Data Systems Z-STATION 510 DX2/50

Zenith Data Systems Z-STATION 510 DX33

Zenith Data Systems Z-STATION EX  586/90M

Zenith Data Systems Z-STATION EX II 586/90M

Zenith Data Systems Zenith Desktop/Tower Pentium 90

Zenon Z-OPTIMUS PCI,SCSI-II, Pentium/60

ZEOS® 486DX/33ISA

ZEOS 486DX/50

ZEOS Pantera P66


x86 Architecture Multiprocessor Computers

The following x86 architecture multiprocessor systems have been tested.

ACER AcerAltos 17000 / 3255 (2p)

ACER AcerAltos 7000 (Model F560TU)

ACER AcerFrame 3000MP 50 (Model 3257) 10

ALR PROVEISA DMP 4/66D

ALR Revolution MP P/90 (2p) 3

ALR Revolution Q-SMP P/100 (2p) 3

ALR Revolution Q-SMP P/100 (3p) 3

ALR Revolution Q-SMP P/100 (4p) 3

ALR Revolution Q-SMP P/90 (2p) 3

ALR Revolution Q-SMP P/90 (3p) 3

ALR Revolution Q-SMP P/90 (4p) 3

Ambra TP66E2/VL

AST Manhattan SMP 486/50 (4p)

AST Manhattan SMP P60 (4p)

AST Premmia GX P90

COMPAQ ProLiant 2000 Model 486/50

COMPAQ ProLiant 2000 Model 5/66

COMPAQ ProLiant 2000 Model 5/90

COMPAQ ProLiant 2000R Model 486DX/50

COMPAQ ProLiant 2000R Model 5/66

COMPAQ ProLiant 4000 Model 486/50

COMPAQ ProLiant 4000 Model 5/66

COMPAQ ProLiant 4000R Model 5/66

COMPAQ Systempro Dual 486/33

COMPAQ Systempro Dual 486DX2/66

COMPAQ Systempro XL 486/50

COMPAQ Systempro XL 5/66

Corollary Extended C-bus 486DX2/66 (4p)

DELL PowerEdge SP 5100-2

DELL PowerEdge SP 590-2

DELL PowerEdge XE 5100-2

DELL PowerEdge XE 590-2

Everex Step DP (2p)

Hewlett-Packard NetServer 5/66 LM2  13

Hewlett-Packard Vectra XU 590/C (2p)

Intel Xpress Deskside/MX 66Mhz Dual Pentium Processor

Intergraph ISMP22 InterServe

Intergraph ISMP32 InterServe

Intergraph TD 4 Personal Workstation

Intergraph TD 5 Personal Workstation

Modular Server Module Dual Pentium DAC

NCR System 3000 Model 3360 Panther

NCR System 3000 Model 3430

NCR System 3000 Model 3450  14

NCR System 3000 Model 3455

NCR System 3000 Model 3550  14,15

NCR System 3000 Model 3555  14,15

Olivetti LSX5030

Olivetti LSX5040

Polywell DUAL 590EP2

Sequent® WinServer 3000  15

Sequent WinServer 500

Siemens-Nixdorf PCD-5T 90 DE

Unisys Pathway Series SFE 59010

Unisys Pathway Series SME 59010

Wyse Series 7000i Model 740MP/33

Wyse Series 7000i model 740MP/66


MIPS® RISC Architecture Computers

The following MIPS RISC architecture systems have been tested.

ACER ARC1

AcerFormula

Carerra R4000™

DESKStation Technology Evolution E4400 RISC PC

DESKStation Technology Evolution R4000 RISC PC

DESKStation Technology Tyne v4633x RISC PC

MIPS ArcSystem Magnum PC-50

MIPS Millenium PC-50

NEC Image RISCstation

NeTpower NeTstation 100

NeTpower NeTstation 200

NeTpower NeTstation 300

NeTpower Server 1000

Olivetti PWS4000

Progen R4400-50/100

Shuttle RiscPC 4475

Siemens-Nixdorf RM 200 15

Siemens-Nixdorf RM 400 15

UniMicro RISCStation 4400NT


MIPS RISC Multiprocessor Architecture Computers

The following MIPS RISC multiprocessor architecture systems have been tested.

NEC Express RISCserver

NEC RISCstation 2000

NeTpower Server 2000


Digital Alpha AXPTM RISC Architecture Computers
Digital Alpha AXP™ RISC Architecture Computers

The Following Digital Alpha AXP RISC systems have been tested.

Actech ACTion Alpha AXP 150

Aspen Systems Inc.  Alpine 166 RS 15

Aspen Systems Inc.  Alpine 233 XS 15

Digital Equipment Corp. AlphaServer 1000 4/200

Digital Equipment Corp. AlphaStation 200 4/166

Digital Equipment Corp. AlphaStation 200 4/233

Digital Equipment Corp. AlphaStation 400 4/233

Digital Equipment Corp. DECpc 2000-300 AXP Server

Digital Equipment Corp. DECpc 2000-500 AXP Server

Digital Equipment Corp. DECpc AXP 150

Digital Equipment Corp. DECpc AXP 150 Universal Platform

Digital Equipment Corp. DECpc XL AXP 233

Digital Equipment Corp. Multia MultiClient Desktop 16


Digital Alpha AXP RISC Multiprocessor Architecture Computers

The Following Digital Alpha AXP RISC multiprocessor systems have been tested.

Digital Equipment Corp. AlphaServer 2000 4/200

Digital Equipment Corp. AlphaServer 2100 4/200

Digital Equipment Corp. 2100 Server model A500MP


Processor Upgrade Products

The following Processor Upgrade Products have been tested with Windows NT. Please consult the manufacturer for information on compatibility with specific models of computers.

Cyrix CX486DRx2-20/40

Cyrix CX486DRx2-25/50

Digital Equipment Corp. DECpc XL AXP 233 Upgrade

Intel OverDrive™ 486DX-33 (66Mhz)

ShaBLAMM! aNimaTor for Windows NT w/ 100MHz R4600 CPU

ShaBLAMM! NiTro-VLB Booster for Windows NT w/ 100MHz R4600 CPU


SCSI Host Adapters

The following SCSI adapters have been tested on the indicated platforms with the following scanner, CD-ROM, tape, fixed and removable drives (except as noted):  ArchiveST 4000 DAT, CD-Technologies CD Porta-Drive™ T-3401, Hewlett-Packard ScanJet® IIc 17, NEC Intersect CDR-74, Micropolis 1924, Peripheral Land Infinity 88, Procom Technology MCD-DS, Syquest® 5110, Toshiba TXM-3401E, WangTek 5150es.

BUS	x86	MIPS	ALPHA	SCSI Host Adapter
ISA-16	X		X	Adaptec™ AHA-1510 18
ISA-16	X		X	Adaptec AHA-1520 18
ISA-16	X		X	Adaptec AHA-1522 18
ISA-16	X	X	X	Adaptec AHA-1542A 19
ISA-16	X	X	X	Adaptec AHA-1540B 20
ISA-16	X	X	X	Adaptec AHA-1542B 20
ISA-16	X	X	X	Adaptec AHA-1540C 21
ISA-16	X	X	X	Adaptec AHA-1542C 21
ISA-16	X	X	X	Adaptec AHA-1542CF 22
MCA	X			Adaptec AHA-1640
EISA	X	X	X	Adaptec AHA-1740 23
EISA	X	X	X	Adaptec AHA-1742 23
EISA	X	X	X	Adaptec AHA-1740A 24
EISA	X	X	X	Adaptec AHA-1742A 24
EISA	X	X	X	Adaptec AHA-2740
EISA	X	X	X	Adaptec AHA-2742
EISA	X	X	X	Adaptec AHA-2740A
EISA	X	X	X	Adaptec AHA-2742A
EISA	X	X	X	Adaptec AHA-2742AT
VLB	X			Adaptec AHA-2840
PCI	X		X	Adaptec AHA-2940
EMBEDDED	X25			Adaptec AIC-6260
EMBEDDED	X27			Adaptec AIC-7770 26
VLB	X			Advanced System Products ABP-842 1
ISA-16	X			Always IN-2000
EISA	X			AMIscsi Series 441 28
EISA	X			AMIscsi Series 48 1
EISA	X			AMIscsi Series 48 (with cache) 1,28
EMBEDDED	X29			AMD PC-NET SCSI 1
VLB	X			BusLogic BT-445S
ISA-16	X	X	X	BusLogic BT-542B
ISA-16	X	X		BusLogic BT-545C
ISA-16	X	X	X	BusLogic BT-545S
MCA	X			BusLogic BT-640A
MCA	X			BusLogic BT-646S 30
EISA	X	X	X	BusLogic BT-742A
EISA	X	X	X	BusLogic BT-747S
EISA	X			CMD Tech CSA-6000/F 1
EISA	X			COMPAQ Fast SCSI-2 Controller
ISA-16	X		X	COMPAQ 6260 SCSI-2 Controller
ISA-16	X	X	X	DPT PM2011b
ISA-16	X			DPT PM2011b (with cache) 28
EISA	X	X	X	DPT PM2012b
EISA	X		X	DPT PM2012b (with cache) 28
ISA-16	X			DPT PM2021
ISA-16	X			DPT PM2021 (with Cache) 28
EISA	X			DPT PM2022
EISA	X			DPT PM2022 (with Cache) 28
EISA	X			DPT PM2122
EISA	X			DPT PM2122 (with Cache) 28
EISA	X		X	Data Technology Corp. 3290
EISA	X		X	Digital Equipment KZESC (SWXCR) EISA Raid Controller
PCI	X		X	Digital Equipment KZPAA (KZPSC) NCR 53C810-S PCI SCSI Adapter
MCA	X			Future Domain® MCS-600
MCA	X			Future Domain MCS-700
ISA-8	X	X	X	Future Domain TMC-845 31,32
ISA-8	X	X	X	Future Domain TMC-850 31,32
ISA-8	X	X	X	Future Domain TMC-850M(ER) 32
ISA-8	X	X	X	Future Domain TMC-860 31,32
ISA-8	X	X	X	Future Domain TMC-860M 32
ISA-16	X	X	X	Future Domain TMC-885 31,32
ISA-16	X	X	X	Future Domain TMC-885M 32
ISA-16	X	X	X	Future Domain TMC-1610
ISA-16	X	X	X	Future Domain TMC-1610mex
ISA-16	X	X	X	Future Domain TMC-1610mer
ISA-16	X	X	X	Future Domain TMC-1650
ISA-16	X	X	X	Future Domain TMC-1660
ISA-16	X	X	X	Future Domain TMC-1670
ISA-16	X	X	X	Future Domain TMC-1680
PCI	X			Future Domain TMC-3260
EISA	X	X	X	Future Domain TMC-7000EX
MCA	X33			IBM PS/2 Microchannel SCSI Host Adapter
MCA	X33			IBM PS/2 Microchannel SCSI Host Adapter (with cache)
ISA-16	X			Maynard 16-bit SCSI Adapter 30,34
ISA-16	X			MediaVision Pro Audio Spectrum-16 35
EISA	X	X	X	Mylex DAC960
MCA	X			NCR 53C700 SCSI Adapter
MCA	X			NCR 53C710 SCSI Adapter
EMBEDDED	X36		X37	NCR 53C810 SCSI Controller
EMBEDDED	X38			NCR 53C90 SCSI Controller
EMBEDDED	X39	X		NCR 53C94 SCSI Controller
PCI	X			NCR 8150S  PCI Host Adapter Board 2
PCI	X			NCR 8100S  PCI Host Adapter Board 2
PCI	X			NCR 8250S  PCI Host Adapter Board 2
PCI	X			NCR 8251S  PCI Host Adapter Board 2
EISA	X			Olivetti ESC-1
EISA	X			Olivetti ESC-2
ISA-16	X			Procom Tech Xelerator - ISA 1,40
ISA-16	X			QLogic Fast!SCSI ISA FL 1
EISA	X			QLogic Fast!SCSI EISA FL 1
PCI	X			QLogic Fast!SCSI IQ PCI 1
VLB	X			QLogic Fast!SCSI VESA Local FL 1
ISA-16	X			Rancho Technology RT1600-5 1,30
ISA-8	X			Trantor T-128 19,31,41
ISA-8	X			Trantor T-130B 31,41
ISA-16	X	X	X	UltraStor 14f 42
EISA	X	X	X	UltraStor 24f 43
EISA	X	X	X	UltraStor 24fa
VLB	X			UltraStor 34f


SCSI CD-ROM Drives

The following SCSI CD-ROM drives have been tested with the following adapters:  Adaptec AHA-1510, AHA-1542C, AHA-1640 and AHA-1742A; Future Domain TMC-1670 and MCS-600; IBM PS/2 Microchannel SCSI Host Adapter (with cache); Ultrastor 24fa,and are supported on X86, MIPS and Alpha AXP platforms except as noted.  Drives have been tested for data access as well as for the audio capabilities indicated.

Standard (CD) Audio	MultiMedia Audio	SCSI CD-ROM
X	X	CD-Technology CD Porta-Drive T-3301
X	X	CD-Technology CD Porta-Drive T-3401
X		Chinon® CDS-435
X		Chinon CDX-435
X	X	Chinon CDS-535
X	X	Chinon CDX-535
X	X	COMPAQ DualSpeed CD-ROM Drive
X	X	Digital Equipment RRD42
X	X	Digital Equipment RRD43
X	X	Digital Equipment RRD44
X		Hitachi® CDR-1750S
X	X	Hitachi CDR-1950s
X	X	Hitachi CDR-3750
X	X	Hitachi CDR-6750
X	X	IBM Enhanced Internal CDROM II Drive 32G2958
X	X	IBM Enhanced External CDROM II Drive 3510005
X	X	IBM PS/2 CDROM II Drive
X		Laser Magnetic Storage CM-215 44
X	X	NEC CDR-500 (3Xi) 45,46
X	X	NEC CDR-600 (3Xe) 45,46
X	X	NEC Intersect CDR-73M 47
X	X	NEC Intersect CDR-83M 47
X	X	NEC Intersect CDR-74
X	X	NEC Intersect CDR-84
X	X	NEC Intersect CDR-74-1
X	X	NEC Intersect CDR-84-1
		Panasonic CR-501
X	X	Panasonic CR-503
X	X	Pioneer® DRM-600 48,49
X	X	Procom Technology MCD-DS
X	X	Sony® CDU-541
X	X	Sony CDU-561
X	X	Sony CDU-6211
X	X	Sony CDU-7211
X	X	Sony CDU-7811
X	X	Sony CDU-55S
		Texel DM-5021
X	X	Texel DM-5024 50
X	X	Texel DM-5028
		Toshiba TXM-3201
X	X	Toshiba TXM-3301E
X	X	Toshiba XM-3301B
X	X	Toshiba TXM-3401E
X	X	Toshiba XM-3401B
X	X	Toshiba XM-3501B
X	X	Toshiba XM-4101B


Non-SCSI CD-ROM Drives

The following CD-ROM drives with non-SCSI interfaces have been tested. Please see SETUP.TXT on the Windows NT 3.5 CD-ROM for additional information on these drives and the adapters that they are supported on.

Standard(CD) Audio	Multimedia Audio	Selection in Setup	Interface	Non-SCSICD-ROM
X	X	Panasonic CD-ROM	Panasonic LMEP0084B	Creative Labs Sound Blaster Pro™ CDROM 51
X	X	Panasonic CD-ROM	Sound Blaster™ Pro	Creative Labs Sound Blaster Pro CDROM 51
X	X	Panasonic CD-ROM	Sound Blaster 16	Creative Labs Sound Blaster Pro CDROM 51
X	X	Panasonic CD-ROM	Sound Blaster 16 MultiCD	Creative Labs Sound Blaster Pro CDROM 51
X	X	Mitsumi CD-ROM	Mitsumi 74-1881A	Mitsumi CRMC-FX001D 52,53
X	X	Mitsumi CD-ROM	Sound Blaster 16 MultiCD	Mitsumi CRMC-FX001D 52,53
X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface	NEC CDR-250
X	X	Panasonic CD-ROM	Panasonic LMEP0084B	Panasonic CR-521
X	X	Panasonic CD-ROM	Sound Blaster Pro	Panasonic CR-521
X	X	Panasonic CD-ROM	Sound Blaster 16	Panasonic CR-521
X	X	Panasonic CD-ROM	Sound Blaster 16 MultiCD	Panasonic CR-521
X	X	Panasonic CD-ROM	Panasonic LMEP0084B	Panasonic CR-523
X	X	Panasonic CD-ROM	Sound Blaster Pro	Panasonic CR-523
X	X	Panasonic CD-ROM	Sound Blaster 16	Panasonic CR-523
X	X	Panasonic CD-ROM	Sound Blaster 16 MultiCD	Panasonic CR-523
X	X	Panasonic CD-ROM	Panasonic LMEP0084B	Panasonic CR-562
X	X	Panasonic CD-ROM	Sound Blaster Pro	Panasonic CR-562
X	X	Panasonic CD-ROM	Sound Blaster 16	Panasonic CR-562
X	X	Panasonic CD-ROM	Sound Blaster 16 MultiCD	Panasonic CR-562
X	X	Panasonic CD-ROM	Panasonic LMEP0084B	Panasonic CR-563
X	X	Panasonic CD-ROM	Sound Blaster Pro	Panasonic CR-563
X	X	Panasonic CD-ROM	Sound Blaster 16	Panasonic CR-563
X	X	Panasonic CD-ROM	Sound Blaster 16 MultiCD	Panasonic CR-563
X	X	Sony CD-ROM	Sony CDB-334	Sony CDU 31a
X	X	Sony CD-ROM	Sound Blaster 16 MultiCD	Sony CDU 31a
X	X	Sony CD-ROM	Sony CDB-334	Sony CDU 33a
X	X	Sony CD-ROM	Sound Blaster 16 MultiCD	Sony CDU 33a
X	X	IDE CD-ROM (ATAPI 1.2)	IDE Interface	Sony CDU55E


SCSI Tape Drives

The following SCSI tape drives have been tested with the following adapters using the Windows NT Backup program:  Adaptec AHA-1510, AHA-1542C, AHA-1640 and AHA-1742A; Future Domain TMC-1670 and MCS-600; IBM PS/2 Microchannel SCSI Host Adapter (with cache); Ultrastor 24fa, and are supported on X86, MIPS and Alpha AXP platforms except as noted.  Drives are listed under their appropriate Tape entry in SETUP.

4 Millimeter DAT

    Archive® 4326NP

    Archive 4326RP

    Archive 4356XP

    ArchiveST 2000DAT (4520NT)

    ArchiveST 2000DAT (EAX4350) 54

    ArchiveST 4000DAT (4324NP)

    ArchiveST 4000DAT (4352XP)

    Compaq 4/16 Gigabyte TurboDAT

    Compaq TurboDAT Autoloader 55

    Conner 4326NP

    Conner 4326RP

    Conner 4356XP

    Digital Equipment TLZ06 56

    Digital Equipment TLZ07

    Exabyte 4200

    Exabyte 4200c 57

    Exabyte 4200t

    Hewlett-Packard JetStore 2000

    Hewlett-Packard JetStore 2000e

    Hewlett-Packard JetStore 2000i

    Hewlett-Packard JetStore 5000

    Hewlett-Packard JetStore 5000e

    Hewlett-Packard JetStore 5000i

    Hewlett-Packard JetStore 6000e

    Hewlett-Packard JetStore 6000i

    Hewlett-Packard 35470a

    Hewlett-Packard 35480a

    Hewlett-Packard C1503a

    Hewlett-Packard C1504a

    Hewlett-Packard C1533a

    Hewlett-Packard C2224c

    Hewlett-Packard C2225b

    IBM 2.0Gb 4mm Tape Drive Option (part number 55F9428)

    IBM 2.0Gb 4mm DAT 3440 001

    IBM 4/10GB 4mm DAT Drive 58

    Maynard Maynstream 1300DAT 54

    Maynard 2000 DAT 54

    Tecmar® DATaVault 2000

    Tecmar DATaVault 4000

    WangDAT Model 1300XL

    WangDAT Model 3100

    WangDAT Model 3200

    WangDAT Model 3400DX

4 Millimeter Sony

    Sony SDT 2000 59,60,61

    Sony SDT 4000 59,60,61,62

    Sony SDT 5000 59,60,61,62

    Sony SDT 5200 59,60,61

Archive 2150S, 2525S, 2750

    Archive 2150/2250 63

    Archive 2525

    Archive 2750

    Archive 2800

    Maynard 525Q

    Maynard 1350Q

Digital TZ86 and DLT2000

    Digital Equipment DLT2000 64

    Digital Equipment TZ86 65

    Digital Equipment TZ87 64

    Digital Equipment TLZ875 55,66

    Digital Equipment TZ8877 55,67

Exabyte 2501 miniqic drive

    Exabyte 2501

Exabyte 8200 Series (SCSI-1)

    Exabyte EXB-8200

    Exabyte EXB-8200ST

    Exabyte EXB-8205 59

    Exabyte EXB-8205ST 59

    IBM 3532-023 8mm Tape Drive

Exabyte 8500 Series (SCSI-2)

    Exabyte EXB-8500

    Exabyte EXB-8500ST

    Exabyte EXB-8500c

    Exabyte EXB-8500cST

    Exabyte EXB-8505

    Exabyte EXB-8505ST

    IBM 5.0Gb 8mm Tape Drive Option

    IBM 3445 Model 001 5.0Gb 8mm Tape Drive

Tandberg 3660, 3820, 4120, 4220

    Digital Equipment TZK10

    Digital Equipment TZK11

    Digital Equipment TZK12

    IBM 3450 1.2Gb Tape Drive Model 001

    Tandberg 3660

    Tandberg 3820

    Tandberg 4120

    Tandberg 4220

    Tecmar QICVault 4000ex

Wangtek 525, 250

    Tecmar QICVault 720ex

    Tecmar QICVault 2400ex

    Tecmar QT-525ES

    Wangtek 5150ES

    Wangtek 5525ES

    Wangtek 51000ES


Other Tape Drives

The following tape drives have been tested using the Windows NT Backup program on X86 computers.

QIC-40/QIC-80 Floppy Tape Drive 68

    Archive 51250Q (SuperHornet)

    Archive 5540

    Archive 5580

    Colorado Jumbo 120

    Colorado Jumbo 250

    Iomega® Tape 250

    Mountain Filesafe 8000

    WangTek 3040

    WangTek 3080


SCSI Removable Media

The following SCSI removable media (cartridge) drives have been tested with the following adapters:  Adaptec AHA-1510, AHA-1542C, AHA-1640 and AHA-1742A; Future Domain TMC-1670 and MCS-600; IBM PS/2 Microchannel SCSI Host Adapter (with cache); Ultrastor 24fa, and are supported on X86, MIPS and Alpha AXP platforms except as noted.

Hewlett-Packard Series 6300 650/C

Hewlett-Packard 1300T Rewritable Optical drive

IBM 0632 Model C2*

IBM 3 1/2-Inch 127mb Rewritable Optical Disk Drive MTA-3127 (part# 62G2908)

Insite 21mb Floptical

Iomega 21mb Floptical

Iomega Bernoulli Transportable 90 Pro

Iomega Bernoulli Transportable 150

Maxoptix TMT 2m MO drive

Maxoptix T3-1300

Panasonic LF-7304

Peripheral Land Infinity 40 Turbo

Peripheral Land Infinity 88

Pinnacle Micro PMO-650 59

Pinnacle Micro Sierra 1.3

Quantum Passport XL 85

Quantum Passport XL 127

Sony SMO-F331

Sony SMO-F521

Sony SMO-S511A-11

Sony RMO-S350

Syquest 555 44mb cartridge

Syquest 5110 88mb cartridge


SCSI Scanners

The following SCSI scanners have been tested with the following adapters: Adaptec AHA-1510, AHA-1542c, AHA-1640 and AHA-1742A; Future Domain TMC-1670 and MCS-600; IBM PS/2 Microchannel SCSI Host Adapter (with cache); Ultrastor 24fa.  Scanners are supported on the x86 platform only.

HP® ScanJet IIc

HP ScanJet IIcx

HP ScanJet IIp


Disk Controllers

The following disk controllers have been tested.

COMPAQ Intelligent Drive Array Controller 10

COMPAQ Intelligent Drive Array Controller-2 10

COMPAQ SMART Array Controller 10

DELL Drive Array Controller 10

DELL SCSI Array Controller  10,69

IBM MODEL 95 RAID Controller 1

Olivetti EFP-2 70

UltraStor 124f EISA Disk Array Controller

Western Digital™ 1003 (ESDI, IDE)


Hard Drives

The following hard drives have been tested.  SCSI hard drives have been tested with the following SCSI adapters:  Adaptec AHA-1510, AHA-1542C, AHA-1640 and AHA-1742A; Future Domain TMC-1670 and MCS-600; IBM PS/2 Microchannel SCSI Host Adapter (with cache); Ultrastor 24fa. and are supported on X86, MIPS and Alpha AXP platforms except as noted.

SCSI Hard Drives

    Conner CFA540S

    Conner CFP1060S

    Conner CFP2105S

    Conner CR1-1000D

    Hewlett Packard C2490A

    Hewlett Packard C3323A

    Maxtor 7120SR

    Maxtor 7213SR

    Maxtor 7245SR

    Maxtor 7345SR

    Maxtor LXT340SY

    Maxtor MXT1240S

    Micropolis 1924

    Storage Solutions SSI-2000M

IDE Hard Drives

    Conner CFA540A

    Conner CFA810A

    Conner CFA1080A

    Conner CFS210A

    Conner CFS420A

    Maxtor LXT340A

    Maxtor 7120AT

    Maxtor 7131AT

    Maxtor 7171AT

    Maxtor 7213AT

    Maxtor 7245AT

    Maxtor 7273AT

    Maxtor 7345AT

    Maxtor 7546AT

    Maxtor MXT-540AL


Storage Cabinets

The following peripheral storage cabinets have been tested, and are supported on X86, MIPS and Alpha AXP platforms.

Hewlett-Packard Storage System with HP EISA HBA

Hewlett-Packard Storage System with HP MCA HBA

IBM 3510 SCSI Storage Enclosure

Professional Concepts SCSI Storage Cabinet

Professional Concepts SCSI Storage Cabinet+

Digital Equipment StorageWorks BA-350 Deskside Expansion Unit

Digital Equipment StorageWorks BA-353 "Pizza Box" Desktop Expansion Unit


RAID Systems

The following RAID storage systems have been tested with the following SCSI adapters:  Adaptec AHA-1510, AHA-1542C, AHA-1640 and AHA-1742A; Future Domain TMC-1670 and MCS-600; IBM PS/2 Microchannel SCSI Host Adapter (with cache); Ultrastor 24fa, and are supported on X86, MIPS and Alpha AXP platforms except as noted.

Conner CR6-RAID 71,72

Micropolis RAIDION LT 2100 73,74

Micropolis MICRODISK LT 2100 73,74

Professional Concepts SCSI iRAID Cabinet+

Storage Solutions, Inc. RACa-ray Model 10

Storage Solutions, Inc. RACa-ray Model 20

Storage Solutions, Inc. RACa-ray Model 30


Video Support
Video Capture Adapters

The following video capture devices have been tested on the x86, MIPS and Alphe platforms.

Truevision Bravado 1

Creative Labs VideoSpigot for Windows 1

Video Display Support

The following display adapters have been tested on X86 systems. Most common scan frequencies are supported.  Your video monitor should support the same resolutions and scan frequencies as your display adapter.  Please refer to README.WRI for more information on display support.

Display Adapter	Driver	640x480	800x600	1024x768	1280x1024	OTHER
#9 GXE 64 PCI	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
#9 GXE 64 PRO PCI	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
#9 GXE LEVEL 12 ISA (3mb) 75	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256
#9 GXE LEVEL 12 VLB (1mb) 75	S3	256, 65k	256	256
ACTIX GRAPHICS ENGINE	S3	256	256	256
ACTIX GRAPHICS ENGINE 32 PLUS	S3	256, 65k	256, 65k	256
ACTIX GRAPHICS ENGINE 32 VLB	S3	256, 65k	256, 65k	256, 65k	256
ACTIX PROSTAR VLB	CIRRUS	16, 256, 65k	16, 256	16, 256	16
ARTIST GRAPHICS WINSPRINT 1000i 1	ART	256	256	256	256	J
ARTIST GRAPHICS XJ1000 1	ART	256	256	256	256
ATI 8514 ULTRA	8514A	256	256	256
ATI GRAPHICS PRO TURBO ISA	ATI	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m
ATI GRAPHICS PRO TURBO PCI	ATI	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m
ATI GRAPHICS PRO TURBO VLB	ATI	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m, TRUE	256, 65k, 16.7m
ATI GRAPHICS ULTRA	ATI	256	256	256
ATI GRAPHICS ULTRA PLUS 76	ATI	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
ATI GRAPHICS ULTRA PRO ISA 76	ATI	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
ATI GRAPHICS ULTRA PRO EISA 76	ATI	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
ATI GRAPHICS ULTRA PRO PCI 77	ATI	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
ATI GRAPHICS ULTRA PRO VLB 76	ATI	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256
ATI GRAPHICS VANTAGE	ATI	256	256	256
ATI GRAPHICS WONDER ISA 76	ATI	256, 65k, 16.7m	256	256
ATI GRAPHICS WONDER VLB 76	ATI	256, 65k, 16.7m	256, 65k	256
ATI GRAPHICS XPRESSION ISA	ATI	16, 256, 65k, 16.7m, TRUE	16, 256, 65k, 16.7m, TRUE	16, 256, 65k	16, 256
ATI GRAPHICS XPRESSION PCI	ATI	16, 256, 65k, 16.7m, TRUE	16, 256, 65k, 16.7m, TRUE	16, 256, 65k	16, 256
ATI GRAPHICS XPRESSION VLB	ATI	16, 256, 65k, 16.7m, TRUE	16, 256, 65k, 16.7m, TRUE	16, 256, 65k	16, 256
ATI VGA Wonder XL24 1	ATIVGA	16, 256	16, 256	16, 256
CARDEX VLB	CIRRUS	16, 256, 65k	16, 256	16, 256	16
COMPAQ AVGA 78	AVGA1	16, 256	16
COMPAQ QVISION 1024/I	QV	16, 256	256	256
COMPAQ QVISION 1024/E	QV	16, 256	256	256
COMPAQ QVISION 1024/I (ENHANCED)	QV	16, 256	256	256
COMPAQ QVISION 1024/E (ENHANCED)	QV	16, 256	256	256
COMPAQ QVISION 1280/I	QV	16, 256	256	256	256
COMPAQ QVISION 1280/E	QV	16, 256	256	256	256
COMPAQ QVISION 2000 PCI	MGA1	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256	G, H
DIAMOND SPEEDSTAR	ET4000	16, 256, 65k	16, 256	16, 256
DIAMOND SPEEDSTAR 24X	WD	16, 256	16, 256	16, 256
DIAMOND SPEEDSTAR PRO	CIRRUS	16, 256, 65k	16, 256	16, 256	16
DIAMOND SPEEDSTAR PRO VLB	CIRRUS	16, 256, 65k	16, 256	16, 256	16
DIAMOND SPEEDSTAR 64 ISA	CIRRUS	16, 256, 65k	16, 256, 65k	16, 256, 65k	16, 256
DIAMOND SPEEDSTAR 64 PCI	CIRRUS	16, 256, 65k	16, 256, 65k	16, 256, 65k	16, 256
DIAMOND STEALTH 24	S3	256, 65k	256, 65k	256
DIAMOND STEALTH 24 VLB	S3	256, 65k	256, 65k	256
DIAMOND STEALTH 32 PCI	ET4000	16, 256, 65k	16, 256	16, 256
DIAMOND STEALTH 32 VLB	ET4000	16, 256, 65k	16, 256	16, 256
DIAMOND STEALTH 64 DRAM PCI	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E, J
DIAMOND STEALTH 64 DRAM VLB	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E, J
DIAMOND STEALTH 64 PCI	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
DIAMOND STEALTH 64 VLB	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
DIAMOND STEALTH PRO	S3	256, 65k	256, 65k	256, 65k	256
DIAMOND STEALTH PRO VLB	S3	256, 65k	256, 65k	256, 65k	256
DIAMOND STEALTH VRAM	S3	256	256	256
DIAMOND VIPER PCI 10	WEITEKP9	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	J
DIAMOND VIPER VLB 79	WEITEKP9	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	J
DIGITAL EQUIPMENT CORP. PCXAG-AL S3-864 PCI	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, J, K
ELSA WINNER 1000	S3	256, 65k	256, 65k	256
GENOA PHANTOM 32I 8900 VLB	ET4000	16, 256, 65k	16, 256	16, 256
GENOA PHANTOM 32I 8900 PCI	ET4000	16, 256, 65k	16, 256	16, 256
IBM XGA	XGA®	256		256
IBM XGA-2	XGA	256	256	256		A, B, C
MATROX ULTIMA PCI	MGA1	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	256	G, H
MATROX ULTIMA + PCI	MGA1	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k, 16.7m	256, 65k	G, H, I, J, K
MEDIAVISION THUNDER & LIGHTNING	CIRRUS	16, 256, 65k	16, 256	16, 256
METHEUS PREMIER 928	S3	256, 65k	256, 65k	256, 65k	256, 65k
MICRONICS VL-BUS	S3	256, 65k	256, 65k	256
MIRO CRYSTAL 20sd VLB	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256
NCR 32BLT VLB	NCR77C22	16, 256	16, 256	16, 256	256
NCR 77C22 80	NCR77C22	16, 256	16, 256	16
NCR 77C22E 81	NCR77C22	16, 256	16, 256	16, 256
ORCHID FAHRENHEIT 1280	S3	256	256	256
ORCHID FAHRENHEIT 1280 PLUS ISA	S3	256, 65k	256, 65k	256
ORCHID FAHRENHEIT 1280 PLUS VLB	S3	256, 65k	256, 65k	256, 65k	256
ORCHID FAHRENHEIT VA	S3	256, 65k	256, 65k	256
ORCHID FAHRENHEIT VA/VLB	S3	256, 65k	256, 65k	256, 65k	256
ORCHID KELVIN 64 ISA	CIRRUS	16, 256, 65k	16, 256	16, 256
ORCHID KELVIN 64 VLB	CIRRUS	16, 256, 65k	16, 256	16, 256
ORCHID KELVIN EZ VLB	CIRRUS	16, 256, 65k	16, 256	16, 256
ORCHID PRODESIGNER 2	ET4000	16, 256	16, 256	16, 256
ORCHID PRODESIGNER IIS EISA	ET4000	16, 256, 65k	16, 256	16, 256
ORCHID PRODESIGNER IIS ISA	ET4000	16, 256, 65k	16, 256	16, 256
PARADISE WINDOWS GRAPHICS ACCELERATOR	WD	16, 256	16, 256	16, 256
SIX GRAPH WIZARD 9000VL	WEITEKP9	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	J
TRIDENT 8900C	TRIDENT	16, 256	16, 256	16, 256
TRIDENT 9000	TRIDENT	16, 256	16	16
VIDEO SEVEN™ VRAM	VIDEO7	16, 256	16	16
VIDEO SEVEN VRAM II	VIDEO7	16, 256	16, 256	16, 256
VIDEO SEVEN VRAM II ERGO	VIDEO7	16, 256	16, 256	16, 256

The following display adapters have been tested on Digital Equipment Alpha AXP systems. Most common scan frequencies are supported.  Your video monitor should support the same resolutions and scan frequencies as your display adapter. Please refer to README.WRI for more information on display support.

Display Adapter	Driver	640x460	800x600	1024x768	1280x1024	OTHER
#9 GXE 64 PCI	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E
#9 GXE 64 PRO PCI	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
#9 GXE LEVEL 12 ISA (3mb) 75	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256
ACTIX GRAPHICS ENGINE	S3	256	256	256
ACTIX GRAPHICS ENGINE 32 PLUS	S3	256, 65k	256, 65k	256
COMPAQ QVISION 1024/E	QV	16, 256	256	256
COMPAQ QVISION 1024/E (ENHANCED)	QV	16, 256	256	256
COMPAQ QVISION 1280/E	QV	16, 256	256	256
DIAMOND STEALTH 24	S3	256, 65k	256, 65k	256
DIAMOND STEALTH 64 DRAM PCI	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k	256	D, E, J
DIAMOND STEALTH 64 PCI	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, E, F, J, K
DIAMOND STEALTH PRO	S3	256, 65k	256, 65k	256, 65k	256
DIAMOND STEALTH VRAM	S3	256	256	256
DIGITAL EQUIPMENT CORP. ALPHASERVER 1000 4/200 (ONBOARD CIRRUS)	CLINEAR1	256	256
DIGITAL EQUIPMENT CORP. PCXAG-AL S3-864 PCI	S3	256, 65k, TRUE	256, 65k, TRUE	256, 65k, TRUE	256, 65k	D, J, K
ELSA WINNER 1000	S3	256, 65k	256, 65k	256
METHEUS PREMIER 928	S3	256, 65k	256, 65k	256, 65k	256, 65k
ORCHID FAHRENHEIT 1280	S3	256	256	256
ORCHID FAHRENHEIT 1280 PLUS ISA	S3	256, 65k	256, 65k	256
Color Depths			Display modes in the 'Other' Column
16	16 colors		A	640x400x256
256	256 colors		B	1040x768x256
32k	32,768 colors		C	1104x828x256
65k	65,536 colors		D	1152x864x256
16.7m	16.7 million colors (24 bits\pixel)		E	1152x864x65k
TRUE	True Color(16.7m accelerated)		F	1152x864xTRUE
			G	1182x882x256
			H	1182x882x65k
			I	1182x882x16.7m
			J	1600x1200x256
			K	1600x1200x65k
Display adapters not listed above are expected to work on X86 systems if they use the following supported chip sets. Install first as Standard VGA, then select the corresponding driver from the Display Applet in the Control Panel.

Manufacturer	Chip Set	Driver	Color Depths	Max Res.
IBM	8514/a	8514A	256	1024x768
	XGA	XGA	256	1104x828
ATI	8514 Ultra	8514A	256	1024x768
	MACH 8	ATI	256	1024x768
	MACH 32	ATI	256, 65K, 16.7M	1280x1024
	MACH 64	ATI	16, 256, 65K, 16.7M, TRUE	1280x1024
Compaq	AVGA	AVGA	16, 256	800x600
	QVision 1024	QV	16, 256	1024x768
	QVision 1280	QV	16, 256	1280x1024
	QVision 2000	MGA1	256, 65K, 16.7M	1280x1024
Cirrus Logic	5422, 542482	CIRRUS	16, 256, 65k	1280x1024
	5426, 542882	CIRRUS	16, 256, 65k	1280x1024
	5430, 5434	CIRRUS	16, 256, 65k	1280x1024
Tseng Labs	ET4000	ET4000	16, 256, 65k	1024x768
	ET4000-W32i	ET4000	16, 256, 65k	1024x768
	ET4000-W32p	ET4000	16, 256, 65k	1024x768
Matrox	MGA (ATLAS)	MGA1	256, 65K, 16.7M	1600x1200
NCR	NCR77C22	NCR77C22	16, 256	1024x768
	NCR77C22E	NCR77C22	16, 256	1024x768
	NCR BLT 32	NCR77C22	16, 256	1280x1024
S3	911, 911a, 924	S3	256	1024x768
	80183	S3	256, 32k/65k	1024x768
	80583	S3	256, 32k/65k	1280x1024
	92883,84	S3	256, 32k/65k, TRUE	1280x1024
	86485	S3	256, 65k, TRUE	1280x1024
	96486	S3	256, 65k, TRUE	1600x1200
Trident	9000	TRIDENT	16, 256	1024x768
	8900c	TRIDENT	16, 256	1024x768
Headlands	Video 7	V7VRAM	16, 256	1024x768
Western Digital	WD90C3087	WDVGA	16, 256	1024x768
	WD90C3187	WDVGA	16, 256	1024x768
	WD90C3387	WDVGA	16, 256	1024x768
Weitek	P900086	WEITEKP9	256, 65K, TRUE	1600x1200
The following table shows the maximum display and color resolutions available with each video driver using different amounts of video RAM. Most display adapters can use the standard VGA driver for 16-color modes (on X86 systems).

		Colors
Drivers	Video RAM	16	256	32k/65k	16m	True Color
8514/a	1MB		1024x768
ART2	2MB		1600x1280
ATI88	512Kb		640x480
	1Mb	1280x1024	1024x768	800x600	640x480
	2Mb	1280x1024	1280x1024	1024x768	800x600	800x600
	4Mb	1280x1024	1280x1024	1280x1024	1280x1024	1024x768
ATIVGA2	1MB	1024x768	1024x768
AVGA	512Kb	800x600	640x480
Cirrus89	512Kb	1024x768	640x480
	1Mb	1280x1024	1024x768	640x480
	2mb	1280x1024	1280x1024	1024x768
DGX	2Mb		1280x1024	1152x900
ET4000	512Kb	1024x768	640x480
	1Mb	1024x768	1024x768	640x480
MGA1	2Mb		1280x1024	1182x882	800x600
	4Mb		1600x1200	1600x1200	1182x882
NCR 77C22	1Mb	1024x768	1024x768
	2Mb	1024x768	1280x1024
QV	512Kb	640x480
	1Mb	640x480	1024x768
	2Mb	640x480	1280x1024
S3	512		800x600
	1Mb		1152x864	800x600
	2Mb		1600x1200	1152x864		800x600
	4MB		1600x1200	1600x1200		1152x864
Trident	512Kb	1024x768	640x480
	1Mb	1024x768	1024x768
Video7	512Kb	1024x768	640x480
	1Mb	1024x768	1024x768
VGA	256Kb	640x480
	512Kb	800x600
WD	512Kb	1024x768	640x480
	1Mb	1024x768	1024x768
WEITEKP9	2Mb		1600x1280	1024x768		800x600
XGA	1Mb		1104x828


Network Adapters

The following network adapters have been tested on the indicated platforms.

Bus Type	x86	MIPS	ALPHA	Network Adapter
ISA	X	X	X	3Com® 3C503 EtherLink II® (Coax & TP) 90
ISA	X	X	X	3Com 3C503/16 EtherLink® II/16 (Coax & TP) 90
ISA	X	X		3Com 3C507 EtherLink 16 (Coax & TP) 90
ISA	X	X	X	3Com 3C509 EtherLink III Parallel Tasking Adapter - ISA (Coax, TP and Combo) 90
MCA	X			3Com 3C523 EtherLink/MC (Coax & TP) 90
MCA	X			3Com 3C527 EtherLink/MC 32 Bus Mastering Adapter 2
MCA	X			3Com 3C529 EtherLink III Parallel Tasking Adapter - MCA (Coax & TP) 90
EISA	X	X	X	3Com 3C579 EtherLink III Parallel Tasking Adapter - EISA (Coax & TP) 90
EISA	X			3Com 3C770 FDDILink-F for Optical, UTP & STP 1,90,91
ISA	X			Advanced Micro Devices Am1500T Ethernet Adapter
ISA	X			Advanced Micro Devices Am2100 Ethernet Adapter
EMBEDDED	X			Advanced Micro Devices PCnet® Family Adapters 1
ISA				Advanced Micro Devices PCnet-ISA+ Ethernet Adapter 1
VLB				Advanced Micro Devices PCnet-32 VL Ethernet Adapter 1
ISA	X			Andrew ISA IIA Adapter 1
ISA	X			Cabletron E21XX Ethernet DNI 1
ISA	X			Cabletron T20XX 16/4 Token Ring DNI 1
MCA	X			Cabletron F30XX FDDI Adapter 1,91
EISA	X			Cabletron F70XX FDDI Adapter 1,91
EISA	X			Cisco C321T-PC Turbo EISA FDDI Adapter/PC 1
PCI	X			Cogent eMASTER + 960 PCI Ethernet Adapter 1
EISA	X			COMPAQ 32-Bit Dualspeed Token Ring Controller
EISA	X			COMPAQ 32-Bit Netflex Controller
EISA	X			COMPAQ 32-Bit Netflex Controller with Token Ring Module
ISA	X	X	X	COMPAQ Ethernet 16TP Controller
EISA	X			COMPAQ NetFlex-2 ENET-TR Controller 90
EISA	X			COMPAQ NetFlex-2 TR Controller 90
EISA	X			COMPAQ NetFlex-2 DualPort TR Controller
EISA	X			COMPAQ NetFlex-2 DualPort ENET Controller 90
ISA	X			COPS LTI ISA
EISA	X			Crescendo C321M-PC EISA FDDI ADAPTER/PC 1,91
ISA	X			DayStar Digital LocalTalk® Adapter
ISA/MCA	X			DCA® IRMAtrac 16/4 Convertible Token Ring Adapter 1
ISA	X	X	X	DEC® DE100 EtherWORKS LC
ISA	X	X	X	DEC DE101 EtherWORKS LC/TP
ISA	X	X	X	DEC DE200 EtherWORKS Turbo
ISA	X	X	X	DEC DE201 EtherWORKS Turbo/TP 90
ISA	X	X	X	DEC DE202 EtherWORKS Turbo TP/BNC
EISA	X	X	X	DEC DE422 EtherWORKS EISA TP/BNC
PCI	X		X	DEC DE435 PCI Ethernet Adapter 1
EMBEDDED	X		X	DEC DC21040 PCI Ethernet Controller 1
ISA	X			Hewlett-Packard HP J2573A 10/100VG ISA LAN Adapter 1
EISA	X			Hewlett-Packard HP J2577A 10/100VG EISA LAN Adapter 1
ISA	X			Hewlett-Packard HP 27245A PC LAN Adapter/8 TP 1
MCA	X			Hewlett-Packard HP 27246A MC LAN Adapter/16 TP 1
ISA	X			Hewlett-Packard HP 27247A PC LAN Adapter/16 TP 1
ISA	X			Hewlett-Packard HP 27247B PC LAN Adapter/16 TP Plus 1
ISA	X			Hewlett-Packard HP 27250 PC LAN Adapter/8 TL 1
ISA	X			Hewlett-Packard HP 27252A PC LAN Adapter/16 TL Plus 1
ISA	X	X	X	IBM Token Ring Adapter 16/4
MCA	X			IBM Token Ring Adapter 16/4 /A
ISA	X	X	X	IBM 16/4 Token Ring ISA-16 Adapter
ISA	X	X	X	IBM 16/4 Token Ring II ISA Adapter
MCA	X			IBM LANStreamer™ MC 32 Adapter 1
ISA	X			ICL EtherTeam16i Combo Adapter 1
ISA	X			ICL EtherTeam16i Duo Adapter 1
ISA	X			ICL EtherTeam16i TP Adapter 1
EISA	X			ICL EtherTeam32 EISA Adapter 1
EMBEDDED	X			Intel 82595 Ethernet Adapter 2
ISA	X	X	X	Intel EtherExpress™ 16 PCLA8110
ISA	X	X	X	Intel EtherExpress 16C PCLA8100
ISA	X	X	X	Intel EtherExpress 16TP PCLA8120
EISA	X			Intel EtherExpress Flash 32 Ethernet Adapter 2
ISA	X	X	X	Intel EtherExpress FlashC PCLA8105
ISA	X			Intel TokenExpress™ ISA/16S 1
MCA	X			Intel TokenExpress MCA 16/4 1
EISA	X			Intel TokenExpress EISA 16/4 1
EISA	X			Intel TokenExpress EISA/32 1
ISA	X			Intel EtherExpress PRO (i82595) 1
ISA	X			Madge Smart 16/4 AT Ringnode 1
ISA	X			Madge Smart 16/4 AT Plus Ringnode 1
EISA	X			Madge Smart 16/4 EISA Ringnode 1,90
ISA	X			Madge Smart 16/4 ISA Client Plus 1
MCA	X			Madge Smart 16/4 MC Ringnode 1
MCA	X			Madge Smart 16/4 MC32 Ringnode 1
EMBEDDED		X		National Semiconductor DP83932 (SONIC) Motherboard Ethernet Controller on MIPS ARC/R4000 systems 90
ISA	X			NCR StarLAN 16/4 Token Ring NAU 2
MCA	X			NCR StarLAN 16/4 Token Ring NAU 2
ISA	X			NCR WaveLAN/AT 1
MCA	X			NCR WaveLAN/MC 1
EISA	X	X	X	Network Peripherals NP-EISA/S FDDI
MCA	X			Network Peripherals NP-MCA/S FDDI
ISA	X			Novell®/Eagle Technology NE1000
ISA	X	X	X	Novell/Eagle Technology NE2000 90
EISA	X	X	X	Novell/Eagle Technology NE3200 90
MCA	X			Olicom Token-Ring,PowerMAC MCA WS,OC-3129 1
EISA	X			Olicom Token-Ring,PowerMAC EISA WS,OC-3133 1
ISA	X			Olicom Token-Ring,PowerMAC ISA WS,OC-3117 1
EISA	X			Olicom Token-Ring,PowerMAC EISA SRV,OC-3135 1
ISA	X	X92	X	Proteon ProNET-4/16 p1390 Token Ring Adapter
ISA	X	X92	X	Proteon ProNET 4/16 p1392 Token Ring Adapter
ISA	X	X92	X	Proteon ProNET 4/16 p1392plus Token Ring Adapter
MCA	X			Proteon ProNET 4/16 p1892 Token Ring Adapter
EISA	X	X	X	Proteon ProNET 4/16 p1990 Token Ring Adapter
EISA	X	X	X	Proteon ProNET 4/16 p1990plus Token Ring Adapter
ISA	X	X	X	Standard Microsystems 8003EP EtherCard™ PLUS
ISA	X	X	X	Standard Microsystems 8013EBT EtherCard PLUS16
ISA	X	X	X	Standard Microsystems 8013EP EtherCard PLUS Elite16
MCA	X			Standard Microsystems 8013EP/A EtherCard PLUS Elite/A
ISA	X	X	X	Standard Microsystems 8013EPC EtherCard PLUS Elite16
ISA	X	X	X	Standard Microsystems 8013EW EtherCard PLUS EliteCombo
ISA	X	X	X	Standard Microsystems 8013EWC EtherCard PLUS EliteCombo
ISA	X	X	X	Standard Microsystems 8013W EtherCard PLUS Elite16T
ISA	X	X	X	Standard Microsystems 8013WB EtherCard PLUS
ISA	X	X	X	Standard Microsystems 8013WC EtherCard PLUS Elite16T
MCA	X			Standard Microsystems 8013WP/A EtherCard PLUS Elite10T/A
ISA	X			Standard Microsystems 8216C EtherCard Elite Ultra 1
EISA	X			Standard Microsystems 8232 EtherCard Elite 32 Ultra 1
ISA	X			Standard Microsystems 8416 Ultra PnP 1
PCI	X			Standard Microsystems 8432 PCI Ethernet Adapter 1
ISA	X			Thomas-Conrad TC4045 ISA Token Ring Adapter 1
MCA	X			Thomas-Conrad TC4046 MCA Token Ring Adapter 1,90
ISA/MCA	X	X	X	Thomas-Conrad Arcnet® (Generic Driver)
ISA	X	X	X	Ungermann-Bass® NIUpc
ISA	X	X	X	Ungermann-Bass NIUpc/EOTP
MCA	X			Ungermann-Bass NIUps/EOTP 90
PCMCIA	X			Xircom Corporate Series CreditCard Ethernet Adapter 1,90
PARALLEL	X			Xircom Pocket Ethernet II Adapter 1,93,94
PARALLEL	X			Xircom Pocket Ethernet III Adapter 1,90,93,94


Uninterruptible Power Supplies

The following Uninterruptible Power Supplies have been tested, and are supported on X86, MIPS and Alpha AXP platforms except as noted.

Manufacturer's Cable Part #	Power Failure Signal	Low Battery Signal	Remote UPS Shutdown	Uninterruptible Power Supplies
AP940-0020B	Positive	Positive	Positive	American Power Conversion Back-UPS 400
AP940-0020B	Positive	Positive	Positive	American Power Conversion Back-UPS 450
AP940-0020B	Positive	Positive	Positive	American Power Conversion Back-UPS 600
AP940-0020B	Positive	Positive	Positive	American Power Conversion Back-UPS 900
AP940-0020B	Positive	Positive	Positive	American Power Conversion Back-UPS 1250
AP940-0020B	Positive	Positive	Positive	American Power Conversion Matrix-UPS 3000
AP940-0020B	Positive	Positive	Positive	American Power Conversion Matrix-UPS 5000
AP940-0020B	Positive	Positive	Positive	American Power Conversion Smart-UPS 250
AP940-0020B	Positive	Positive	Positive	American Power Conversion Smart-UPS 400
AP940-0020B	Positive	Positive	Positive	American Power Conversion Smart-UPS 600
AP940-0020B	Positive	Positive	Positive	American Power Conversion Smart-UPS 600RM
AP940-0020B	Positive	Positive	Positive	American Power Conversion Smart-UPS 600XL
AP940-0020B	Positive	Positive	Positive	American Power Conversion Smart-UPS 900
AP940-0020B	Positive	Positive	Positive	American Power Conversion Smart-UPS 900XL
AP940-0020B	Positive	Positive	Positive	American Power Conversion Smart-UPS 1250
AP940-0020B	Positive	Positive	Positive	American Power Conversion Smart-UPS 1250RM
AP940-0020B	Positive	Positive	Positive	American Power Conversion Smart-UPS 2000
AP940-0020B	Positive	Positive	Positive	American Power Conversion Smart-UPS 2000RM
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE500VA
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE700VA
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE850VA
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE1.15KVA
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE1.4KVA
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE1.8KVA
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE2.1KVA
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE3.1KVA
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE4.3KVA
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE5.3KVA
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE7KVA
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE10KVA
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE12.5KVA
BIK008L, BAA-0162	Positive	Positive	Positive	Best Power Technology FERRUPS FE18KVA
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 360B/D
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 460B/D
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 660B/D
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 950B/D
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 1.3KB/D
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 1.7KF/FX™
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 1.7KG/GX
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 1.7KJX
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 2KF/G/H/J
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 2.5KP/PX
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 3KL/LX
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 3KN/NX
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 3KQ/QX
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 3KR/RX
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 3KS/SX
BIK009L, INT-0023	Positive	Positive	Positive	Best Power Technology Fortress LI 3KS
73-0665	Positive	Positive	Positive	Tripp Lite BC400LAN
73-0665	Positive	Positive	Positive	Tripp Lite BC500LAN
73-0665	Positive	Positive	Positive	Tripp Lite BC600LAN
73-0665	Positive	Positive	Positive	Tripp Lite BC750LAN
73-0665	Positive	Positive	Positive	Tripp Lite BC800LAN
73-0665	Positive	Positive	Positive	Tripp Lite BC900LAN
73-0665	Positive	Positive	Positive	Tripp Lite BC1250LAN
73-0665	Positive	Positive	Positive	Tripp Lite OMNI500LAN
73-0665	Positive	Positive	Positive	Tripp Lite OMNI600LAN
73-0665	Positive	Positive	Positive	Tripp Lite OMNI750LAN
73-0665	Positive	Positive	Positive	Tripp Lite OMNI900LAN
73-0665	Positive	Positive	Positive	Tripp Lite OMNI1250LAN
73-0665	Positive	Positive	Positive	Tripp Lite OMNI2000LAN
73-0665	Positive	Positive	Positive	Tripp Lite SMART200
73-0665	Positive	Positive	Positive	Tripp Lite SMART400
73-0665	Positive	Positive	Positive	Tripp Lite SMART500
73-0665	Positive	Positive	Positive	Tripp Lite SMART600
73-0665	Positive	Positive	Positive	Tripp Lite SMART750
73-0665	Positive	Positive	Positive	Tripp Lite SMART900
73-0665	Positive	Positive	Positive	Tripp Lite SMART1250
73-0665	Positive	Positive	Positive	Tripp Lite Unison PS4.5
73-0665	Positive	Positive	Positive	Tripp Lite Unison PS6.0
73-0665	Positive	Positive	Positive	Tripp Lite Unison PS9.0


Multimedia Audio Adapters

The following multimedia audio adapters have been tested, and are supported on X86, MIPS and Alpha AXP platforms except as noted.

x86	MIPS	ALPHA	Multimedia Audio Adapter
X			COMPAQ Business Audio
X	X	X	Creative Labs Sound Blaster 1.x
X	X	X	Creative Labs Sound Blaster 16
X	X	X	Creative Labs Sound Blaster Pro
X	X	X	Media Vision™ Pro AudioSpectrum-16 95
X	X	X	Media Vision Pro AudioStudio 95
X	X	X	Media Vision Thunder Board 96
X	X	X	Microsoft Windows Sound System
	X		Built-in audio adapter on MIPS ARC/R4000 systems


Modems

The following modems are supported for use with Remote Access Service, and are supported on X86, MIPS and Alpha AXP platforms except as noted.

3X

3X 396D

3X 514D

3X WYSIWYF 496D

3X WYSIWYF 496DB

3X WYSIWYF 514D

3X WYSIWYF 514DB

3X WYSIWYF 514DBX

3X WYSIWYF 514DP

3X WYSIWYF 514DPX

3X WYSIWYF 514DS

3X WYSIWYF 514DSX

AJ 1445/1446

AJ 2423

AJ 9636

Andest Rocket

Angia DataStart for CompaqLTE

ARN DX

ARN Generique

AT&T 2224 CEO

AT&T 4024

AT&T Comsphere 3810

AT&T Comsphere 3811

AT&T Comsphere 3820

AT&T Comsphere 3830

AT&T Dataport

ATI 2400 etc/e

ATI 9600 etc/e

ATTEL MX 144_14400bps

ATTEL MX 144_9600bps

ATTEL MX 96xxx

Avtek CD900

Avtek CD930

Banksia MX-6 V.32bis

Banksia XM124/R FAXMODEM

Boca Modem V.Fast Class

Bocamodem M1440 Alt

Cardinal 14400

Cardinal 14400 Internal

Cardinal 2400e

Cardinal 9600

CDC 6436

CDC 6438

Codex 2264

Codex 3220

Codex 3220 Plus

Codex 3260

Codex 3260 Fast

Codex 3261

Codex 3261 Fast

Codex 3262

Codex 3262 Fast

Codex 3263

Codex 3263 Fast

Codex 3265

Codex 3265 Fast

Codex 326x

Codex 326x FAST

Codex V.34R

COM1 MC215

COM1 MC216

COM1 MV214

COM1 MV215

COM1 MV216

COM1 MV219

ComCom Spirit II

ComCom Spirit TERBO

Compaq SpeedPAQ 144

Creatix LC144VF

Creatix LC288FC

CTK SHORTY 144 SL

CXR Telcom 1445

DATACONSYST DAC124

Dataflex Rapier+ V32Bis

DataRace RediModem V.32bis 97

Datatrek 2424AMH

Datatrek Elite 624D 98

Datatrek V.32 99

Digicom Scout

Digicom Scout Plus

DIGICOM SNM28

Dr Neuhaus Fury 14400 TI®

Dr Neuhaus Fury 19200 TI

Dr Neuhaus Fury 2403 TI

Dr Neuhaus Fury Card 144

Dr Neuhaus Fury Card 24

Dr Neuhaus Niccy 3000 TI

Dr Neuhaus Smarty 144 TI

Dr Neuhaus Smarty 19200

Dr Neuhaus Smarty 24 TI

DSI 9624E

DSI 9624LE Plus

DYNALINK

EEH Elink 29-3 analog

EEH Elink 29-3 ISDN

EEH Elink 301

EEH Elink 310

EEH Elink 32

EEH Elink 32-3 analog

EEH Elink 32-3 ISDN

ELISA 144

ELSA MicroLink 14.4 PC

ELSA MicroLink 14.4 T

ELSA MicroLink 14.4 TL

ELSA MicroLink 14.4 TM

ELSA MicroLink 14.4MC

ELSA MicroLink 2440T

ELSA MicroLink 2440TR

ELSA MicroLink 2460MC

ELSA MicroLink 2460PC

ELSA MicroLink 2460TL

ELSA MicroLink 28800TL

ELSA MicroLink ISDN/TL

ELSA ZIFF 144

ETech UFOMATE P1496MX

Evercom 24

Evercom 24E

Evercom 24E+

Gateway 2000 Internal

Gateway 2000 Internal Alt

Gateway 2000 Nomad 14400

GENER - Generique 14400

GENER GE925

GENFAX 14400

GVC FM14400

GVC SM2400

GVC SM96

Hayes® Accura 14400

Hayes Accura 28800

Hayes Compatible 1200

Hayes Compatible 14400

Hayes Compatible 2400

Hayes Compatible 9600

Hayes Optima 14400

Hayes Optima 28800

Hayes Optima 9600

Hayes Pocket Modem® 2400

Hayes Smartmodem™ 2400

Hayes Smartmodem 9600

Hayes Ultra 14400

Hayes Ultra 9600

Hayes V Series Smartmodem 9600

Hidem 14400/FAX

Hidem 2442P/FAX

Holmes 14.4 all models

Infotel 1414VQE External

Intel 14400EX

Intel 9600EX

Intel SatisFaxtion®

Intel SatisFaxtion 100

Intel SatisFaxtion 400e

ke WorldBlazer

KORTEX KXPOCKET 9600

KORTEX KXPRO  2400

KORTEX KXPRO 144 BOX

KORTEX KXPRO 144 CARTES

KORTEX KXPRO 144 POCKET

KORTEX KXPRO 9600

KORTEX NFX 144 CARTES

KORTEX NFX 144 POCKET

LASAT Unique 144

LCE 126P

LCE 132P

LIGHTFAX 1440LC

LOGEM 914

LOGEM 928

M. Bullet 100E V.34

M. Bullet E1414MX

M. Bullet ModemMan

M. Bullet ModemMan V.terbo

M. Bullet PC1414MX

M. Bullet PC192MX V.terbo

M. Bullet PCMCIA 1414M

M. CashCom

M. SpiderMan

Macronix Maxlite Fax 9696

Macronix VOMAX 2000

Maestro 144FMEI

Maestro RC224FMI

Megahertz Alternative

Megahertz C5144 for Compaq LTE

Megahertz C596FM for CompaqLTE

Megahertz P2144 AA Batteries

Megahertz P2144 Pkt Faxmodem

Megahertz P296FMV AA Batteries

Megahertz T3144 for Toshiba

Megahertz T396FM for Toshiba

Megahertz Z3144 for Zenith

Megahertz Z396FM for Zenith

Metricom Wireless 9600

MicroCom® DeskPorte FAST

MicroCom DeskPorte FAST ES28.8

MicroCom QX 4232bis 98

MicroComQX 4232HS

MicroGate MG144 97

MicroGate MG96 97

MicroPorte 1042

MultiTech MT932

MultiTech MultiModem 224 100

MultiTech MultiModem MT2834

MultiTech MultiModem MT932

NEC 9635E Plus

Netcomm Pocket M/F 2400

Netcomm Pocket Rocket PA

Netcomm Smartmodem E7F

Octocom 8324 97

Octocom 8396

PDI-1000 99

PIAL FAXMOD PC

PNB AMAZONE 2400

PNB Baby RIO 14400

Practical Peripherals 14400FX

Practical Peripherals 14400SA

Practical Peripherals 2400MNP 98

Practical Peripherals 2400SA 99

Practical Peripherals 9600FX

Practical Peripherals 9600SA

Practical Peripherals PC288MT

Practical Peripherals PC288SA

Practical Peripherals PM288PKT

Practical Peripherals2400 Pkt

Psion Dacom PDM 50F

QUATERNAIRE V32.BIS

Racal ALM 3226

Racal RMD 2412

Racal RMD 2412/2 101

Racal RMD 2422

Racal RMD 3221

Racal RMD 3222

Racal RMD 3223

Racal RMD 3226

Racal RMD 9632PA

Racal RMD 9642PA

SAT 14402

SBN 2314C

SEMAFOR 1496A

SEMAFOR 2324C

Smartlink Pocket 2400

Smartlink V32Bis/Fax

Supra Fax Modem 288

Supra Fax Modem 288 internal

Supra Fax Modem 9624 Internal

Supra Fax Modem Plus

Supra Fax Modem V32

Supra Fax Modem V32bis

SupraModem 2400

SYSNET SMF-04

SYSNET SMF-36

Telebit® QBlazer

Telebit T1000

Telebit T1500 99

Telebit T1600 98

Telebit T2000

Telebit T2500

Telebit T3000

Telebit TrailBlazer® Plus

Telebit WorldBlazer

Telebit WorldBlazer-Rackmount

Telejet 14400

Telelink IMS08

Tornado 2400

Tornado 96

Tornado FM14400

TOSHIBA SLIM ASYNC

TOSHIBA SLIM FAX / 2400

TOSHIBA SLIM SYNC

UCOM FASTLINK 144

UCOM TRAVELLER 144

UDS Motorola® CELLect 144

UDS Motorola FasTalk II

UDS Motorola FasTalk V.32/42b 102

UDS Motorola FasTalk V32

UDS Motorola V.3225 98

UDS Motorola V.3227 102

UDS Motorola V.3229

UDS Motorola V.3400

US Robotics Courier Dual

US Robotics Courier HST

US Robotics Courier V.32bis

US Robotics Sportster 14400

US Robotics Sportster 2400

US Robotics Sportster 28800 VFC

US Robotics Sportster 9600

US Robotics V32bis Quad Digital

US Robotics Worldport 14400

Ven-Tel 14400 Fax

Ven-Tel 14400 Fax Internal

Ven-Tel 9600 Plus II 103

Ven-Tel ECV 32bis II

Ven-Tel Pocket 24 V.42bis FAX

ViVa 144 Fax

Western Datacom Worldcom 99

Zoom AFX

Zoom FX 9624V

Zoom VFP 28.8 internal

Zoom VFX V.32bis

ZyXEL U-1496

ZyXEL U-1496 Plus

ZyXEL U-1496A Plus

ZyXEL U-1496B

ZyXEL U-1496B Plus

ZyXEL U-1496E

ZyXEL U-1496E Plus

ZyXEL U-1496EA

ZyXEL U-1496EA Plus

ZyXEL U-1496EG

ZyXEL U-1496EG Plus

ZyXEL U-1496G Plus

ZyXEL U-1496P

ZyXEL U-1496R

ZyXEL U-1496R Plus

ZyXEL U-1496RN

ZyXEL U-1496RN Plus

ZyXEL U-1496SN Plus


Hardware Security Hosts

The following hardware security hosts have been tested for use with Remote Access Service, and are supported on X86, MIPS and Alpha AXP platforms except as noted.

Digital Pathways Defender 1000D

Racal Gaurdata GSM

Security Dynamics ACM400


ISDN Adapters

The following ISDN adapters have been tested for use with Remote Access Service, and are supported on X86, MIPS and Alpha AXP platforms except as noted.

DigiBoard PCIMAC ISA Adapter

DigiBoard PCIMAC/4 Adapter


Multi-port Serial Adapters

The following multi-port serial adapters have been tested for use with Remote Access Service, and are supported on X86, MIPS and Alpha AXP platforms except as noted.

Comtrol Hostess 550 104

Consensys ChiliPORTS /4 RAS Adapter 1

Consensys ChiliPORTS /8 RAS Adapter 1

Consensys ChiliPORTS/16 RAS Adapter 1

Consensys ChiliPORTS MC/4 RAS Adapter 1

Consensys ChiliPORTS MC/8 RAS Adapter 1

Consensys ChiliPORTS MC/16 RAS Adapter 1

DigiBoard 2Port

DigiBoard 4Port

DigiBoard 8Port

DigiBoard CX Adapter

DigiBoard DigiCHANNEL PC/X Host Adapter for ISA bus 104

DigiBoard EPC Adapter

DigiBoard PC/2e (8K) Adapter

DigiBoard PC/4e Adapter

DigiBoard PC/4e (8K) Adapter

DigiBoard PC/8e Adapter

DigiBoard PC/8e (8K) Adapter

DigiBoard PC/8i Adapter

DigiBoard PC/16e Adapter

DigiBoard PC/16i Adapter

DigiBoard PC/Xem Adapter

GlobTek Dual RS-232 Asynchronous Adapter I1001

Sealevel System COMM+8 105

Sealevel System COMM+232 /EX 105

Sealevel System VESA COMM+4 105

Star Gate Technologies Plus 8 104

Star Gate Technologies ACL 1,17

Star Gate Technologies ACL II+ 1,17

Star Gate Technologies ACL IIR+ 1,17

Star Gate Technologies Avanstar 100i 1,17

Star Gate Technologies Avanstar 100e 1,17

Star Gate Technologies Avanstar 100m 1,17


X.25 Adapters

The following X.25 adapters have been tested for use with Remote Access Service, and are  supported on the X86 single processor platform.

EiconCard EC/PC 1 Meg

EiconCard EC/MC 1 Meg

EiconCard HSI/PC 1 Meg

EiconCard HSI/MC 1 Meg

EiconCard IMC/PC (UK version only)

EiconCard IMC/MC (UK version only)

Eicon Dual-Port Network-Adapter (DPNA) 2 Meg

Eicon Multi-Port Network-Adapter (MPNA) 2 Meg


Third Party Remote Access Servers

The following third party remote access servers have been tested for use with Remote Access Service on the Windows NT 3.5 Workstation.  See Remote Access readme file (rasread.txt) for details on third party product versions supported.

Shiva LAN Rover

Telebit NetBlazer

Cisco

3Com/Centrum AccessBuilder


Keyboards

Any keyboard 100% compatible with those listed below.

101/102-key

IBM AT (84-key) 106


Pointing Devices

The following pointing devices have been tested. The MIPS and Alpha platforms support mouseport and serial pointing devices.

Acer M-SG14

AT&T 320 Mouse CA-93-6MD

CompuAdd Serial Mouse

Digital Equipment PCXAS-AA

Digital Equipment PC7XS-AA

Hewlett-Packard C1413A

Honeywell 2HW53-3E

IBM 33G3835

IBM 33G5430

IBM 6450350

IBM 96F9275

IBM TrackPoint II™

ICL M-SF14-6MD

Logitech Mouseman, Bus

Logitech Mouseman, Cordless

Logitech Series 9 mice

Logitech Series M mice

Logitech Trackman Portable Mouse

Logitech Trackman Stationary Mouse

Microsoft Bus Mouse (Original - Green Buttons)

Microsoft Mouse, BallPoint

Microsoft Mouse, Inport

Microsoft Mouse, PS/2 Compatible

Microsoft Mouse, Serial

Microsoft Mouse, Serial / PS/2

Microsoft Mouse 2.0, BallPoint

Microsoft Mouse 2.0, Bus

Microsoft Mouse 2.0, MousePort

Microsoft Mouse 2.0, Serial

Microsoft Mouse 2.0, Serial-MousePort

MotorMouse

Olivetti M-SE9-6MD


Printers

Drivers are included for the following printers, and are supported on X86 MIPS and Alpha AXP platforms except as noted.

Agfa Compugraphic 400PS

Agfa Compugraphic Genics

Agfa Matrix® ChromaScript v51.8

Agfa TabScript C500 PostScript® Printer v50®.3

Agfa-Compugraphic 9400P v49.3

Apple® LaserWriter® II NT v47.0

Apple® LaserWriter II NTX v47.0

Apple LaserWriter II NTX v51.8

Apple LaserWriter II NTX-J v50.5

Apple LaserWriter IIf v2010.113

Apple LaserWriter IIg v2010.113

Apple LaserWriter Plus v38.0

Apple LaserWriter Plus v42.2

Apple LaserWriter Pro 600

Apple LaserWriter Pro 630

Apple LaserWriter Pro 810

Apple LaserWriter v23.0

Apple Personal LaserWriter NTR v2010.129

Apricot Laser

APS-PS PIP with APS-6-108 v49.3 or 52.2

APS-PS PIP with APS-6-80 v49.3 or 52.2

APS-PS PIP with LZR 1200 v49.3 or 52.2

APS-PS PIP with LZR 2600 v49.3 or 52.2

AST TurboLaser-PS v47.0

AT&T 470/475

AT&T 473/478

Brother HJ-100

Brother HJ-100i

Brother HJ-770

Brother HL-10DV

Brother HL-10h

Brother HL-10V

Brother HL-4

Brother HL-4V

Brother HL-4Ve

Brother HL-6V

Brother HL-8

Brother HL-8D

Brother HL-8e

Brother HL-8V

Brother M-1309

Brother M-1324

Brother M-1809

Brother M-1818

Brother M-1824L

Brother M-1909

Brother M-1918

Brother M-1924L

Bull Compuprint PageMaster 1025

Bull Compuprint PageMaster 413

Bull Compuprint PageMaster 815

Bull Compuprint PageMaster 825

Bull Compuprint PM 201

C-Itoh 8510

Canon® Bubble-Jet BJ-10e

Canon Bubble-Jet BJ-10ex

Canon Bubble-Jet BJ-10sx

Canon Bubble-Jet BJ-130

Canon Bubble-Jet BJ-130e

Canon Bubble-Jet BJ-20

Canon Bubble-Jet BJ-200

Canon Bubble-Jet BJ-200e

Canon Bubble-Jet BJ-230

Canon Bubble-Jet BJ-300

Canon Bubble-Jet BJ-330

Canon Bubble-Jet BJC-600

Canon Bubble-Jet BJC-800

Canon LBP-4

Canon LBP-4 Lite

Canon LBP-4 Plus

Canon LBP-4 PS-2 v51.4

Canon LBP-430

Canon LBP-4i

Canon LBP-4sx

Canon LBP-4U

Canon LBP-8 II

Canon LBP-8 III

Canon LBP-8 III Plus

Canon LBP-8 IIIR

Canon LBP-8 IIIT

Canon LBP-8 IIR

Canon LBP-8 IIT

Canon LBP-8 IV

Canon LBP-860

Canon LBP-8III PS-1 v51.4

Canon LBP-8IIIR PS-1 v51.4

Canon LBP-8IIIT PS-1 v51.4

Canon LBP-8sx

Canon PS-IPU Color Laser Copier v52.3

Canon PS-IPU Kanji Color Laser Copier v52.3

Citizen 120D

Citizen 120D+

Citizen 124D

Citizen 180D

Citizen 200GX

Citizen 200GX/15

Citizen 224

Citizen ABC ESC/P 2

Citizen GSX 240 Scalable Font

Citizen GSX-130

Citizen GSX-140

Citizen GSX-140+

Citizen GSX-145

Citizen GSX-220 ESC/P 2

Citizen GSX-230

Citizen GSX-240 ESC/P 2

Citizen HSP-500

Citizen HSP-550

Citizen PN48

Citizen Prodot 24

Citizen Prodot 9

Citizen Prodot 9x

Citizen PROjet

Citizen ProLaser 6000

Citizen Swift 200

Citizen Swift 24

Citizen Swift 240 ESC/P 2

Citizen Swift 240 Scalable Font

Citizen Swift 24e

Citizen Swift 24x

Citizen Swift 9

Citizen Swift 9x

ColorAge ColorQ

Colormate PS v51.9

COMPAQ PAGEMARQ 15

COMPAQ PAGEMARQ 15 v2012.015

COMPAQ PAGEMARQ 20

COMPAQ PAGEMARQ 20 v2012.015

Dataproducts LZR 1260 v47.0

Dataproducts LZR 1560 v2010.127

Dataproducts LZR 960 v2010.106

Dataproducts LZR-2665 v46.2

Diconix 150 Plus

Digital Colormate PS v51.9

Digital DECcolorwriter 1000 17

Digital DECcolorwriter 1000 39

Digital DEClaser 1100 (LJ)

Digital DEClaser 1100

Digital DEClaser 1150 v51.4

Digital DEClaser 1152  17 fonts

Digital DEClaser 1152  43 fonts

Digital DEClaser 2100

Digital DEClaser 2100plus (LJ)

Digital DEClaser 2150 plus v51.4

Digital DEClaser 2150 v51.4

Digital DEClaser 2200

Digital DEClaser 2200plus (LJ)

Digital DEClaser 2250 plus v51.4

Digital DEClaser 2250 v51.4

Digital DEClaser 3200 (LJ)

Digital DEClaser 3200

Digital DEClaser 3250 v47

Digital DEClaser 5100

Digital DECmultiJET 1000

Digital DECmultiJET 2000

Digital DECwriter 95

Digital LA310

Digital LA324

Digital LA424

Digital LA70

Digital LA75 Plus

Digital LA75

Digital LN03R ScriptPrinter

Digital PrintServer 17/600

Digital PrintServer 17 12mb/L2

Digital PrintServer 17 v48.3

Digital PrintServer 20 v48.3

Digital PrintServer 32 Kanji v48.3

Digital PrintServer 32 v48.3

Digital PrintServer 40 Plus Kanji v48.3

Digital PrintServer 40 Plus v48.3

Digital turbo PrintServer 20

Digital turbo PrintServer 20 Kanji v48.3

Epson ActionLaser 1500

Epson ActionLaser 1600

Epson ActionLaser II

Epson AP-3250 ESC/P 2

Epson AP-3250 Scalable Font

Epson AP-3260 ESC/P 2

Epson AP-5000 ESC/P 2

Epson AP-5000 Scalable Font

Epson AP-5000+ ESC/P 2

Epson AP-5500 ESC/P 2

Epson AP-5500 Scalable Font

Epson AP-5500+ ESC/P 2

Epson Compatible 24 Pin

Epson Compatible 9 Pin

Epson DFX-5000

Epson DLQ-2000

Epson EPL-4000

Epson EPL-4200

Epson EPL-4300

Epson EPL-5200

Epson EPL-5600

Epson EPL-6000

Epson EPL-7000

Epson EPL-7500 v52.3

Epson EPL-8000

Epson EPL-8100

Epson EX-1000

Epson EX-800

Epson FX-100

Epson FX-100+

Epson FX-1000

Epson FX-105

Epson FX-1050

Epson FX-185

Epson FX-286

Epson FX-286e

Epson FX-80

Epson FX-80+

Epson FX-800

Epson FX-85

Epson FX-850

Epson FX-86e

Epson GQ-3500

Epson JX-80

Epson L-1000

Epson L-750

Epson LP-3000PS F2 v52.3

Epson LP-3000PS F5 v52.3

Epson LQ-100 ESC/P 2

Epson LQ-100 Scalable Font

Epson LQ-1000

Epson LQ-1010

Epson LQ-1050

Epson LQ-1060

Epson LQ-1070 ESC/P 2

Epson LQ-1070 Scalable Font

Epson LQ-1070+ ESC/P 2

Epson LQ-1170 ESC/P 2

Epson LQ-1170 Scalable Font

Epson LQ-150 ESC/P 2

Epson LQ-1500

Epson LQ-200

Epson LQ-2500

Epson LQ-2550

Epson LQ-400

Epson LQ-450

Epson LQ-500

Epson LQ-510

Epson LQ-550

Epson LQ-570 ESC/P 2

Epson LQ-570 Scalable Font

Epson LQ-570+ ESC/P 2

Epson LQ-800

Epson LQ-850

Epson LQ-850+

Epson LQ-860

Epson LQ-870 ESC/P 2

Epson LQ-870 Scalable Font

Epson LQ-950

Epson LX-1050

Epson LX-400

Epson LX-80

Epson LX-800

Epson LX-810

Epson LX-850

Epson LX-850+

Epson LX-86

Epson MX-100

Epson MX-80 F/T

Epson MX-80

Epson PostScript CARD v52.5

Epson RX-100

Epson RX-100+

Epson RX-80

Epson RX-80 F/T

Epson RX-80 F/T+

Epson SQ-1170 ESC/P 2

Epson SQ-1170 Scalable Font

Epson SQ-2000

Epson SQ-2500

Epson SQ-2550

Epson SQ-850

Epson SQ-870 ESC/P 2

Epson SQ-870 Scalable Font

Epson Stylus 1000 ESC/P 2

Epson Stylus 300 ESC/P 2

Epson Stylus 800 ESC/P 2

Epson T-1000

Epson T-750

Fujitsu Breeze 100

Fujitsu Breeze 200

Fujitsu DL 1100 Colour

Fujitsu DL 1100

Fujitsu DL 1150

Fujitsu DL 1200

Fujitsu DL 1250

Fujitsu DL 2400

Fujitsu DL 2600

Fujitsu DL 3300

Fujitsu DL 3350

Fujitsu DL 3400

Fujitsu DL 3450

Fujitsu DL 3600

Fujitsu DL 4400

Fujitsu DL 4600

Fujitsu DL 5600

Fujitsu DL 900

Fujitsu DX 2100

Fujitsu DX 2200

Fujitsu DX 2300

Fujitsu DX 2400

Fujitsu RX7100PS v50.3

GCC BLP Elite v52.3

GCC BLP II v52.3

GCC BLP IIS v52.3

GCC Business LaserPrinter v49.2

GCC Business LaserPrinter v51.4

Generic IBM Graphics 9pin wide

Generic IBM Graphics 9pin

Gestetner GLP800-Scout v52.3

Hermes H 606 PS (13 Fonts)

Hermes H 606 PS (35 fonts)

Hermes H 606

Hewlett-Packard HP-GL®/2 Plotter

HP 7550 Plus

HP DesignJet 200 (C3180A)

HP DesignJet 200 (C3181A)

HP DesignJet 600 (C2847A)

HP DesignJet 600 (C2848A)

HP DesignJet 650C (C2858A)

HP DesignJet 650C (C2858B)

HP DesignJet 650C (C2859A)

HP DesignJet 650C (C2859B)

HP DesignJet 650C v2013.109

HP DesignJet (C3180A)

HP DeskJet® 1200C

HP DeskJet 1200C/PS

HP DeskJet 310 (Color)

HP DeskJet 310 (Monochrome)

HP DeskJet 500

HP DeskJet 500C (Color)

HP DeskJet 500C (Monochrome)

HP DeskJet 510

HP DeskJet 520

HP DeskJet 550C

HP DeskJet 560C

HP DeskJet Plus

HP DeskJet Portable

HP DeskJet

HP DraftMaster RX/MX

HP DraftMaster SX

HP DraftPro® Plus (C3170A)

HP DraftPro Plus (C3171A)

HP LaserJet 2000

HP LaserJet 4

HP LaserJet 4 Plus

HP LaserJet 4/4M PS

HP LaserJet 4/4M PS (300 dpi)

HP LaserJet 4L

HP LaserJet 4L/4ML PostScript

HP LaserJet 4M Plus

HP LaserJet 4ML

HP LaserJet 4MP

HP LaserJet 4P

HP LaserJet 4P/4MP PS

HP LaserJet 4P/4MP PS (300 dpi)

HP LaserJet 4Si

HP LaserJet 4Si/4Si MX PS

HP LaserJet 4Si/4Si MX PS (300 dpi)

HP LaserJet 500+

HP LaserJet IID PostScript Cartridge v52.2

HP LaserJet IID

HP LaserJet III PostScript Cartridge v52.2

HP LaserJet III PostScript Plus v2010.118

HP LaserJet III

HP LaserJet IIID PostScript Cartridge v52.2

HP LaserJet IIID PostScript Plus v2010.118

HP LaserJet IIID

HP LaserJet IIIP PostScript Cartridge v52.2

HP LaserJet IIIP PostScript Plus v2010.118

HP LaserJet IIIP

HP LaserJet IIISi PostScript v52.3

HP LaserJet IIISi

HP LaserJet IIP

HP LaserJet IIP Plus

HP LaserJet IIP PostScript Cartridge v52.2

HP LaserJet Plus

HP LaserJet Series II

HP LaserJet

HP PaintJet® XL 300

HP PaintJet XL

HP PaintJet XL300 v2011.112

HP PaintJet

HP QuietJet® Plus

HP QuietJet

HP ThinkJet® (2225 C-D)

IBM 4019 LaserPrinter

IBM 4019 LaserPrinter PS17

IBM 4019 LaserPrinter PS39

IBM 4029 LaserPrinter

IBM 4029 LaserPrinter PS17

IBM 4029 LaserPrinter PS39

IBM 4037 5E

IBM 4039 LaserPrinter

IBM 4039 LaserPrinter PS

IBM 4039 LaserPrinter Plus

IBM 4039 LaserPrinter plus PS

IBM 4070 IJ

IBM 4079 Color Jetprinter PS

IBM 4216-020 v47.0

IBM 4216-030 v50.5

IBM ExecJet® 4072

IBM ExecJet 4076 II

IBM Graphics

IBM Personal Page Printer II-31

IBM Personal Printer II 2380

IBM Personal Printer II 2381

IBM Personal Printer II 2390

IBM Personal Printer II 2391

IBM Portable 5183

IBM Proprinter® II

IBM Proprinter III

IBM Proprinter X24

IBM Proprinter X24e

IBM Proprinter XL II

IBM Proprinter XL III

IBM Proprinter XL

IBM Proprinter XL24

IBM Proprinter XL24e

IBM Proprinter

IBM PS/1 2205

IBM QuickWriter® 5204

IBM QuietWriter® III

Kodak® ColorEase PS Printer

Kodak EktaPlus 7016

Kyocera® F-1000

Kyocera F-1000A

Kyocera F-1010

Kyocera F-1200S

Kyocera F-1500T

Kyocera F-1800

Kyocera F-1800A

Kyocera F-2000A

Kyocera F-2010

Kyocera F-2200

Kyocera F-2200S

Kyocera F-3000

Kyocera F-3000A

Kyocera F-3010

Kyocera F-3300

Kyocera F-5000

Kyocera F-800

Kyocera F-800A

Kyocera F-820

Kyocera FS-400 / FS-400A

Kyocera FS-1500 / FS-1500A

Kyocera FS-2600 / FS-2600A

Kyocera FS-3500 / FS-3500A

Kyocera FS-5500 / FS-5500A

Kyocera FS-850 / FS-850A

LaserWriter Personal NT v51.8

Linotronic™ 100 v42.5

Linotronic 200 v47.1

Linotronic 200 v49.3

Linotronic 200/230

Linotronic 300 v47.1

Linotronic 300 v49.3

Linotronic 330 v52.3

Linotronic 330-RIP 30 v52.3

Linotronic 500 v49.3

Linotronic 530 v52.3

Linotronic 530-RIP 30 v52.3

Linotronic 630 v52.3

Linotronic 830 v52.3

Linotronic 930 v52.3

Linotronic Pr60 v52.3

Mannesmann Tally® MT 130/24

Mannesmann Tally MT 131/24

Mannesmann Tally MT 150/24

Mannesmann Tally MT 151/24

Mannesmann Tally MT 230/24

Mannesmann Tally MT 330

Mannesmann Tally MT 350

Mannesmann Tally MT 360

Mannesmann Tally MT 730/735

Mannesmann Tally MT 82

Mannesmann Tally MT 90

Mannesmann Tally MT 904 Plus

Mannesmann Tally MT 908

Mannesmann Tally MT 91

Mannesmann Tally MT 92

Mannesmann Tally MT 92C

Mannesmann Tally MT 93

Mannesmann Tally MT 94

Mannesmann Tally MT 98/99

Mannesmann Tally T9017

Microtek TrueLaser

Minolta SP 3000

Minolta SP 3500

Monotype® ImageMaster 1200 v52.3

Monotype Imagesetter v52.2

NEC Colormate PS/40 v51.9

NEC Colormate PS/80 v51.9

NEC Jetmate 400

NEC Jetmate 800

NEC Pinwriter CP6

NEC Pinwriter CP7

NEC Pinwriter P20

NEC Pinwriter P2200

NEC Pinwriter P2plus

NEC Pinwriter P30

NEC Pinwriter P3200

NEC Pinwriter P3300

NEC Pinwriter P5200

NEC Pinwriter P5300

NEC Pinwriter P5XL

NEC Pinwriter P6

NEC Pinwriter P60

NEC Pinwriter P6200

NEC Pinwriter P6300

NEC Pinwriter P6plus

NEC Pinwriter P7

NEC Pinwriter P70

NEC Pinwriter P7plus

NEC Pinwriter P90

NEC Pinwriter P9300

NEC Pinwriter P9XL

NEC SilentWriter® 95 v2010.119

NEC Silentwriter 95 v2011.111

NEC Silentwriter 97 v2011.111

NEC Silentwriter LC 860 Plus

NEC Silentwriter LC 860

NEC Silentwriter LC890 v47.0

NEC Silentwriter LC890XL v50.5

NEC Silentwriter S102

NEC Silentwriter2 290 v52.0

NEC Silentwriter2 90 v52.2

NEC Silentwriter2 990 v52.3

OceColor G5241 PS

OceColor G5242 PostScript Printer v50.3

OKI MICROLINE 801PS+F v52.3

Oki ML 182 Elite (IBM)

Oki ML 192 Elite (IBM)

Oki ML 193 Elite (IBM)

Oki ML 280 Elite (IBM)

Oki ML 320 Elite (IBM)

Oki ML 321 Elite (IBM)

Oki ML 3410 Elite (IBM)

Oki ML 380 Elite

Oki ML 390 Elite

Oki ML 391 Elite

Oki ML 393 Elite

Oki ML 393C Elite

Oki ML 590

Oki ML 591

OKI OL-400

Oki OL-410

OKI OL-800/840

Oki OL-810

Oki OL-870

Oki OL830-PS v52.5

Oki OL840-PS v51.8

Oki OL850-PS v52.5

Oki OL870-PS v2013.108

Okidata® LaserLine 6

Okidata ML 192 Plus

Okidata ML 192

Okidata ML 192-IBM

Okidata ML 193 Plus

Okidata ML 193

Okidata ML 193-IBM

Okidata ML 292-IBM

Okidata ML 293-IBM

Okidata ML 320

Okidata ML 320-IBM

Okidata ML 321

Okidata ML 321-IBM

Okidata ML 380

Okidata ML 390 Plus

Okidata ML 390

Okidata ML 391 Plus

Okidata ML 391

Okidata ML 393 Plus

Okidata ML 393

Okidata ML 393C Plus

Okidata ML 393C

Okidata ML 92-IBM

Okidata ML 93-IBM

Okidata OL-400

Okidata OL-410

Okidata OL-800

Okidata OL-810

Olivetti DM 109

Olivetti DM 124 C

Olivetti DM 124 L

Olivetti DM 124

Olivetti DM 309 L

Olivetti DM 309 S

Olivetti DM 309 SL

Olivetti DM 309

Olivetti DM 324 L

Olivetti DM 324 S

Olivetti DM 324 SL

Olivetti DM 324

Olivetti DM 600 S

Olivetti DM 600

Olivetti DM 624

Olivetti ETV 5000

Olivetti JP 150

Olivetti JP 350

Olivetti JP 350S

Olivetti PG 108

Olivetti PG 208 M2

Olivetti PG 306 PS (13 Fonts)

Olivetti PG 306 PS (35 Fonts)

Olivetti PG 306

Olivetti PG 308 HS PostScript

Olivetti PG 308 HS

Olivetti PG 308

Olivetti PG 404

Olivetti PG 408

Panasonic KX-P1081

Panasonic KX-P1123

Panasonic KX-P1124

Panasonic KX-P1124i

Panasonic KX-P1180

Panasonic KX-P1624

Panasonic KX-P1695

Panasonic KX-P2123

Panasonic KX-P2124

Panasonic KX-P2180

Panasonic KX-P2624

Panasonic KX-P3134

Panasonic KX-P3634

Panasonic KX-P4410

Panasonic KX-P4420

Panasonic KX-P4430

Panasonic KX-P4440

Panasonic KX-P4450

Panasonic KX-P4450i

Panasonic KX-P4451

Panasonic KX-P4455 v51.4

Panasonic KX-P5400 v2013.112

Panasonic KX-P5410 v2013.110

QMS® 1060 Print System

QMS 1660 Print System

QMS 1725 Print System

QMS 2025 Print System

QMS 3225 Print System

QMS 420 Print System v2011.22 r15

QMS 4525 Level 2

QMS 4525 Print System

QMS 860 Print System v2011.22 r15

QMS 860+ Level 2

QMS ColorScript 100 Mod 30si

QMS ColorScript 100 Model 10 v50.3

QMS ColorScript 100 Model 20 v50.3

QMS ColorScript 100 Model 30 v50.3

QMS ColorScript 100 v49.4

QMS ColorScript 1000 Level 1

QMS ColorScript 1000 Level 2

QMS ColorScript 210 v2011.22

QMS ColorScript 230 v2011.22

QMS PS Jet Plus v46.1

QMS PS Jet v46.1

QMS-PS® 1700 v52.4

QMS-PS 2000 v52.4

QMS-PS 2200 v51.0 or 52.3

QMS-PS 2210 v51.0 or 52.3

QMS-PS 2220 v51.0 or 52.3

QMS-PS 410 v52.4

QMS-PS 800 Plus v46.1

QMS-PS 800 v46.1

QMS-PS 810 Turbo v. 51.7

QMS-PS 810 v47.0

QMS-PS 815 MR v52.4

QMS-PS 815 v52.4

QMS-PS 820 Turbo v51.7

QMS-PS 820 v51.7

QMS-PS 825 MR v52.4

QMS-PS 825 v52.4

QuadLaser I

Qume ScripTEN v47.0

Ricoh LP-1200

Ricoh PC Laser 6000-PS v50.5

Royal CJP 450

Scantext 2030-51 v49.3 or 52.2

Schlumberger 5232 Color PostScript Printer v50.3

Seiko ColorPoint PS Model 04

Seiko ColorPoint PS Model 14

Seiko Professional ColorPoint 8BPP

Seikosha LT-20

Seikosha SL-80 IP

Seikosha SL-92 Plus

Seikosha SL-92

Seikosha SP-1900

Seikosha SP-1900+

Seikosha SP-2000

Seikosha SP-2400

Seikosha SP-2415

Sharp JX-9300

Sharp JX-9460

Sharp JX-9460 PS

Sharp JX-9500

Sharp JX-9500 PS

Sharp JX-9500E

Sharp JX-9500H

Sharp JX-9600

Sharp JX-9600 PS

Sharp JX-9660

Sharp JX-9660 PS

Sharp JX-9700

Sharp JX-9700E

Sharp JX-9700E PS

Shinko Color CHC-746PSJ PostScript Printer v52.2

Star FR-10

Star FR-15

Star LaserPrinter 4 III

Star LaserPrinter 4

Star LaserPrinter 5 EX

Star LaserPrinter 5

Star LaserPrinter 8 DB

Star LaserPrinter 8 DX

Star LaserPrinter 8 II

Star LaserPrinter 8 III

Star LaserPrinter 8

Star LC-10

Star LC-10 Colour

Star LC-100 Colour

Star LC-15

Star LC-20

Star LC-200

Star LC24-10

Star LC24-100

Star LC24-15

Star LC24-20

Star LC24-200

Star LC24-200 Colour

Star NB24-10

Star NB24-15

Star NL-10

Star NX-1000 Rainbow

Star NX-1000

Star NX-1001

Star NX-1020 Rainbow

Star NX-1500

Star NX-2400

Star NX-2410

Star NX-2415

Star NX-2420 Rainbow

Star NX-2420

Star NX-2430

Star SJ-48

Star XB-2410

Star XB-2415

Star XB-2420

Star XB-2425

Star XB24-10

Star XB24-15

Star XB24-200

Star XB24-250

Star XR-1000

Star XR-1020

Star XR-1500

Star XR-1520

Star ZA-200

Star ZA-250

Tandy LP-1000

Tegra Genesis

Tektronix® Phaser™ 200e with 17 fonts v2011.108(3)

Tektronix Phaser 200e with 39 fonts v2011.108(3)

Tektronix Phaser 200i v2011.108(3)

Tektronix Phaser 200J

Tektronix Phaser 220e with 17 fonts

Tektronix Phaser 220e with 39 fonts

Tektronix Phaser 220i

Tektronix Phaser 220J

Tektronix Phaser 300i

Tektronix Phaser 300J

Tektronix Phaser 480

Tektronix Phaser 480J

Tektronix Phaser II PX

Tektronix Phaser II PXe v2010.128 with 17 fonts

Tektronix Phaser II PXe v2010.128 with 39 fonts

Tektronix Phaser II PXi v2010.116

Tektronix Phaser II PXi v2011.108

Tektronix Phaser II PXiJ v2011.108

Tektronix Phaser III PXi v2010.116

Tektronix Phaser III PXi v2011.108

Tektronix Phaser III PXiJ v2011.108

Tektronix Phaser IISD v2011.108

Tektronix Phaser IISDJ

Tektronix Phaser IISDX

Tektronix Phaser PX

Tektronix Phaser PXi

TI 2115 13 fonts v47.0

TI 2115 35 fonts v47.0

TI 850/855

TI microLaser 600

TI microLaser PS17 v.52.1

TI microLaser PS35 v.52.1

TI microLaser XL PS17 v.52.1

TI microLaser XL PS35 v.52.1

TI microLaser16 Turbo v2010.119

TI microLaser6 Turbo v2010.119

TI microLaser9 Turbo v2010.119

TI OmniLaser™ 2108 v45.0

TI OmniLaser 2115 v47.0

Toshiba GX-400

Toshiba PageLaser12

Triumph Adler SDR 7706 PS13

Triumph Adler SDR 7706 PS35

Triumph Adler SDR 7706

UNISYS AP9210 17 Fonts v52.1

UNISYS AP9210 39 Fonts v52.1

UNISYS AP9210

UNISYS AP9415 v47.0

Varityper 4000-L300 v52.3

Varityper 4000-L330 v52.3

Varityper 4000-L500 v52.3

Varityper 4000-L530 v52.3

Varityper 4200B-P v49.3 or 52.2

Varityper 4300P v49.3 or 52.2

Varityper Series 4000-5300 v49.3 or 52.2

Varityper Series 4000-5330 v49.3 or 52.2

Varityper Series 4000-5500 v52.2

Varityper VT-600P v48.0

Varityper VT-600P

Varityper VT-600W v48.0

Varityper VT4990 v52.3

Varityper VT4_510A v52.3

VT4_530A v52.3

VT4_530B v52.3

VT4_530C v52.3

VT4_533B v52.3

VT4_533C v52.3

VT4_53EA v52.3

VT4_53EB v52.3

VT4_550A v52.3

VT4_550B v52.3

VT4_550C v52.3

VT4_551A v52.3

VT4_563A v52.3

VT4_563B v52.3

Wang LCS15 FontPlus

Wang LCS15

Wang LDP8

Xerox® DocuTech 135 v2010.130

Xerox DocuTech 85 v2010.130

Xerox DocuTech 90 v2010.130


Windows NT 3.1 x86 Architecture Uniprocessor Computers

The following systems have been tested as of September 1994 with Windows NT 3.1.  They are considered compatible with the Windows NT 3.5 product.

Absolute Computer 486/66 VL/EISA

ACD OPTIMA 486 DX 33 VL

ACD OPTIMA 486 DX 50 VL

ACD OPTIMA 486 DX2 66 VL

ACER 17000 SMP AA17853N

ACER AcerAcros 486DX2/66 (Model PT66DB)

ACER AcerAltos 700 Model AA768C

ACER AcerAltos 7000 (DX2-66)

ACER AcerAltos 7000 (Pentium 90)

ACER AcerAltos 7000/F433TU

ACER AcerAltos 7000/FT66TU

ACER AcerAltos 800 Model AA868C

ACER AcerFrame 1000 (Model 1733)

ACER AcerFrame 1000 (Model 1766)

ACER AcerFrame 300 (Model F433T)

ACER AcerFrame 500 (Model F433TE)

ACER AcerFrame 500 (Model FT50TE)

ACER AcerFrame 500 (Model FT66TE)

ACER AcerFrame 700

ACER AcerMate 433 sp (486SX-33)

ACER AcerMate 466d (Model MT66D3)

ACER AcerPower 425s

ACER AcerPower 433 sp (486SX-33)

ACER AcerPower 433e/P433E

ACER AcerPower 433s

ACER AcerPower 433v

ACER AcerPower 450d

ACER AcerPower 450de/PT50E

ACER AcerPower 466d

ACER AcerPower 466de (DX2-66)

ACER AcerPower 466dv

ACER AcerPower 486/33

ACER AcerPower 560e (Pentium 60)

ACER AcerPower 566e (Pentium 66)

ACER AcerPower 9000 Series Model 9813N

ACER AcerPower 9000/P560E

ACER AcerPower 9000/P566E

ACER AcerPower 9000/PT66E

ACMA 486/33 TI-VLB

ACMA 486/50 TS-E

ACMA 486/50-2 TI-VLB

ACMA 486/66-2 TI-VLB

ACMA 486/66-2 TS-E

ACMA 486/66-2 TS-VLB

ACS Meritel 486-50SF

ACS Meritel 486-66SF

Actech ACTion EISA 486DX-50

Actech ACTion EISA 486DX2-66

Actech ACTion ISA 486DX-33

Actech ACTion ISA 486DX-50

Actech ACTion ISA 486DX/2-50

Actech ACTion ISA 486DX/2-66

Actech ACTion ISA 486SX-25

Actech ACTion VLB 486DX-33

Actech ACTion VLB 486DX-50

Actech ACTion VLB 486DX/2-50

Actech ACTion VLB 486DX/2-66

Actech ACTion VLB 486SX-25

Adaptive Data System Pro 3/486-40

Adaptive Data System Pro 486/33 VESA

Adaptive Data System Pro 486/33DX

Adaptive Data System Pro Series 486/50

Adaptive Data System TAI 386DX/40CF System

Adaptive Data System TAI 486DX/50CS System

ADD-X 486 All In One 33 MHz

ADD-X Systemes 486/33Mhz ISA bus

ADPS 486 Power Notebook 486DX2-50Mhz

ADPS 486 Power Notebook Color 486-33Mhz

ADPS Ambassador

ADPS Bat Computer-33MHz

ADPS Bat Computer-50MHz

ADPS Local Bus 33

ADPS Medallion

ADPS Multimedia Power House

ADPS Power Notebook 486-33Mhz

ADPS System 3000

ADPS System 4000

ADPS System 5000

ADPS System 6000 EISA

ADPS System 6000 Plus

ADPS System 6000 Plus EISA

ADS 486 EISA+VESA UPGRADEABLE

ADS 486VL UPGRADEABLE

ADS ADA 466 EV

ADS ADA 466 ISA/VESA

ADS ADA 466E

ADS ADA-560-P

ADS LDI-466 ISA/VESA

ADS UPGRADEABLE 3/486

Advance Interface EISA VESA 486DX-50

Advance Interface EISA VESA 486DX2-66

Advance Interface VL-BUS 486DX-50

Advance Interface VL-BUS 486DX2-66

Advanced Computer SPIRAL 386DX/40

Advanced Computer SPIRAL 486/33

Advanced Computer SPIRAL 486DX2/50

AIC STM 386DX-33Mhz

AIC STM 486DX-33Mhz

AIC STM 486DX2-66Mhz

AIC STM 486DX2-66Mhz Local Bus

Alcotini AmiTech 386DX-40 STD

Alcotini AmiTech 486DX-33 STD

Alcotini AmiTech 486DX2-50 STD

Alcotini AmiTech 486DX2-66 STD

Alcotini AmiTech 486SX-25 STD

Alcotini Weston 486DX-66 TFT

AllWare 466-EV

ALR BusinessVEISA 3/33

ALR BusinessVEISA 4/33D

ALR BusinessVEISA 4/66D

ALR Evolution IV 4/25s

ALR Evolution IV 4/33

ALR Evolution IV 4/33s

ALR Evolution IV 4/66d

ALR Evolution IV 4E/25s

ALR Evolution IV 4E/33

ALR Evolution IV 4E/33s

ALR Evolution IV 4E/66d

ALR Evolution V STP/60

ALR Evolution V-Q/60

ALR Evolution V-Q/66

ALR Evolution V/60

ALR Evolution V/66

ALR Flyer 32LCT 4/50D

ALR Flyer 32LCT 4/66D

ALR Flyer 32LCT 4DX/33

ALR Flyer SD32 4/33

ALR Flyer SD32 4/66d

ALR Flyer VL 4/33d

ALR Flyer VL 4/66d

ALR Modular Processor System 486DX2/66

ALR PowerCache 4 33e

ALR POWERPRO/MC SMP 4/50D

ALR PROVEISA V/66

ALR RANGER M4/25

ALR RANGER MC4/25S

ALR RANGER MC4DX/25

ALR RANGER MCT4/25

AMAX 486/2-50 VESAmax Power Station

AMAX 486/33 VESAmax Power Station

AMAX 486/50 EISAmax Power Station

AMAX 486/66 EISAmax Power Station

AMAX 486/66 VESAmax Power Station

Ambra 486DX/50

AMBRA D4100BL

Ambra D466E/VL

Ambra DP60/PCI

Ambra DP66E/VL

AMBRA T4100BL

Ambra T466E/VL

American Multisystems InfoGOLD EISA VLB Line (DX2/66)

American Multisystems InfoGOLD P60NT

AMI Enterprise III

AMI Enterprise IV

AMI Excalibur PCI

AMI Excalibur VLB

AMI Omni Business Partner

AMI Super Voyager LC

AMI Super Voyager PCI

AMI Super Voyager VLB

AMI Super Voyager VLB II

AmPAQ Ultimate 466 VLB/S2

AMS TravelPro 5300

AMSYS UPG VLbus DX2-50 DT

Annabelle Bits ASI 486/33 Vesa Local Bus

AOX PS/2 80-081 w/Aox McMASTER48633

Applied Computer ACT 486/33 DX

Applied Computer ACT PENTIUM TOWER

Apricot FTe 486DX2/66

Apricot FTs 486DX2/66

Apricot XEN-LS II

Aquiline NT 466c System

Ares 486-33 VLB

Ariel 486DX2-66EVS

Ariel 486DX2-66VLS2

Asem DP 486/66 II

Asem DS 486/33 II

Asem ECO-PC 4/33

Asem ECO-PC 4/66

Asem MID-SERVER 4/33

Asem PROSERVER 5/60

ASL 433

Aspect 3/486 386DX-40 ISA

Aspect 3/486DX-33 ISA

Aspect 3/486DX-50 ISA

Aspect 3/486DX2-66 ISA

Aspect 486DX2-66 PCI

Aspect EISA 486DX-33

Aspect EISA 486DX-50

Aspect EISA 486DX2-66

Aspect ISA 486DX-33

Aspect ISA 486DX-50

Aspect ISA 486DX2-66

Aspect ISA 486SX-33

Aspect Pentium PCI 60

Aspect VESA 486DX-33

Aspect VESA 486DX-33F

Aspect VESA 486DX-50

Aspect VESA 486DX-50F

Aspect VESA 486DX2-66

Aspect VESA 486DX2-66F

Aspect VESA 486SX-33

Aspect VESA 486SX-33F

AST Advantage 486sx/33

AST Advantage!™ Plus 486DX/33

AST Advantage! Pro 486SX/25 Model 173

AST Advantage+ 4/50d

AST Bravo 3/25s Model 3V

AST Bravo LC 4/25s

AST Bravo LC 4/33

AST Bravo LC 4/33s

AST Bravo LC 4/50d

AST Bravo LC 4/66 SL

AST Bravo LC 4/66d

AST Bravo LP 4/25s

AST Bravo LP 4/33

AST Bravo LP 4/66d

AST Bravo MT 4/33

AST Bravo MT 4/66d

AST Bravo MT P60

AST Manhattan SMP P60 (1p)

AST Power Premium 4/33 EISA

AST Power Premium 4/50d

AST PowerExec 4/25SL

AST Premiere MTE P/60

AST Premium 386/33T

AST Premium II 386/33 Model 213V

AST Premium II 486/33

AST Premium SE 4/33 Model 333

AST Premium SE 4/50

AST Premium SE 4/50d

AST Premium SE 4/66d

AST Premium SE 486/33

AST Premium SE P/60

AST Premmia 4/33

AST Premmia 4/33SX

AST Premmia 4/66d

AST Premmia MTE 4/66d

AST Premmia SE 4/33

AST Premmia SE 4/66d

AST Premmia SE P60

AT&T 3372

AT&T 3372-C

AT&T 3374

AT&T 3406

AT&T 3416

AT&T Globalyst 200 486/50MHz

Athena ALM 486 DX 33

Athena ALM 486 DX 50

Athena ALM 486 DX 66

Athena HQ / ISA 486DLC 40

Athena HQ / ISA 486DX 33

Athena HQ / ISA 486DX 50

Athena HQ / ISA 486DX2 66

Athena HQ / VESA 486DX 33

Athena HQ / VESA 486DX2 50

Athena HQ / VESA 486DX2 66

Austin 486/50 EISA Tower PATRIOT

Austin 486/50 VESA-LB PATRIOT

Austin 486/50 VESA-LB PATRIOT PLUS

Austin 486DLC

Austin 486DX/33 EISA Tower PATRIOT

Austin 486DX/33 VESA-LB PATRIOT

Austin 486DX/33 VESA-LB PATRIOT PLUS

Austin 486DX2/50 EISA Tower PATRIOT

Austin 486DX2/66 EISA Tower PATRIOT

Austin 486DX2/66 VESA-LB PATRIOT PLUS

Austin Winstation 486DX2/66

Axik Ace Cache 486DX-33V

Axik Ace Cache 486DX-33VG

Axik Ace Cache 486DX2-50VG

Axik Ace Cache 486DX2-66V

Axik Ace Cache 486DX2-66VG

Axik Ace Cache 486SX-33VG

Aztech TRACER SERIES 386DX/40

Aztech TRACER SERIES 486DX/33

Aztech TRACER SERIES 486DX2/66

Bear 486/50 Desktop

Brett ExecEISA

Brett Executive

Brett Executive PCI Pentium

Brett Pro PCI

Brett Pro VLB

Brett Station NTe EISA

BROTHER BCR4486DX2

BROTHER BCR5486DX2

BROTHER BCR7486DX2

BROTHER BCR8486DX2

C&S Computer E III 486/VLB

C. THIIM  486DX33

CAF CT-02 L737/486DX-33

Caliber 3/486 386DX-40 ISA

Caliber 3/486DX-33 ISA

Caliber 3/486DX-50 ISA

Caliber 3/486DX2-66 ISA

Caliber 486DX2-66 PCI

Caliber EISA 486DX-33

Caliber EISA 486DX-50

Caliber EISA 486DX2-66

Caliber ISA 486DX-33

Caliber ISA 486DX-50

Caliber ISA 486DX2-66

Caliber ISA 486SX-33

Caliber Pentium 60 PCI

Caliber VESA 486DX-33

Caliber VESA 486DX-33F

Caliber VESA 486DX-50

Caliber VESA 486DX-50F

Caliber VESA 486DX2-66

Caliber VESA 486DX2-66F

Caliber VESA 486SX-33

Caliber VESA 486SX-33F

CELEM 486DX/33 C (ISA)

CELEM 486DX/33 VL (VESA)

CELEM 486DX/50  VL (VESA)

CELEM 486DX/50 MC  (EISA)

CELEM 486DX2/66 DC (EISA+VESA)

CELEM 586/60 (PCI+ISA)

CENSUS 4D266S DT (incl. MT, IT, FT Models)

CENSUS 4D33S DT (incl. MT, IT, FT Models)

CENSUS 4D40S DT (incl. MT, IT, FT Models)

CENSUS 4D50S DT (incl. MT, IT, FT Models)

CENSUS 4S25S DT (incl. MT, IT, FT Models)

CENSUS 4S33S DT (incl. MT, IT, FT Models)

Centis Profi 433-1G

Centis Profi Lite 433-G25

Chaplet HALIKAN NBD-486T/25M

Chicony Electronics 486 33P

Chicony Electronics Subnote 486SX/25

Cinet ET-100

Cinet EVL Series 486DX2/66

Cinet FSE-100

Cinet HI Series 486DX2/66

Cinet HI-100

Cinet LS-100

Cinet MP-100

Cinet PPI-100

Cinet VL Series 486DX2/66

Cinet VL-100

Cinet VLG-100

Clone 9433

Colfax P1-486 EISA/VLB

Comark CAT486-33/VL

Comark CAT486-66/VL

Comark flex 486

Comark Pentium VL60 - SCSI

Comark Pentium-60/VL

Comark Pentium-VL-60 Rackmount

Comark PENTIUM-VL66-SCSI

Commodore® 486DX-33C

Commodore 486SLC-25

Commodore 486SX-25

Commodore DT 486SX-20

Commodore LB 486DX-33C

Commodore LB 486DX2-66C

Commodore LB 486SX-33C

Commodore LB T486DX2-66C

Commodore T486DX-50C

COMPAQ Concerto 4/25

COMPAQ Contura 4/25C

COMPAQ Deskpro 386/25®

COMPAQ Deskpro 386/25e

COMPAQ Deskpro 386/33

COMPAQ Deskpro 386/33L

COMPAQ Deskpro 4/66i

COMPAQ Deskpro 486/25

COMPAQ Deskpro 486/25i

COMPAQ Deskpro 486/33i

COMPAQ Deskpro 486/33L

COMPAQ Deskpro 486/33M

COMPAQ Deskpro 486/50L

COMPAQ Deskpro 486/50M

COMPAQ Deskpro 5/60M

COMPAQ Deskpro 5/66M

COMPAQ Deskpro 66M

COMPAQ Deskpro XE 4/50

COMPAQ Deskpro XE 4/66

COMPAQ Deskpro XE 4100

COMPAQ Deskpro XE 433s

COMPAQ Deskpro XE 560

COMPAQ Deskpro XL 566 15

COMPAQ LTE Elite 4/75CX

COMPAQ LTE Lite 4/25

COMPAQ LTE Lite 4/25C

COMPAQ LTE Lite 4/33C

COMPAQ Portable 486c

COMPAQ Portable 486C/66

COMPAQ Presario 425

COMPAQ Presario CDS 520

COMPAQ Presario CDS 633

COMPAQ ProLiant 1000 486DX2/66

COMPAQ ProLiant 1000 Model 5/60

COMPAQ ProLiant 1000R Model 486DX2/66

COMPAQ ProLinea 3/25s

COMPAQ ProLinea 4/50

COMPAQ ProLinea 4/66

COMPAQ ProLinea CDS 200

COMPAQ ProLinea MT 4/33s

COMPAQ ProSignia 486DX/33

COMPAQ ProSignia 486DX2/66

COMPAQ ProSignia 5/60

COMPAQ ProSignia VS 486DX/33

COMPAQ ProSignia VS 486DX2/66

COMPAQ ProSignia VS 486SX/33

COMPAQ Systempro/LT 386/25

COMPAQ Systempro/LT 486DX2/50

COMPAQ Systempro/LT 486DX2/66

COMPAQ Systempro/LT 486DX33

COMPAQ Systempro/LT 486SX/25

COMPAQ Systempro/LT 486SX33

Comper DC486-662V

CompuAdd 420s

CompuAdd 433

CompuAdd 433 ELB

CompuAdd 433 LB

CompuAdd 433 LP

CompuAdd 433DLC LP

CompuAdd 433E

CompuAdd 450

CompuAdd 450DX2 LP

CompuAdd 466/DX2

CompuAdd 466DX2 LB

CompuAdd 466DX2E LB

CompuAdd 486-33DLC

COMPUCON 386DX/40

COMPUCON 486DX/33

COMPUCON 486DX/33 ISA/VL

COMPUCON 486DX/50

COMPUCON 486DX/50 EV

COMPUCON 486DX/50 VL

COMPUCON 486DX2-66

COMPUCON 486DX2/66 EV

COMPUCON PCI/I486SP3

COMPUCON PCI/IP-60

Compudyne 4DX2/50 EISA16340 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX2/50 VLB16340 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX2/66 EISA16245 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX2/66 Slimnote

Compudyne 4DX2/66 VLB16245 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX33 EISA16245 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX33 VLB16245 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX50 EISA16340 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne 4DX50 VLB16340 DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX2/50 2VLB DIP DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX2/50 2VLB SMT DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX2/66 2VLB DIP DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX2/66 2VLB SMT DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX33 2VLB DIP DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX33 2VLB SMT DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX50 2VLB DIP DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO DX50 2VLB SMT DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO SX25 2VLB DIP DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO SX25 2VLB SMT DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO SX33 2VLB DIP DESKTOP (incl. MINITOWER and SERVERTOWER)

Compudyne UM486V AIO SX33 2VLB SMT DESKTOP (incl. MINITOWER and SERVERTOWER)

CompuPartner 4D250

CompuPartner 4D33

CompuPartner 4DV266

Computer Extension CESI 486 66

Computer Resources 486DX266 ISA

Computer Resources 486DX33 FULL TOWER

Computer Resources 486DX33 LOCAL BUS

Computer Resources 486DX50 EISA

Computer Sales Prof. 486DX/33 VL

Computer Sales Prof. 486DX2/50 VL

Computer Sales Prof. 486DX2/66 EISA/VL

Computer Sales Prof. 486DX2/66 VL

Computer Sales Prof. 486SX/25 VL

Computer Sonics CSI EISA/VL 486

Computer Sonics CSI ISA 486/33

Computer Sonics CSI VL/ISA 486

Computer Systems Resources P5/60MHZ PCI

Computrend PREMIO 486DX-33

Computrend PREMIO 486DX-50

Computrend PREMIO 486DX2-66

Comtrade EISA GigaByte Ultima 486DX2-66

Cornell Computer Systems HOME OFFICE PAK 486/33 VLB

Cornell Computer Systems Opti 486/66 VLB

Cornell Computer Systems Tyan 486/33 EISA-VLB

Cornell Computer Systems Tyan 66/EISA

Cornell Computer Systems VALUE PAK 486/33 VLB

Cornell Computer Systems VALUE PAK 486/66 VLB

Cornell Computer Systems Vega™ 33/VLB

Cornell Computer Systems Win NT Pak

CPU Sir Henry NT

Crescent 486-33VL

Crescent 486-66VL

CSS Labs MaxSys 433MTA

CSS Labs MaxSys 433MTMGE

CSS Labs MaxSys 433TA

CSS Labs MaxSys 433TMGE

CSS Labs MaxSys 450MTMGE

CSS Labs MaxSys 450TMGE

CSS Labs MaxSys 452MTMGE

CSS Labs MaxSys 452TMGE

CSS Labs MaxSys 462MTA

CSS Labs MaxSys 462MTE

CSS Labs MaxSys 462MTMGE

CSS Labs MaxSys 462TA

CSS Labs MaxSys 462TE

CSS Labs MaxSys 462TMGE

CSS Labs Preferred 433GA

CSS Labs Preferred 433GE

CSS Labs Preferred 433MGE

CSS Labs Preferred 450MGE

CSS Labs Preferred 452MGE

CSS Labs Preferred 462GA

CSS Labs Preferred 462GE

CSS Labs Preferred 462MGE

CTM Fontek 486DX-33 VL

CTM Fontek 486DX2-50 VL

CTM Fontek 486DX2-66 VL

CTM Polaris 486DX-33 VESA

CTM Polaris 486DX2-50 VESA

CTM Polaris 486DX2-66 VESA

CTM Pronic 486DX-33 VESA

CTM Pronic 486DX2-50 VESA

CTM Pronic 486DX2-66 VESA

Cube 340 ATX

Cube 433 ATX

Cube 450 ATX

Cube 466 ATX

Cube 466 ATX Local Bus

Cube 486/40

CyberStar Alliance DX2/50

CyberStar FilePro 1000

CyberStar FilePro 2000

CyberStar FilePro 2000 5/60

Cyclone NT SERVER

Daewoo 486 PCI SYSTEM (DX2-66)

Daewoo 486 VESA GREEN SYSTEM (DX2-50)

Daewoo 486 VESA GREEN SYSTEM (SX-25)

Daewoo 486 VESA GREEN SYSTEM (SX-33)

Daewoo 486 VESA System/2700(33)

Daewoo 486 VESA System/2900(33)

Daewoo Modular Desktop/2300

Daewoo Modular Mini Tower/2400

Daewoo VESA PENTIUM(60)

DAN for Windows 25

DAN for Windows 33

DAN for Windows 50

DAN for Windows 66

DAN Vantage/25

DAN Vantage/33

DAN Vantage/50

DAN Vantage/66

Danjen 486DLC 33 MHz

Danjen 486DX 33 MHz Local Bus

Danjen 486DX 50 MHz EISA

Danjen 486DX 50 MHz ISA

Dassault AT CUSTOMER ACTIVATED TERMINAL D633

Data General P60/TE2 Pentium Tower

Data Stor 386-33DX Desktop/Tower

Data Stor 386-33SX Desktop/Tower

Data Stor 486-25SX Desktop/Tower 107

Data Stor 486-33 PCI

Data Stor 486-33DX Desktop/Tower 107

Data Stor 486-33SX Desktop/Tower 107

Data Stor 486-50DX Desktop/Tower 107

Data Stor 486-66DX2 Desktop/Tower 107

Data Stor 486-66DX2E Desktop/Tower

Data Stor Pentium VL-60

Data Stor Pentium-60 PCI

DataExpert Model 486DX/2i-PCI

DataExpert Model 486DX/2i-VL

DataExpert Model 486DXe-VL66

DataExpert Model 486DXi-VL33

DATAFILEN PROFF 386DX-40

DATAFILEN PROFF 486DX-33 VL

DATAFILEN PROFF 486DX2-66 VL

Datavarehuset BRICK 486DX-33 EISA

Datavarehuset BRICK 486DX2-50 Local Bus

Datavarehuset BRICK 486DX2-66 Local Bus

Datavarehuset BRICK 9003 486DX-33

Datavarehuset BRICK 9003 486DX2-50

Datavarehuset BRICK 9003 4DXV

DDK Soft DDK-4066/2LV

Debis DCS Minitower 486 EISA

Debis DCS Tower 486 MC

Debis DCS Tower 486 MP EISA

Deico 486DLC

Deico Predator III

DELL 325 N Notebook

DELL 325 NC Notebook

DELL 4033/XE

DELL 4050/XE

DELL 4066/XE

DELL 425s/L

DELL 433/L

DELL 433/M

DELL 433/ME

DELL 433/T

DELL 450/M

DELL 450s/L

DELL 4560/XE

DELL 466/M

DELL 466/ME

DELL Dimension 466/T

DELL Dimension 486DX/33

DELL Dimension 486DX/50

DELL Dimension 486DX2/50s

DELL Dimension 486SX/25

DELL Dimension XPS P60

DELL OmniPlex 560

DELL OmniPlex 566

DELL OptiPlex 425s/MXV

DELL OptiPlex 433/MXV

DELL OptiPlex 433s/MXV

DELL OptiPlex 450/MXV

DELL OptiPlex 466/MXV

DELL PowerLine 466DE

DELL PowerLine 466SE

DELL PowerLine System 325

DELL PowerLine System 433DE

DELL PowerLine System 433E

DELL PowerLine System 433SE

DELL PowerLine System 450/T

DELL PowerLine System 450DE

DELL PowerLine System 450DE/2 DGX

DELL PowerLine System 450SE

DELL PowerLine System 486D/33

DELL PowerLine System 486D/50

DELL PowerLine System 486P/25

DELL PowerLine System 486P/33

Delphi Olympus

Delta Micro Systems Gold Line 4D33V

Delta Micro Systems Gold Line 4D50C

DELTACOM 486-33

DELTACOM 486-50

DELTACOM 486SX-25

DELTACOM EISA 486-50

DELTACOM VESA 486DX2-66

Destiny Blitz 486SLC 33

DFI CCV 486DX-33

DFI CCV 486DX2-50

DFI CCV 486DX2-66

DFI CCV 486SX-25

DFI D486P-PRO

DFI P9800T 108

DFI TN 486DX-33

DFI TN 486DX2-50

DFI TN 486DX2-66

DFI TN 486SX-25

DFI UCE 486DX-33

DFI UCE 486DX-50

DFI UCE 486DX2-50

DFI UCE 486DX2-66

DFI UCE 486SX-25

DFI UCF 486DX-33

DFI UCF 486DX-50

DFI UCF 486DX2-50

DFI UCF 486DX2-66

DFI UCF 486SX-25

Diamond DT 486DX Versa (AMD DX/40)

Diamond DT 486DX Versa (DX2/66)

Digital Equipment Corp. application DEC 400xP

Digital Equipment Corp. Celebris 4100

Digital Equipment Corp. Celebris 466

Digital Equipment Corp. Celebris 560

Digital Equipment Corp. Celebris 590

Digital Equipment Corp. Celebris FP 590

Digital Equipment Corp. DECpc 333

Digital Equipment Corp. DECpc 425

Digital Equipment Corp. DECpc 425 SE Notebook

Digital Equipment Corp. DECpc 425 ST

Digital Equipment Corp. DECpc 425i

Digital Equipment Corp. DECpc 425i DX2

Digital Equipment Corp. DECpc 433

Digital Equipment Corp. DECpc 433 SE

Digital Equipment Corp. DECpc 433 ST

Digital Equipment Corp. DECpc 433 Workstation

Digital Equipment Corp. DECpc 433dx DT

Digital Equipment Corp. DECpc 433dx LP

Digital Equipment Corp. DECpc 433dx MT

Digital Equipment Corp. DECpc 433dx MTE

Digital Equipment Corp. DECpc 433sx DT

Digital Equipment Corp. DECpc 433T

Digital Equipment Corp. DECpc 450 ST

Digital Equipment Corp. DECpc 450d2 LP

Digital Equipment Corp. DECpc 450d2 MT

Digital Equipment Corp. DECpc 452 ST

Digital Equipment Corp. DECpc 466 ST

Digital Equipment Corp. DECpc 466d2 DT

Digital Equipment Corp. DECpc 466d2 LP

Digital Equipment Corp. DECpc 466d2 LPx

Digital Equipment Corp. DECpc 466d2 MT

Digital Equipment Corp. DECpc 466d2 MTE

Digital Equipment Corp. DECpc 560 ST

Digital Equipment Corp. DECpc LPv 425sx

Digital Equipment Corp. DECpc LPv 433dx

Digital Equipment Corp. DECpc LPv 433sx

Digital Equipment Corp. DECpc LPv 450d2

Digital Equipment Corp. DECpc LPv 466d2

Digital Equipment Corp. DECpc LPv+ 4100

Digital Equipment Corp. DECpc LPv+ 433dx

Digital Equipment Corp. DECpc LPv+ 433sx

Digital Equipment Corp. DECpc LPv+ 450d2

Digital Equipment Corp. DECpc LPv+ 450s2

Digital Equipment Corp. DECpc LPv+ 466d2

Digital Equipment Corp. DECpc LPx 433dx

Digital Equipment Corp. DECpc LPx 433sx

Digital Equipment Corp. DECpc LPx 450d2

Digital Equipment Corp. DECpc LPx 560

Digital Equipment Corp. DECpc LPx 566

Digital Equipment Corp. DECpc LPx+ 433dx

Digital Equipment Corp. DECpc LPx+ 433sx

Digital Equipment Corp. DECpc LPx+ 450d2

Digital Equipment Corp. DECpc LPx+ 466d2

Digital Equipment Corp. DECpc MTE 4100

Digital Equipment Corp. DECpc XL 4100

Digital Equipment Corp. DECpc XL 433

Digital Equipment Corp. DECpc XL 466d2

Digital Equipment Corp. DECpc XL 560

Digital Equipment Corp. DECpc XL 566

Digital Equipment Corp. DECpc XL 590

Digital Equipment Corp. DECpc XL Server 466d2

Digital Equipment Corp. DECpc XL Server 560

Digital Equipment Corp. DECpc XL Server 566

Digital Equipment Corp. DECstation 425c

Dolch C.P.A.C. 486-33C

Dolch C.P.A.C. 486-33E

Dolch C.P.A.C. 486-50 EISA

Dolch C.P.A.C. 486-66C

Dolch C.P.A.C. 486-66E

Dolch M.A.C.H. 486-33

Dolch M.A.C.H. 486-66

Dolch V.P.A.C. 486-33C

Dolch V.P.A.C. 486-33E

Dolch V.P.A.C. 486-66C

Dolch V.P.A.C. 486-66E

DTK 486VL

DTK FEAT03-D33

DTK FEAT03-D40

DTK FEAT03-D50

DTK FEAT03-T66

DTK FEAT04-D33

DTK FEAT33-D33

DTK FEAT33-D40

DTK FEAT33-D50

DTK FEAT33-T66

DTK FEAT34-D33

DTK FEAT34-D40

DTK FEAT34-D50

DTK FEAT34-T66

DTK FEAT35-D33

DTK FEAT36-D33

DTK FEAT5030-D33

DTK FEAT5030-D50

DTK FEAT5030-T66

DTK FEAT5031-D33

DTK FEAT5031-D50

DTK FEAT5031-T66

DTK FEAT62-D33

DTK FEAT62-T66

DTK Grafika 4A

DTK Grafika 4C

DTK Grafika 4D

DTK Grafika 4E

DTK Grafika 4F

DTK Grafika 4G

DTK Grafika 4I

DTK Grafika 4J

DTK Grafika 4V2D-D3

DTK Grafika 4V2D-T6

DTK Grafika 4V2T-D3

DTK Grafika 4V2T-T6

DTK Grafika 5V1T-60

DTK Grafika 5VID-60

DTK PENT-01 (incl. -31, -32 Models)

DTK SPAN0030

DTK SPAN01-D33

DTK SPAN01-D50

DTK SPAN01-T66

DTK SPAN3330

DTK SPAN5030

Duracom 486/25SX-CCV

Duracom 486/25SX-TN

Duracom 486/25SX-UCF

Duracom 486/33-CCV

Duracom 486/33-TN

Duracom 486/33-UCF

Duracom 486/50DX-UCF

Duracom 486/50DX2-CCV

Duracom 486/50DX2-TN

Duracom 486/50DX2-UCF

Duracom 486/66DX2-CCV

Duracom 486/66DX2-TN

Duracom 486/66DX2-UCF

Dyna Micro ASUS 486DX/33 PCI/ISA

Dynamic Decisions DYNEX EXEC-50 EISA

Dynamic Decisions DYNEX EXECUTIVE ISA-486-33 SV2G

Dynamic Decisions EXECUTIVE 486-33 ISA

Dynamic Decisions EXECUTIVE 486-33 ISA/PCI

Dynamic Decisions EXECUTIVE 486-33 VL/EISA

Dynamic Decisions EXECUTIVE 486-33 VL/ISA

Dynamic Decisions EXECUTIVE 486-33SX

Dynamic Decisions EXECUTIVE 486-50 VL/EISA

Dynamic Decisions EXECUTIVE 486-66 DX2 VL/ISA

Dynamic Decisions EXECUTIVE 486-66 VL/EISA

Dynamic Decisions EXECUTIVE ISA-486-33 SV2

Dynamic Decisions EXECUTIVE ISA-486-50 SV2

Dynamic Decisions EXECUTIVE ISA-486-66D2 SV2

Dynamic Decisions EXECUTIVE P5-60 PENTIUM-PCI/ISA

Dynamic Decisions PROFESSIONAL 486-33 VL/ISA

Dynamic Decisions PROFESSIONAL 486-33DX VL/EISA E3

Dynamic Decisions PROFESSIONAL 486-33DX VL/EISA E4

Dynamic Decisions PROFESSIONAL 486-50DX VL/EISA E4

Dynamic Decisions PROFESSIONAL 486DX66 EISA VLB E

ECE DATA i486/VLB

ECG Unitron 340

ECG Unitron 425

ECG Unitron 433

ECG Unitron 450

ECG Unitron 450 DX/2

ECG Unitron 466 DX/2

ECG Unitron 466 DX/2 EISA

Elite Industries MB-1433AEA-V 486/33

Elite Industries MB-1433AEA-V 486/50

Elite Industries MB-1433AEA-V 486DX2/66

Elitegroup UC4917-G

Elitegroup UM4910

Elitegroup VL486

Elonex PC-400 Series Computer

Eltech Model 4660VB

Epson Action PC 1500

Epson ActionDesk 4000 (4DX2/66-LB)

Epson ActionDesk 4000+

Epson ActionPC 1500

Epson ActionPC 2000

Epson ActionPower 5000

Epson EL 486UC+

Epson EL 4S/33+

Epson Endeavor 486L

Epson Endeavor P60

Epson Endeavor VL66

Epson Endeavor WG 4DX2/50

Epson Endeavor WG 4DX2/66

Epson Endeavor WG 4SX33

Epson Equity 4DX/33

Epson Equity 4DX2/50

Epson Equity 4SX/25

Epson PowerSpan 486DX2/66

Epson Progression 486DX/33

Epson Progression 486DX2/66

Epson Progression 486SX/25

Epson Progression 4DX2/50

Epson Progression 4SX/33

Ergo Ultra Moby Brick 486/66

ERIDAN Onyx DE433

Erre 486DX2-66 VLB

EverCom ISA 486SR/33

EverCom VL 486SV2/66

Everex Cube DX/33

Everex Step 486/33 ISA

Everex Step DP

Everex Step Plus DX 33

Everex Step Plus DX/2 50

Everex Step Plus DX/2 66

Everex Step UP-60

Everex Step VL EISA 486DX2/50

Everex Step VL EISA 486DX2/66

Everex Step VL ISA 486DX2/50

Everex Step VL ISA 486DX2/66

Everex Tempo 486/33

Everex Tempo 486/33E

Everex Tempo 486DX2/50

Everex Tempo 486SX/25

Everex Tempo VL EISA DX/2 50

Everex Tempo VL EISA DX/2 66

Everex Tempo VL EISA DX/33

Everex Tempo VL ISA DX/2 50

Everex Tempo VL ISA DX/2 66

Everex Tempo VL ISA DX/33

Evergreen Systems CAPcard 425e

Evesham Micros VALE™ PREMIER + 486DX2-66

Evesham Micros VALE PREMIER 486DX2-66

Evesham Micros VALE PRESTIGE 486DX2-66

Expo-Tech 386 Ultra Slim

Expo-Tech 486DX/3 Desktop

Expo-Tech 486DX/3 Desktop (w/LBVGA)

Expo-Tech 486DX/3 Desktop (w/VLBUS)

Expo-Tech 486DX/3 Mini (w/VLBUS)

Expo-Tech 486DX/3 Tower

Expo-Tech 486DX/3 Tower (w/VLBUS)

Expo-Tech 486DX2/4 Desktop

Expo-Tech 486DX2/4 Desktop (w/LBVGA)

Expo-Tech 486DX2/4 Desktop (w/VLBUS)

Expo-Tech 486DX2/4 Tower

Expo-Tech 486DX2/4 Tower (w/VLBUS)

Expo-Tech 486DX2/6 Desktop

Expo-Tech 486DX2/6 Desktop (w/LBVGA)

Expo-Tech 486DX2/6 Desktop (w/VLBUS)

Expo-Tech 486DX2/6 Mini (w/VLBUS)

Expo-Tech 486DX2/6 Tower

Expo-Tech 486DX2/6 Tower (w/VLBUS)

Expo-Tech 486SX/3 Desktop

Expo-Tech 486SX/3 Desktop (w/LBVGA)

Expo-Tech 486SX/3 Tower

Expo-Tech 486SX/3 Ultra Slim

Expo-Tech 486SX/3 Ultra Slim (w/LBVGA)

Expo-Tech 486SX/4 Desktop

Expo-Tech 486SX/4 Desktop (w/LBVGA)

Expo-Tech 486SX/4 Desktop (w/VLBUS)

Expo-Tech 486SX/4 Mini (w/VLBUS)

Expo-Tech 486SX/4 Tower

Expo-Tech 486SX/4 Ultra Slim

Expo-Tech 486SX/4 Ultra Slim (w/LBVGA)

Expo-Tech LT322 Notebook

Expo-Tech LT421 Notebook

Expo-Tech SMP DX2-66

Express Micro EISA VESA 486DX-50

Express Micro EISA VESA 486DX2-66

Express Micro VL-BUS 486DX-50

Express Micro VL-BUS 486DX2-66

Fast 486DY66S520

Federal Technologies GuardianSM WinMaster 486/33SX

First Jupiter 486DX66 All In One ISA Bus

First Krypton 486DX50 VL-Bus

First LEO 4386VCV DX33

First LEO 486DX66-VL

First LEO 486VC DX/50

First LEO 486VC DX2/66

First LEO DESKTOP 486/33

First LEO DESKTOP 486/50

First LEO DESKTOP 486/66

First LEO MINITOWER 486/33

First LEO MINITOWER 486/50

First LEO MINITOWER 486/66

First President Pak 486DX2/66 VLB

First Venus 486DX2/66 EISA and VL-Bus

First Venus 486DX2/66 VL-Bus

Fountain Technology 486DX/33 VL

Fountain Technology 486DX2/50 VL

Fountain Technology 486DX2/66 EISA/VL

Fountain Technology 486DX2/66 VL

Fountain Technology 486SX/25 VL

Free 586F34X-PCI

Free VESA23X50

Fujitech 486DX/50 E

Fujitech 486DX2/50-VL

Fujitsu S-400

Fujitsu S-466

Fujitsu S-500

Fujitsu S-5000MP

FUTURE COMPUTERS 486 Eisa/Vesa NTPC

FutureTech 486DX2-66 VLB

Gain TITON WORKSTATION

Gateway 2000 386/33

Gateway 2000 486/33C

Gateway 2000 486/33E

Gateway 2000 486DX2/50

Gateway 2000 486DX2/50E

Gateway 2000 486DX2/50V

Gateway 2000 486DX2/66V Desktop

Gateway 2000 4DX/33

Gateway 2000 4DX2-66P

Gateway 2000 4DX2/66E

Gateway 2000 4SX/25

Gateway 2000 4SX/33V

Gateway 2000 Color Book

Gateway 2000 Nomad 425DXL 10

Gateway 2000 Nomad 450DXL 10

Gateway 2000 P5-60

GCH AEGIS 433

GCH AEGIS 466

GCH EasyData 433HI

GCH EasyData 466HI

GCH EasyDate 466HI VL

GCH EiSYS Ei433DX

GCH EiSYS Ei466DX

GCH EiSYS Ei600 Series

Genitech Capricorn JF/33

Genitech Capricorn JF2/66

Genitech Capricorn KF33 PCI

GES DATAMINI MF 486DX-33

GES DATAMINI MF 486DX2-66

GES DATAMINI MF 486SX-25

Getek 486 DX 50 LOCAL BUS

GMX EISAMB 486DX2/66

GoldStar 425SXE

GoldStar GS425SX

GoldStar GS466DX

GoldStar GS466DXE

GRiD 486ei-25 SVR

GRiD 486ei-33

GRiD APT/425se

GRiD APT/450e

GRiD MFP 425s+

GRiD MFP 433+

GRiD MFP 433s+

GRiD MFP 450+

GRiD MFP 466+

GRiD MFP/420s

GRiD MFP/425s

GRiD MFP/450

GRiD MFP/540

GVH 486DX2 66 Vesa Bus

H.D.Microsystèmes AX7 486 DX-33

H.D.Microsystèmes AX7 486 DX-50

H.D.Microsystèmes AX7 486 DX2-50

H.D.Microsystèmes AX7 486 DX2-66

H.D.Microsystèmes AX7 Pentium 60 PCI

Hancke & Peter 386w Professional

Hancke & Peter 486/33w Professional

Hancke & Peter 486/50w Professional

Hancke & Peter 486/66w Professional

Hancke & Peter 486w EISA Professional

Harris Epoch 486/33 VESA

Harris Epoch 486/50 EISA

Harris Epoch 486/50 ISA

Hauppauge 4860 EISA DX2-66

Hauppauge 486M Local Bus DX2-66

Hertz 486/D50e

Hertz 486/D50Ee

Hertz 486/D66X2e

Hertz 486/D66X2Ee

Hewitt Rand 486DX-33 3VL

Hewitt Rand HR486DX-33Ce VESA

Hewitt Rand PENTIUM/60

Hewlett-Packard NetServer 4/100 LC

Hewlett-Packard NetServer 4/100 LF

Hewlett-Packard NetServer 4/33 LE

Hewlett-Packard NetServer 4/33 LM

Hewlett-Packard NetServer 4/66 LC

Hewlett-Packard NetServer 4/66 LF

Hewlett-Packard NetServer 4d/66 LE

Hewlett-Packard NetServer 4d/66 LM

Hewlett-Packard NetServer 4s/33 LE

Hewlett-Packard NetServer 5/100 LM

Hewlett-Packard NetServer 5/60 LM

Hewlett-Packard NetServer 5/66 LC

Hewlett-Packard NetServer 5/66 LF

Hewlett-Packard NetServer 5/66 LM

Hewlett-Packard NetServer 5/90 LM

Hewlett-Packard Vectra 386/25

Hewlett-Packard Vectra 386/33N

Hewlett-Packard Vectra 386/33NI

Hewlett-Packard Vectra 486/25M

Hewlett-Packard Vectra 486/25N

Hewlett-Packard Vectra 486/25NI

Hewlett-Packard Vectra 486/25T

Hewlett-Packard Vectra 486/25U

Hewlett-Packard Vectra 486/33M

Hewlett-Packard Vectra 486/33N

Hewlett-Packard Vectra 486/33NI

Hewlett-Packard Vectra 486/33ST

Hewlett-Packard Vectra 486/33T

Hewlett-Packard Vectra 486/33U

Hewlett-Packard Vectra 486/33XM

Hewlett-Packard Vectra 486/50U

Hewlett-Packard Vectra 486/50XM

Hewlett-Packard Vectra 486/66 XM

Hewlett-Packard Vectra 486/66N

Hewlett-Packard Vectra 486/66ST

Hewlett-Packard Vectra 486/66U

Hewlett-Packard Vectra 486S/20

Hewlett-Packard Vectra 486s/25 MI

Hewlett-Packard Vectra 486s/33M

Hewlett-Packard Vectra 486s/33N

Hewlett-Packard Vectra 486s/33NI

Hewlett-Packard Vectra 486s/33XM

Hewlett-Packard Vectra RS/25C

Hewlett-Packard Vectra XP/60 PC

High Tech USA 486DX266 VLB SYSTEM

High Tech USA 486DX33 VLB SYSTEM

HM Systems Minstrel XPentium

HM Systems Minstrel XPentium Server

HM Systems Minstrel Xpresso 486

HM Systems Minstrel Xpresso XL

Hyundai 425s

Hyundai 433DDV

Hyundai 466d2

Hyundai Prestige 433d

IBM Eduquest™ Model 50 486DX/33 (9605-040)

IBM PC Server 486DX2/66 8640-0N*

IBM PC Server Pentium/60 8640-0P*

IBM PS/1 2133-XXX  486SX2/33MHz

IBM PS/1 2133-xxx 486SX/25

IBM PS/1 2133-xxx 486SX/33

IBM PS/1 2133A-xxx 486DX/33 109

IBM PS/1 2133A-xxx 486DX2/66 109

IBM PS/1 2133A-xxx 486SX/25 109

IBM PS/1 2133A-xxx 486SX/33 109

IBM PS/1 2155-87C (SL-B)

IBM PS/1 2155-xxx 486DX/33

IBM PS/1 2155-xxx 486DX2/50

IBM PS/1 2155-xxx 486DX2/66

IBM PS/1 2155-xxx 486SX/25

IBM PS/1 2155-xxx 486SX/33

IBM PS/1 2155A-xxx 486DX2/66 109

IBM PS/1 2155A-xxx 486SX/25 109

IBM PS/1 2155A-xxx 486SX/33 109

IBM PS/1 2155C-XX

IBM PS/1 2168-xxx 486DX/33

IBM PS/1 2168-xxx 486DX2/50

IBM PS/1 2168-xxx 486DX2/66

IBM PS/1 2168-XXX 486DX2/66MHz

IBM PS/1 2168-xxx 486SX/25

IBM PS/1 2168-xxx 486SX/33

IBM PS/1 2168A-xxx 486DX2/66 109

IBM PS/1 2168A-xxx 486SX/25 109

IBM PS/1 2168A-xxx 486SX/33 109

IBM PS/1 486DX33 - 2133-XX

IBM PS/1 Consultant 486SX/25 2133B-xxx

IBM PS/1 Consultant 486SX/33 2133B-xxx

IBM PS/1 Consultant 486SX/33 2155B-xxx

IBM PS/2 56 486SLC3-xxx

IBM PS/2 56LS 486SLC3-xxx

IBM PS/2 57 486SLC3-xxx

IBM PS/2 M57 486SLC3-xxx

IBM PS/2 Model 50/50Z System Board Upgrade 486SLC2/50 110

IBM PS/2 Model 53 9553-xxx 486SLC2/50 111

IBM PS/2 Model 55/55SX System Board Upgrade 486SX/25 110

IBM PS/2 Model 56 8556-xxx 486SLC/20

IBM PS/2 Model 56 9556-xxx 486SLC2/50

IBM PS/2 Model 57 8557-xxx 486SLC/20

IBM PS/2 Model 57 9557-xxx 486SLC2/50

IBM PS/2 Model 60/80 System Board Upgrade 486DX/33 110

IBM PS/2 Model 70 8570-xxx 386DX/25

IBM PS/2 Model 70 8570-xxx 486DX/25

IBM PS/2 Model 70 System Board Upgrade 486DX/33 110

IBM PS/2 Model 76 9576-xxx 486DX2/66

IBM PS/2 Model 76 9576-xxx 486SX/33

IBM PS/2 Model 76i 9576-xxx 486DX2/50 111

IBM PS/2 Model 76s 9576-xxx 486DX2/50 111

IBM PS/2 Model 77 9577-xxx 486DX2/66

IBM PS/2 Model 77 9577-xxx 486SX/33

IBM PS/2 Model 77i 9577-xxx 486DX2/50 111

IBM PS/2 Model 77s 9577-xxx 486DX2/50 111

IBM PS/2 Model 80 8580-xxx 386DX/25

IBM PS/2 Model 90 XP 486 8590-0H* 486SX/25

IBM PS/2 Model 90 XP 486 8590-0J* 486DX/25

IBM PS/2 Model 90 XP 486 8590-0K* 486DX/33

IBM PS/2 Model 90 XP 486 8590-0L* 486DX2/50

IBM PS/2 Model 90 XP 486 8590-xxx with 486DX2/66 processor upgrade

IBM PS/2 Model 90 XP 486 8590-xxx with Enhanced 486DX/50 processor upgrade

IBM PS/2 Model 90 XP 486 8590-xxx with Enhanced 486DX2/66 processor upgrade

IBM PS/2 Model 90 XP 486 8590-xxx with processor upgrade with Pentium Technology

IBM PS/2 Model 90 XP 486 9590-0L* 486DX2/50

IBM PS/2 Model 90 XP 486 9590-xxx with 486DX2/66 processor upgrade

IBM PS/2 Model 90 XP 486 9590-xxx with Enhanced 486DX/50 processor upgrade

IBM PS/2 Model 90 XP 486 9590-xxx with Enhanced 486DX2/66 processor upgrade

IBM PS/2 Model 90 XP 486 9590-xxx with processor upgrade with Pentium Technology

IBM PS/2 Model 95 XP 486 8595-0H* 486SX/25

IBM PS/2 Model 95 XP 486 8595-0J* 486DX/25

IBM PS/2 Model 95 XP 486 8595-0K* 486DX/33

IBM PS/2 Model 95 XP 486 8595-0L* 486DX2/50

IBM PS/2 Model 95 XP 486 8595-0M* 486DX/50

IBM PS/2 Model 95 XP 486 8595-xxx with 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 8595-xxx with Enhanced 486DX/50 processor upgrade

IBM PS/2 Model 95 XP 486 8595-xxx with Enhanced 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 8595-xxx with processor upgrade with Pentium Technology

IBM PS/2 Model 95 XP 486 9595-0L* 486DX2/50

IBM PS/2 Model 95 XP 486 9595-0M* 486DX/50

IBM PS/2 Model 95 XP 486 9595-xxx with 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 9595-xxx with Enhanced 486DX/50 processor upgrade

IBM PS/2 Model 95 XP 486 9595-xxx with Enhanced 486DX2/66 processor upgrade

IBM PS/2 Model 95 XP 486 9595-xxx with processor upgrade with Pentium Technology

IBM PS/2 Model P75 8573-xxx 486DX/33

IBM PS/2 Server 85 433 9585-0K*

IBM PS/2 Server 85 466 9585-0N*

IBM PS/2 Server 85 9585-0X* 486SX/33

IBM PS/2 Server 85 9585-0X* with 486DX2/66 processor upgrade

IBM PS/2 Server 95 466 9595-1N*

IBM PS/2 Server 95 560 9595-0PT

IBM PS/2 Server 95 566 9595-0QT

IBM PS/2 Server 95 Array 466 9595-3N*

IBM PS/2 Server 95 Array 560 9595-3P*

IBM PS/2 Server 95 Array 566 9595-3Q*

IBM PS/2 Ultimedia DV M57 9557-xxx 486SLC2/50

IBM PS/2 Ultimedia M57 8557-xxx 486SLC/20

IBM PS/2 Ultimedia M57 9557-xxx 486SLC2/50

IBM PS/2 Ultimedia M77 9577-xxx 486DX2/66

IBM PS/2 Ultimedia M77 9577-xxx 486SX/33

IBM PS/ValuePoint 425SX/D 6384-Fxx

IBM PS/ValuePoint 425SX/S 6382-Fxx

IBM PS/ValuePoint 433DX/D 6384-Mxx

IBM PS/ValuePoint 433DX/S 6382-Mxx

IBM PS/ValuePoint 433DX/T 6387-Mxx

IBM PS/ValuePoint 433SX/D 6384-Kxx

IBM PS/ValuePoint 433SX/S 6382-Kxx

IBM PS/ValuePoint 466DX2/D 6384-Wxx

IBM PS/ValuePoint 466DX2/T 6387-Wxx

IBM ThinkPad 300 112

IBM ThinkPad 360CS 112

IBM ThinkPad 700C 10,112

IBM ThinkPad 720 10,112

IBM ThinkPad 720C 10,112

IBM ThinkPad 750 112,113

IBM ThinkPad 750c 112,113

IBM ThinkPad 755 486DX2/50 112,113

ICL ErgoPRO C4/33

ICL ErgoPRO D4/25

ICL ErgoPRO D4/33d

ICL ErgoPRO D4/66d XG

ICL ErgoPRO D5/60

ICL ErgoPRO E4/66d

ICL System Platform CXe486/66

ICL System Platform CXe486i

ICL System Platform CXe486s

ICL System Platform FX486/33

ICL System Platform FX486/50

ICL System Platform FX486/66

ICL ValuePlus D4i

ICL ValuePlus M4e

ICL ValuePlus M4i

ICL ValuePlus MD/33

ICL ValuePlus MD/50

ICL ValuePlus MD/66

Image 486DX/50 EISA

Image 486DX2/66 VESA

Index INDEXPORT 486 OVD 66 LOCAL BUS CACHE

Index INDEXPORT 486/33

Index INDEXPORT 486/33 VL VESA CACHE

Index INDEXPORT 486/50 I CACHE

Index INDEXPORT 486/50 VL VESA CACHE

Inelco INTEL XPRESS 50MHZ

Innovax Aurora 486DX/33

Insight 66 MHz EISA/VESA 486DX2

Insight 66 MHz ISA/VESA 486DX2

Intel Classic R-Series

Intel Classic/PCI Expandable Desktop

Intel Entrada OEM Platform

Intel L486-Series/Professional GX

Intel L486-Series/Professional Workstation

Intel Ninja DX2-66 OEM Platform

Intel Premiere/PCI 66 LPX

Intel Premiere/PCI Baby AT

Intel Premiere/PCI LPX

Intel X486/50E

Intel Xpress/MX 486/33

Intel Xpress/MX 66Mhz Pentium Pentium

Intelicom 486DX/33 EISA

Intelicom 486DX/33 ISA

Intelicom 486DX/33 VESA EISA

Intelicom 486DX/33 VLB

Intelicom 486DX/50 EISA

Intelicom 486DX/50 ISA

Intelicom 486DX/50 VESA EISA

Intelicom 486DX/50 VLB

Intelicom 486DX2/50 EISA

Intelicom 486DX2/50 ISA

Intelicom 486DX2/50 VESA EISA

Intelicom 486DX2/50 VLB

Intelicom 486DX2/66 EISA

Intelicom 486DX2/66 ISA

Intelicom 486DX2/66 VESA EISA

Intelicom 486DX2/66 VLB

Intelicom 486SX/25 ISA

Intelicom 486SX/25 VLB

Intelicom 486SX/33 ISA

INTERCOMP Digit 486SLC/25

INTERCOMP Entry 486/33

INTERCOMP Master 486DX/50

INTERCOMP Planet 486/50 EISA

INTERCOMP Planet 486DX2/66 EISA

INTERCOMP Planet LC 486/33 EISA

INTERCOMP Target 486/33

INTERCOMP Target 486/50 VLB

INTERCOMP Target 486DX/50

Interface Electronic 486DX2/66

Intergraph PC 433

Intergraph PC 466

Intergraph TD 2 Personal Workstation

Intergraph TD 3 Personal Workstation

Intergraph Technical Desktop 1220

International Data DGI 486DX-66

International Data DGI ISA O/D 20

International Instrumentation BLUE MAX 486 DX2 66

International Instrumentation BLUE MAX 486 DX33

International Instrumentation BLUE MAX 486 DX66 PCI

International Instrumentation BLUE MAX P-60 PCI

International Instrumentation BLUE MAX PENTIUM P5-60

Investronica INVES BS-486

Investronica INVES BS-486 VL

Investronica INVES IFS-486

Investronica INVES IFS-900

Investronica INVES MP-900 XM UniProcessor

Investronica INVES WS-900 EVL

Investronica INVES WS-900 VL

IPC DYNASTY G-PC 486DX-33CV

IPC DYNASTY G-PC 486DX2-50CV

IPC DYNASTY G-PC 486DX2-66CV

IPC DYNASTY G-PC 486SX-25CV

IPC DYNASTY HE (GREEN) 486DX-33

IPC DYNASTY HE (GREEN) 486DX2-50

IPC DYNASTY HE (GREEN) 486DX2-66

IPC DYNASTY HE (GREEN) 486SX-25

IPC DYNASTY HE (GREEN) 486SX-33

IPC DYNASTY HE 486DX-33

IPC DYNASTY HE 486DX-33C

IPC DYNASTY HE 486DX2-50

IPC DYNASTY HE 486DX2-50C

IPC DYNASTY HE 486DX2-66

IPC DYNASTY HE 486DX2-66C

IPC DYNASTY HE 486SX-25

IPC DYNASTY HE 486SX-25C

IPC DYNASTY HE 486SX-33

IPC DYNASTY LE 486DX-33 (incl. 33C)

IPC DYNASTY LE 486DX2-50 (incl. 50C)

IPC DYNASTY LE 486DX2-66 (incl. 66C)

IPC DYNASTY LE 486SX-25 (incl. 25C)

IPC DYNASTY S-PC 586DX-60CV

IPC DYNASTY SE 486DX-33C

IPC DYNASTY SE 486DX2-50C

IPC DYNASTY SE 486DX2-66C

IPC DYNASTY SE 486SX-25C

IPC DYNASTY SE PENTIUM-60

IPC DYNASTY SEL PENTIUM-60

IPC VALUEMAGIC 486DX-33

IPC VALUEMAGIC 486DX2-50

IPC VALUEMAGIC 486DX2-66

IPC VALUEMAGIC 486SX-25

IPC VALUEMAGIC 486SX-33

Ipex 486DX-33 Green Desk Top ISA/VESA

Ipex 486DX2-66 Centra 1000

Ipex 486DX2-66 Centra 1000 EISA

Ipex 486DX2-66 Centra 1000 EISA (Entry Level)

Ipex 486DX2-66 Centra 1000 EISA/VL-BUS

Ipex 486DX2-66 Centra 1000 ISA/VESA

Ipex 486DX2-66 Centra 1000 VESA

Ipex 486DX2-66 Centra 2000

Ipex 486DX2-66 Centra 2000 EISA

Ipex 486DX2-66 Centra 2000 EISA (Entry Level)

Ipex 486DX2-66 Centra 2000 EISA/VL-BUS

Ipex 486DX2-66 Centra 2000 ISA/VESA

Ipex 486DX2-66 Centra 2000 VESA

Ipex 486DX2-66 Centra 5000 ISA/VESA

Ipex 486DX2-66 Desktop

Ipex 486DX2-66 Desktop (EISA)

Ipex 486DX2-66 Desktop EISA (Entry Level)

Ipex 486DX2-66 Desktop EISA/VL-BUS

Ipex 486DX2-66 Desktop VESA

Ipex 486DX2-66 Green Desk Top ISA/VESA

Ipex 486DX2-66 Green Mini Tower ISA/VESA

Ipex 486DX2-66 Green Ulti-mate ISA/VESA

Ipex 486DX2-66 Mini Tower

Ipex 486DX2-66 Mini Tower EISA

Ipex 486DX2-66 Mini Tower EISA (Entry Level)

Ipex 486DX2-66 Mini Tower EISA/VL-BUS

Ipex 486DX2-66 Mini Tower VESA

Ipex 486DX2-66 Slimline

Ipex 486DX2-66 Slimline (WD Form Factor)

Ipex 486DX2-66 Slimline ISA/VESA

Ipex 486DX33 Centra 1000

Ipex 486DX33 Centra 1000 EISA

Ipex 486DX33 Centra 1000 EISA (Entry Level)

Ipex 486DX33 Centra 1000 EISA/VL-BUS

Ipex 486DX33 Centra 1000 VESA

Ipex 486DX33 Centra 2000

Ipex 486DX33 Centra 2000 EISA

Ipex 486DX33 Centra 2000 EISA (Entry Level)

Ipex 486DX33 Centra 2000 EISA/VL-BUS

Ipex 486DX33 Centra 2000 VESA

Ipex 486DX33 Desktop

Ipex 486DX33 Desktop EISA

Ipex 486DX33 Desktop EISA (Entry Level)

Ipex 486DX33 Desktop EISA/VL-BUS

Ipex 486DX33 Desktop VESA

Ipex 486DX33 Green Centra 1000 ISA/VESA

Ipex 486DX33 Green Centra 2000 ISA/VESA

Ipex 486DX33 Green Centra 5000 ISA/VESA

Ipex 486DX33 Green Mini Tower ISA/VESA

Ipex 486DX33 Green Slimline ISA/VESA

Ipex 486DX33 Green Ulti-mate ISA/VESA

Ipex 486DX33 Mini Tower

Ipex 486DX33 Mini Tower EISA

Ipex 486DX33 Mini Tower EISA (Entry Level)

Ipex 486DX33 Mini Tower EISA/VL-BUS

Ipex 486DX33 Mini Tower VESA

Ipex 486DX33 Slimline

Ipex 486DX33 Slimline (WD Form Factor)

Ipex 486DX50 Centra 1000

Ipex 486DX50 Centra 1000 EISA

Ipex 486DX50 Centra 1000 EISA (Entry Level)

Ipex 486DX50 Centra 1000 EISA/VL-BUS

Ipex 486DX50 Centra 1000 VESA

Ipex 486DX50 Centra 2000

Ipex 486DX50 Centra 2000 EISA

Ipex 486DX50 Centra 2000 EISA (Entry Level)

Ipex 486DX50 Centra 2000 EISA/VL-BUS

Ipex 486DX50 Centra 2000 VESA

Ipex 486DX50 Desktop

Ipex 486DX50 Desktop EISA

Ipex 486DX50 Desktop EISA (Entry Level)

Ipex 486DX50 Desktop EISA/VL-BUS

Ipex 486DX50 Desktop VESA

Ipex 486DX50 Mini Tower

Ipex 486DX50 Mini Tower EISA

Ipex 486DX50 Mini Tower EISA (Entry Level)

Ipex 486DX50 Mini Tower EISA/VL-BUS

Ipex 486DX50 Mini Tower VESA

Ipex 486DX50 Slimline

Ipex 486DX50 Slimline (WD Form Factor)

Ipex 486SX25 Centra 1000

Ipex 486SX25 Centra 1000 EISA

Ipex 486SX25 Centra 1000 EISA (Entry Level)

Ipex 486SX25 Centra 1000 EISA/VL-BUS

Ipex 486SX25 Centra 1000 VESA

Ipex 486SX25 Centra 2000

Ipex 486SX25 Centra 2000 EISA

Ipex 486SX25 Centra 2000 EISA (Entry Level)

Ipex 486SX25 Centra 2000 EISA/VL-BUS

Ipex 486SX25 Centra 2000 VESA

Ipex 486SX25 Desktop

Ipex 486SX25 Desktop EISA

Ipex 486SX25 Desktop EISA (Entry Level)

Ipex 486SX25 Desktop EISA/VL-BUS

Ipex 486SX25 Desktop VESA

Ipex 486SX25 Mini Tower

Ipex 486SX25 Mini Tower (EISA)

Ipex 486SX25 Mini Tower EISA (Entry Level)

Ipex 486SX25 Mini Tower EISA/VL-BUS

Ipex 486SX25 Mini Tower VESA

Ipex 486SX25 Slimline

Ipex 486SX25 Slimline (WD Form Factor)

Ipex 486SX33 Centra 1000 EISA

Ipex 486SX33 Centra 1000 EISA (Entry Level)

Ipex 486SX33 Centra 1000 EISA/VL-BUS

Ipex 486SX33 Centra 1000 ISA

Ipex 486SX33 Centra 1000 VESA

Ipex 486SX33 Centra 2000 EISA

Ipex 486SX33 Centra 2000 EISA (Entry Level)

Ipex 486SX33 Centra 2000 EISA/VL-BUS

Ipex 486SX33 Centra 2000 ISA

Ipex 486SX33 Centra 2000 VESA

Ipex 486SX33 Desktop

Ipex 486SX33 Desktop EISA

Ipex 486SX33 Desktop EISA (Entry Level)

Ipex 486SX33 Desktop EISA/VL-BUS

Ipex 486SX33 Desktop VESA

Ipex 486SX33 Mini Tower EISA

Ipex 486SX33 Mini Tower EISA (Entry Level)

Ipex 486SX33 Mini Tower EISA/VL-BUS

Ipex 486SX33 Mini Tower ISA

Ipex 486SX33 Mini Tower VESA

Ipex 486SX33 Slimline

Ipex 486SX33 Slimline (WD Form Factor)

Ipex Pentium/60 Centra 1000 EISA/PCI

Ipex Pentium/60 Centra 1000 ISA/PCI

Ipex Pentium/60 Centra 1000 ISA/VESA

Ipex Pentium/60 Centra 2000 EISA/PCI

Ipex Pentium/60 Centra 2000 ISA/PCI

Ipex Pentium/60 Centra 2000 ISA/VESA

Ipex Pentium/60 Centra 5000 EISA/PCI

Ipex Pentium/60 Centra 5000 ISA/PCI

Ipex Pentium/60 Centra 5000 ISA/VESA

Ipex Pentium/60 Desk Top EISA/PCI

Ipex Pentium/60 Desk Top ISA/PCI

Ipex Pentium/60 Desk Top ISA/VESA

Ipex Pentium/60 Mini Tower EISA/PCI

Ipex Pentium/60 Mini Tower ISA/PCI

Ipex Pentium/60 Mini Tower ISA/VESA

Ipex Pentium/60 Slimline 1000 EISA/PCI

Ipex Pentium/60 Slimline ISA/PCI

Ipex Pentium/60 Slimline ISA/VESA

Ipex Pentium/60 Ulti-mate EISA/PCI

Ipex Pentium/60 Ulti-mate ISA/PCI

Ipex Pentium/60 Ulti-mate ISA/VESA

Ipex Pentium/66 Centra 1000 EISA/PCI

Ipex Pentium/66 Centra 1000 ISA/PCI

Ipex Pentium/66 Centra 1000 ISA/VESA

Ipex Pentium/66 Centra 2000 EISA/PCI

Ipex Pentium/66 Centra 2000 ISA/PCI

Ipex Pentium/66 Centra 2000 ISA/VESA

Ipex Pentium/66 Centra 5000 EISA/PCI

Ipex Pentium/66 Centra 5000 ISA/PCI

Ipex Pentium/66 Centra 5000 ISA/VESA

Ipex Pentium/66 Desk Top EISA/PCI

Ipex Pentium/66 Desk Top ISA/PCI

Ipex Pentium/66 Desk Top ISA/VESA

Ipex Pentium/66 Mini Tower EISA/PCI

Ipex Pentium/66 Mini Tower ISA/PCI

Ipex Pentium/66 Mini Tower ISA/VESA

Ipex Pentium/66 Slimline EISA/PCI

Ipex Pentium/66 Slimline ISA/PCI

Ipex Pentium/66 Slimline ISA/VESA

Ipex Pentium/66 Ulti-mate EISA/PCI

Ipex Pentium/66 Ulti-mate ISA/PCI

Ipex Pentium/66 Ulti-mate ISA/VESA

ITG NT 486DX-50

ITOS KT 486/33

ITOS MT 386DX/40

JAI PC 845-66-32VL

JDR C486-50

JDR V486-33

JDR V486-66

JDR V486SX-33

KT Technology KT386DX-33

KT Technology KT386DX-40

KT Technology KT486DX-33

KT Technology KT486DX-50

KT Technology KT486DX2-50 VESA

KT Technology KT486DX2-66 VESA LB

L.E.M. Technologies Sys38640/M

LABTAM 486/66-2 VLB

LANIX BRAIN 486DX2-66

LANIX LIM 486SLC2-66

LANIX MART 486DLC-40

LANIX MART 486DX-33

LANIX MART 486DX2-66

LASER 386 Ultra Slim

LASER 486DX/3 Desktop

LASER 486DX/3 Desktop (w/LBVGA)

LASER 486DX/3 Desktop (w/VLBUS)

LASER 486DX/3 Mini (w/VLBUS)

LASER 486DX/3 Tower

LASER 486DX/3 Tower (w/VLBUS)

LASER 486DX2/4 Desktop

LASER 486DX2/4 Desktop (w/LBVGA)

LASER 486DX2/4 Desktop (w/VLBUS)

LASER 486DX2/4 Tower

LASER 486DX2/4 Tower (w/VLBUS)

LASER 486DX2/6 Desktop

LASER 486DX2/6 Desktop (w/LBVGA)

LASER 486DX2/6 Desktop (w/VLBUS)

LASER 486DX2/6 Mini (w/VLBUS)

LASER 486DX2/6 Tower

LASER 486DX2/6 Tower (w/VLBUS)

LASER 486SX/3 Desktop

LASER 486SX/3 Desktop (w/LBVGA)

LASER 486SX/3 Desktop w/VLBUS

LASER 486SX/3 Tower

LASER 486SX/3 Ultra Slim

LASER 486SX/3 Ultra Slim (w/LBVGA)

LASER 486SX/4 Desktop

LASER 486SX/4 Desktop (w/LBVGA)

LASER 486SX/4 Desktop (w/VLBUS)

LASER 486SX/4 Mini (w/VLBUS)

LASER 486SX/4 Tower

LASER 486SX/4 Ultra Slim

LASER 486SX/4 Ultra Slim (w/LBVGA)

LASER LT322 Notebook

LASER LT421 Notebook

LASER SMP DX2-66

Leading Edge D4/DX-33 Plus DeskTop

Leading Edge D4/DX-50 Plus DeskTop

Leading Edge D4/DX2-50 Plus DeskTop

Leading Edge D4/MTDX-33 MiniTower

Leading Edge D4/MTDX-50 MiniTower

Leading Edge D4/MTDX2-50 MiniTower

Leading Edge D4/MTDX2-66 MiniTower

Leading Edge D4/MTSX-25 MiniTower

Leading Edge D4/MTSX-33 MiniTower

Leading Edge D4/SX-25 Plus DeskTop

Leading Edge D4/SX-33 Plus DeskTop

Leading Edge WinPro 486/SLC33

Leading Edge WinPro 486/SX-25

Leading Edge WinPro 486e/DX-33

Leading Edge WinPro 486e/DX-33(VL)

Leading Edge WinPro 486e/DX-50

Leading Edge WinPro 486e/DX2-50

Leading Edge WinPro 486e/DX2-50(VL)

Leading Edge WinPro 486e/DX2-66

Leading Edge WinPro 486e/DX2-66(VL)

Leading Edge WinPro 486e/SX-25

Leading Edge WinPro 486e/SX-25(VL)

Leading Edge WinPro 486e/SX-33

Leading Edge WinPro 486e/SX-33(VL)

Leading Edge WinTower 486 DX-33

Leading Edge WinTower 486 DX2-50

Leading Edge WinTower 486 DX2-66

Leading Edge WinTower 486 SX-25

Leading Edge WinTower SX-33

Legacy 486DLC-33 SYSTEM

Legacy VLB 486DX-33

Lightning Power EISA

Lightning VLB Pak

Lucky Star System w/ Cyrix 486S-33

Lundin 400 Series 486 EISA w/ 486DX/50

Lundin 400 Series 486 ISA w/ 486DX/33

Lundin 400 Series 486 VESA w/ 486DX/33

Magitronic G-MD433L-170-4M

Magitronic G-MD440G-130-4M

Magitronic G-MD466L-210-4M

Magitronic G-MS466L-10-16M

Master Cascade 386-40 Small Desktop

Master Cascade 486-33 Mini-Tower

Maximus 486-50MHz Maxi-CAD

Maximus Cyrix 486/40 VESA Local Bus

MetaTech 486DX/33 ISA

MetaTech 486DX/33 VESA

MetaTech 486DX/50 EISA

Metro Computers 486Dx - 33

Metro Computers 486SX - 33 mhz

Metro Computers AMD 486DX - 40 mhz

Metro Computers Pentium 60

Micro Arts  EISA Pro

Micro Arts  Power Pro Stealth

Micro Arts  Power Pro Vesa

Micro Assistance Group MAG NT 4000

Micro Express ME 486DX2/66

Microbyte Lyrebird Model 451

Microbyte Lyrebird Model 455

Microbyte Lyrebird Model 457

Micron 4100 VL Magnum

Micron 486PCI WINSTATION CD

Micron 486VL Magnum 433 DX

Micron 486VL Magnum 433 SX

Micron 486VL Magnum 450 DX2

Micron 486VL Magnum 466 DX2

Micron 486VL MagServer 433 DX

Micron 486VL MagServer 450 DX2

Micron 486VL MagServer 466 DX2

Micron 486VL PowerStation 433 DX

Micron 486VL PowerStation 433 SX

Micron 486VL PowerStation 450 DX2

Micron 486VL PowerStation 466 DX2

Micron 486VL ValueLine 466 DX2

Micron 486VL WinServer 433 DX

Micron 486VL WinServer 450 DX2

Micron 486VL WinServer 466 DX2

Micron 486VL WinStation 433 DX

Micron 486VL WinStation 433 SX

Micron 486VL WinStation 450 DX2

Micron 486VL WinStation 466 DX2

Micron P5PCI Platinum CD

Micron P5PCI PowerStation CD

Microniche MIS Computer Systems M466EV

Microniche MIS Computer Systems M466VL

Microtec MF486 EISA/66MHz

Microtech MTECH GX4-D250

Microtech MTECH GX4-D266

Microtech MTECH GX4-D33

Microtech MTECH GX4-S33

Microtech MTECH VI7-P560

Midgards Micro ISA 486DX-33

Midgards Micro VESA 486DX-33

Midwest Micro 486DX2/50 Vesa/ISA

MIKROLOG OY Osborne MT4D-33CLB

MIKROLOG OY Osborne MT4D-33N

MIKROLOG OY Osborne MT4D-50CLB

MIKROLOG OY Osborne MT4D-50N

MIKROLOG OY Osborne MT4D-66CLB

MIKROLOG OY Osborne MT4D-66N

MIKROLOG OY Osborne MT4S-25N

MIKROLOG OY Osborne MT4S-33CLB

MIKROLOG OY Osborne MT4S-33N

MIND 386DX/33 ISA

MIND 486DX/33 EISA

MIND 486DX/33 ISA

MIND 486DX/33 VLB

MIND 486DX/50 EISA

MIND 486DX/50 ISA

MIND 486DX2/50 EISA

MIND 486DX2/50 ISA

MIND 486DX2/50 VLB

MIND 486DX2/66 EISA

MIND 486DX2/66 ISA

MIND 486DX2/66 VLB

MIND 486SX/25 EISA

MIND 486SX/25 ISA

MIND 486SX/33 EISA

MIND 486SX/33 ISA

MIND 486SX/33 VLB

MIND Pentium 60 VLB

Minitronics MINTEC 486DX-33

MiTAC DM4066

Modular MST/200

Modular Server Module 450

Modular Server Module 466

Modular Server Module Pentium

Modular Server Tower/32

Monydata Entry 486 / 33

Monydata Modula 200 / 80

Monydata Station 486 / 80

Multitech ProSpec 486DX-50 PS450DE-ST

Mustek MECER3486-VL

Mustek MECER7486-VL

MYNIX MYCOMP 486/66VLG

National Instruments™ VXIpc-486 Model 200

National Instruments VXIpc-486 Model 500

National Microcomputers Power System DX2-66

NCR StarStation

NCR System 3000 Model 3230

NCR System 3000 Model 3314

NCR System 3000 Model 3330

NCR System 3000 Model 3333

NCR System 3000 Model 3335

NCR System 3000 Model 3345

NCR System 3000 Model 3350

NCR System 3000 Model 3355

NCR System 3000 Model 3410

NCR System 3000 Model 3445

NCR System 3000 Model 3447

NEC Express II

NEC Express/II 433 ST

NEC Express/II 466 ST

NEC Express/II P601 LT

NEC Image 425

NEC Image 433

NEC Image 433ES

NEC Image 466

NEC Image 466es

NEC Image P60

NEC PowerMate 386/25S

NEC PowerMate 425

NEC PowerMate 425es

NEC PowerMate 433

NEC PowerMate 433es

NEC PowerMate 466

NEC PowerMate 466es

NEC PowerMate 486/33e

NEC PowerMate 486/33i

NEC PowerMate 486/50e

NEC PowerMate 486/50i

NEC PowerMate 486sx/25e

NEC PowerMate DX2/66e

NEC UltraLite™ Versa

NETiS 386DX/40 ISA

NETiS 486DX/33 ISA

NETiS 486DX/33 VL

NETiS 486DX/33 VL EISA

NETiS 486DX/50 VL

NETiS 486DX/50 VL EISA

NETiS 486DX2/50 VL EISA

NETiS 486DX2/66 ISA

NETiS 486DX2/66 VL

NETiS 486DX2/66 VL EISA

NETiS 486SX/33 VL

NETiS Ultra 486DX/33 ISA

NETiS Ultra 486DX/50 ISA

NETiS Ultra 486DX2/66 ISA

NETiS Ultra 486DX2/66 VL

NETiS Ultra 486SX/25 ISA

NETiS Ultra N433VL

NETiS Ultra N450VL

Network Connection M2

Network Connection T-3000

Network Connection T-4000

Network Connection TNX

Network Connection Triumph T.R.A.C.

Network Connection Triumph T.S.C.V

Nimrod 486 DESKTOP VESA

Nimrod 486 LC-DESKTOP VESA

Nimrod 486 MINI-TOWER VESA

Nimrod 486 TOWER VESA

Nimrod DESKTOP 486DX/33 VESA VL

Nimrod DESKTOP 486DX2/66 ISA

Nimrod LC-DESKTOP 486DX/33 VESA VL

Nimrod LC-DESKTOP 486DX2/66 ISA

Nimrod MINI-TOWER 486DX/33 VESA VL

Nimrod MINI-TOWER 486DX2/66 ISA

Nimrod TOWER 486DX/33 VESA VL

Nimrod TOWER 486DX2/66 ISA

Nix PCs 486DX2/66 Vesa

NORTH-EAST NE Micro 433LV

NORTH-EAST NE Micro 450LV

NORTH-EAST NE Micro 466LV

Northern Micro NM486/66VL

Northgate 486/33

Northgate 486/33 Slimline ZXP

Northgate 486/33 VESA ISA

Northgate 486/33e Baby AT

Northgate Elegance 333

Northgate Elegance 425i

Northgate Elegance 433e

Northgate Elegance 433i

Northgate Elegance SP 386/33

Northgate Elegance SP 433

Northgate Elegance ZXP

Northwest Micro Signature I 4/33

Northwest Micro Signature II 4/33 VLB

OKI if 486VX550D

OKI if Server 466/SL

OKI if Station 425/DL

OKI if Station 433/DE

Olidata P/60

Olivetti LSX5010

Olivetti LSX5015

Olivetti LSX5020

Olivetti LSX5025

Olivetti LSX5025 E

Olivetti M300-28

Olivetti M300-30

Olivetti M300-30P

Olivetti M380-40

Olivetti M4-40

Olivetti M4-46

Olivetti M4-60

Olivetti M4-62

Olivetti M4-64

Olivetti M4-65

Olivetti M4-66

Olivetti M4-82

Olivetti M400-10

Olivetti M400-40

Olivetti M400-60

Olivetti M480-10

Olivetti M480-20

Olivetti M480-40

Olivetti M6-400

Olivetti M6-420

Olivetti M6-440

Olivetti M6-450

Olivetti M6-460

Olivetti M6-520

Olivetti M6-540

Olivetti M6-560

Olivetti M6-620

Olivetti M6-850

Olivetti M6-860

Olivetti M6-880

Olivetti SNX 140 Systema

Olympia Olystar 300D-33

Olympia Olystar 400D-33

Olympia Olystar 400D-33 EISA

Olympia Olystar 400D-50

Olympia Olystar 400D-66

Olympia Olystar 400D-66 EISA

Olympia Olystar 400S-25

Olympia Olystar 400S-33SL

Omni Tech 8600 486DX2-66

Omni Tech 9600 486DX2-66

Optima OCT 486DX2/66 VL

Optima OCT 486DX250 EISA

Optima OCT 486DX266 EISA

Optima OCT 486DX33 EISA

Optima OCT 486DX33 VL

Optima OCT 486DX50 EISA

Optima OCT 486DX50 VL

Optima OCT 486SX25 EISA

Optima OCT 486SX25 VL

Optima OCT DX2-50 VL

Optima Sprinter 486DX250 EISA

Optima Sprinter 486SX25 EISA

Optimus 486DX/50 EISA

Optimus 486DX/50 LocalBus

Optimus 486DX2-50 VLB

Optimus 486DX2-66 EISA

Optimus 486DX2-66 VLB

Optimus 486DX2/66

Optimus 486SX/25 VL

Optimus Lan Server LX

OPUS Pentium/60Mhz

OPUS Premier 4D-50

Osborne 4280G-66

Osborne EISA 486DX50 Fileserver

Osborne IX5-60E

Osborne LP4D-33

Osborne LP4D-33CLB

Osborne LP4D-33N

Osborne LP4D-50

Osborne LP4D-50C

Osborne LP4D-50CLB

Osborne LP4D-50N

Osborne LP4D-66

Osborne LP4D-66CLB

Osborne LP4D-66N

Osborne LP4S-25

Osborne LP4S-25N

Osborne LP4S-33CLB

Osborne LP4S-33N

Osborne Mpower 486DX2-66

Osborne Mpower3 486DX33

Osborne Mpower3 486SX33

Osborne Mpower4 486DX33

Osborne Mpower4 486SX33

Osborne Pentium 60

Osborne VESA 486DX2-66

Osicom 4133L 486/DX266 VESA LB

Osicom 4133L 486/DX33 VESA LB

Packard Bell 1110

Packard Bell 1120

Packard Bell 1150

Packard Bell 2050

Packard Bell 400T

Packard Bell 470

Packard Bell 485

Packard Bell 486CDM

Packard Bell 486DX/33

Packard Bell 486SX/25

Packard Bell 495

Packard Bell 515E

Packard Bell 525E

Packard Bell 545E

Packard Bell 550

Packard Bell 560

Packard Bell 565E

Packard Bell AXCEL 1033

Packard Bell AXCEL 105

Packard Bell AXCEL 1066

Packard Bell AXCEL 130

Packard Bell AXCEL 2005

Packard Bell AXCEL 2015

Packard Bell AXCEL 2033

Packard Bell AXCEL 205

Packard Bell AXCEL 2066 MINITOWER

Packard Bell AXCEL 230

Packard Bell AXCEL 405 (incl. H model)

Packard Bell AXCEL 410

Packard Bell AXCEL 410E (incl. H, F and W G models)

Packard Bell AXCEL 420

Packard Bell AXCEL 450G (incl. H, J and TJ models)

Packard Bell AXCEL 460

Packard Bell AXCEL 460H (incl. TJ model)

Packard Bell AXCEL 486/33

Packard Bell AXCEL 486A66

Packard Bell AXCEL 486SX

Packard Bell AXCEL 530

Packard Bell AXCEL 533H (incl. J and TJ models)

Packard Bell AXCEL 533STJ

Packard Bell AXCEL 550

Packard Bell AXCEL 550MT/J

Packard Bell AXCEL 570

Packard Bell AXCEL 630 MINITOWER

Packard Bell AXCEL 666J (incl. TJ and TL models)

Packard Bell AXCEL 850

Packard Bell EXECUTIVE 486/33 (incl. ELITE model)

Packard Bell EXECUTIVE 486/33 G (incl.  J model)

Packard Bell EXECUTIVE 486DX2/JW (incl. TY model)

Packard Bell EXECUTIVE 486SX (incl. -2F and -G models)

Packard Bell EXECUTIVE 486SX ELITE (incl. SERIES SI model)

Packard Bell EXECUTIVE 486SX-EC

Packard Bell EXECUTIVE 486SX/FW (incl. /HW model)

Packard Bell EXECUTIVE 486SX250

Packard Bell EXECUTIVE 486XE (incl. C and S models)

Packard Bell EXECUTIVE Elite Series 486SXCC

Packard Bell FORCE 1066

Packard Bell FORCE 107

Packard Bell FORCE 110

Packard Bell FORCE 1135

Packard Bell FORCE 1137

Packard Bell FORCE 117

Packard Bell FORCE 200

Packard Bell FORCE 2010

Packard Bell FORCE 2020

Packard Bell FORCE 2040 MINITOWER

Packard Bell FORCE 2233 MINITOWER

Packard Bell FORCE 2376 (incl. F model)

Packard Bell FORCE 2386 MINITOWER

Packard Bell FORCE 250

Packard Bell FORCE 405

Packard Bell FORCE 425

Packard Bell FORCE 486 SX (incl. E, -M1, and -M130 models)

Packard Bell FORCE 486/25

Packard Bell FORCE 486/33 (incl. +, E, -M1, and -M210 models)

Packard Bell FORCE 486/33G (incl. J, JW, and PLUS models)

Packard Bell FORCE 48625 (incl. EX model)

Packard Bell FORCE 486CDM-1/TV

Packard Bell FORCE 486DX/DJ-W (incl. G-W, H, H2, J and JT-W models)

Packard Bell FORCE 486DX2 -WG

Packard Bell FORCE 486DX2/EJT (incl. W model)

Packard Bell FORCE 486DX2/F JT (incl. JT-W, J-W  and LT-W models)

Packard Bell FORCE 486DX2/G-W

Packard Bell FORCE 486MT50J

Packard Bell FORCE 486SX (incl. /20, /20G, E, M1, and M130 models)

Packard Bell FORCE 486SX-WG

Packard Bell FORCE 486SX/25 (incl. G and W models)

Packard Bell FORCE 486SX/BE (incl. FW, FW-2, M, MM and H2 models)

Packard Bell FORCE 486SX/OH-W

Packard Bell FORCE 515

Packard Bell FORCE 515S (incl. PLUS model)

Packard Bell FORCE 525 (incl. B and S models)

Packard Bell FORCE 545 (incl. B and S models)

Packard Bell FORCE 565 (incl. S model)

Packard Bell FORCE 600 (incl. B and S models)

Packard Bell FORCE 715 MINITOWER

Packard Bell FORCE T66

Packard Bell LEGEND 102H (incl. ELITE model)

Packard Bell LEGEND 1066 WG ELITE

Packard Bell LEGEND 1133

Packard Bell LEGEND 1134 ELITE

Packard Bell LEGEND 1135

Packard Bell LEGEND 1136

Packard Bell LEGEND 115

Packard Bell LEGEND 1166

Packard Bell LEGEND 1176

Packard Bell LEGEND 120

Packard Bell LEGEND 125

Packard Bell LEGEND 126 ELITE

Packard Bell LEGEND 127

Packard Bell LEGEND 128

Packard Bell LEGEND 135 (incl. H model)

Packard Bell LEGEND 140

Packard Bell LEGEND 1900

Packard Bell LEGEND 1910

Packard Bell LEGEND 2000

Packard Bell LEGEND 2001

Packard Bell LEGEND 2002 ELITE

Packard Bell LEGEND 2011 SUPREME

Packard Bell LEGEND 2025

Packard Bell LEGEND 207

Packard Bell LEGEND 2133 MINITOWER

Packard Bell LEGEND 2135 MINITOWER

Packard Bell LEGEND 2176 ELITE MT

Packard Bell LEGEND 2266 MINITOWER

Packard Bell LEGEND 2270 MINITOWER

Packard Bell LEGEND 2276 MINITOWER

Packard Bell LEGEND 2300 MINITOWER

Packard Bell LEGEND 233

Packard Bell LEGEND 234 ELITE

Packard Bell LEGEND 245

Packard Bell LEGEND 33T SUPREME

Packard Bell LEGEND 33T SUPREME MINITOWER

Packard Bell LEGEND 430 G (incl. WG and F models)

Packard Bell LEGEND 430 WG ELITE

Packard Bell LEGEND 430E (incl. E2 and EL models)

Packard Bell LEGEND 435E ELITE (incl. 2 ELITE model)

Packard Bell LEGEND 440G

Packard Bell LEGEND 445 G ELITE (incl. G 2 ELITE model)

Packard Bell LEGEND 486CDM-1/TV

Packard Bell LEGEND 486T/50

Packard Bell LEGEND 510H

Packard Bell LEGEND 605H ELITE

Packard Bell LEGEND 625

Packard Bell LEGEND 635J

Packard Bell LEGEND 635TJ ELITE

Packard Bell LEGEND 660 (incl. H and ELITE models)

Packard Bell LEGEND 660H

Packard Bell LEGEND 660TJ (incl. H model)

Packard Bell LEGEND 66D SUPREME

Packard Bell LEGEND 66T SUPREME

Packard Bell LEGEND 670

Packard Bell LEGEND 695 SUPREME

Packard Bell LEGEND 700 (incl. ELITE model)

Packard Bell LEGEND 740

Packard Bell LEGEND 747 MINITOWER

Packard Bell LEGEND 750 SUPREME

Packard Bell LEGEND 760 SUPREME

Packard Bell LEGEND 770 (incl. ELITE model)

Packard Bell LEGEND 780

Packard Bell LEGEND 780 SUPREME

Packard Bell LEGEND 790

Packard Bell LEGEND 800 SUPREME (incl. 800+)

Packard Bell LEGEND 800 SUPREME/50

Packard Bell LEGEND 840 MINITOWER

Packard Bell LEGEND 845 MINITOWER

Packard Bell LEGEND 848 MINITOWER

Packard Bell LEGEND 900 F (incl. F-ELITE, and G models)

Packard Bell LEGEND 920SX SUPREME

Packard Bell LEGEND 925 G (incl. G ELITE and J model)

Packard Bell LEGEND 933 G (incl. G ELITE, J, J ELITE and J+)

Packard Bell LEGEND 950 ELITE (incl. J and J ELITE models)

Packard Bell LEGEND 960TJ

Packard Bell LEGEND 966J (incl. ELITE model)

Packard Bell LEGEND 966TJ (incl. TJ ELITE, TJ2 ELITE, TJ-W ELITE, WG and TZ models)

Packard Bell LEGEND M950

Packard Bell LEGEND MT950 (incl. J model)

Packard Bell LEGEND T66

Packard Bell PACKMATE 486/33G (incl. J model)

Packard Bell PACKMATE 486/E

Packard Bell PACKMATE 48625

Packard Bell PACKMATE 486DX/33 Y (incl. Y-W and  X models)

Packard Bell PACKMATE 486DX2/50TY (incl. TY-W model)

Packard Bell PACKMATE 486DX2/T Z -W (incl. Y model)

Packard Bell PACKMATE 486DX33/T Y (incl. /TY-W model)

Packard Bell PACKMATE 486SX

Packard Bell PACKMATE 486SX/20 E (incl. F, and G models)

Packard Bell PACKMATE 486SX/25G

Packard Bell PACKMATE 486SX/25W (incl. TG model)

Packard Bell PACKMATE 486SX/33X (incl. X2 and TM models)

Packard Bell PACKMATE 486SX25U (incl. U2 and X models)

Packard Bell PACKMATE 733 C MT

Packard Bell PACKMATE X225

Packard Bell PACKMATE X230

Packard Bell PACKMATE X233

Packard Bell PACKMATE X240

Packard Bell PACKMATE X250 (incl. Y model)

Packard Bell PACKMATE XT266

Packard Bell PB430_5428

Packard Bell PB430SX25

Packard Bell PB530_5428

PC Direct 486ep

PC Expanders VANGUARD PENTIUM 60MHZ VLB

PC House Micro Q 486dx2-66

PC Tech Zeos Upgradable

PC-Brand Leader 486dx/33 Cache

PC-Brand Leader 486dx2/66 Cache

PC-Brand NB 486slc

Peacock 486DX 50

Pionex 486DX/33 VL

Pionex 486DX2/50 VL

Pionex 486DX2/66 EISA/VL

Pionex 486DX2/66 VL

Pionex 486SX/25 VL

Poly 486-33VZ

Poly 486-50E

Poly 486-66E

Poly 486-66EV

Poly 486-66VI

Poly 486-66VL

Poly 486-66VR3

Poly 486SX-25Y

Poly 486SX-33VL

Poly 586-60VLB

Positive by Tandon 486dx/33

Positive by Tandon 486dx2/66

Precision 486/50 EISA

Precision 486/50F

Precision 486/66 EISA VL-Bus

Precision 486/66 VL-Bus

Precision 486/66E

Primax 425SVI

Primax 433VI

Primax 450VE

Primax 450VI

Primax 466VI

Primax 486/33E

Primax 486/66E

Procomp TW 9300

Professional Concepts Beeker 4-33/VL2

Professional Concepts Beeker 4-50/VL2

Professional Concepts Beeker 4-66/VL2

Professional Concepts Beeker 6900

Professional Concepts Quinn 4-33/VLE

Professional Concepts Quinn 4-50/VLE

Professional Concepts Quinn 4-66/VLE

Professional Concepts Saavij 4-33/VL3

Professional Concepts Saavij 4-50/VL3

Professional Concepts Saavij 4-66/VL3

Progen 466

Protech 486-66Mhz EISA

Protech 486-66Mhz EISA/VL

Protech 486-66Mhz ISA

Protech 486-66Mhz ISA/VL

QNIX OMNI486DX2/66

Quadrant 486DX/33 VESA LOCAL BUS

Quadrant 486DX/50 VESA LOCAL BUS

Quadrant 486DX2/66 VESA LOCAL BUS

Quadrant 486SX/25 VESA LOCAL BUS

Quadrant 486SX/33 VESA LOCAL BUS

Quantex 486DX/33 VL

Quantex 486DX2/50 VL

Quantex 486DX2/66 EISA/VL

Quantex 486DX2/66 VL

Quantex 486SX/25 VL

Quattro Prompt4

Radisys EPC-23

Radisys EPC-4

Radisys EPC-5

Radisys EPC-7

Rask REC 486-50F

RDIpc i486DX2/66c Eisa

RDIpc i486DX2/66c Isa

RDIpc i486DX2/66c VL Bus

Reason Technology Square 4LX-C 486DX/2-66

Reason Technology Square 4LX/DX2-66

Repco Data R33B486

Repco Data Turbo APM-420 DX

Repco Data Turbo APM-425 DX

Repco Data Turbo APM-433

Reply Model 32

Reply PS/2 Model 50/50SX System Board Upgrade 486SLC2/50 110

Reply PS/2 Model 55/55SX System Board Upgrade 486/25 110

Reply PS/2 Model 60/80 System Board Upgrade 486/33 110

Reply PS/2 Model 70 System Board Upgrade 486/33 110

Research Machines RM E Series QE-486/33

Research Machines RM S Series PC-486/25SX

Research Machines RM SystemBase 486/33

Research Machines RM V Series V466

Rolta ROLTASTATION 433E

Rose Computer Cidex 386DX-40 ISA(AMD)

Rose Computer Cidex 486DX-40 ISA

Samsung DeskMaster 486/33P

Samsung DeskMaster 486D2/66E

Samsung DeskMaster 486S/25N

Sanyo MBC-19te

SCA Professional 3486DX2/66 VLB

SCA Professional 486DX 50 VLB

SCA Professional 486DX2/66 VLB

SCHADT SCT Proline 486DX2-66 VLB

Seanix ASI 9000 EFAR 486DX2-66

Seanix ASI 9000 PREMIERE PENTIUM PCI-60

Seanix ASI 948633VM

Seanix ASI 948650VM

Seanix ASI 9DX266VM

Sequent WinServer 1000up 15

Sequent WinServer 1500up 15

Sequent WinServer 3000up 15

Shuttle 486VL 50

Shuttle HOT-407 EISA/VESA/DX-33

Shuttle HOT-407 EISA/VESA/DX-40

Shuttle HOT-407 EISA/VESA/DX-50

Shuttle HOT-407 EISA/VESA/DX2-50

Shuttle HOT-407 EISA/VESA/DX2-66

Shuttle HOT-409 VLB/DX-33

Shuttle HOT-409 VLB/DX-40

Shuttle HOT-409 VLB/DX-50

Shuttle HOT-409 VLB/DX2-50

Shuttle HOT-409 VLB/DX2-66

Shuttle HOT-413 VLB/DX-33

Shuttle HOT-413 VLB/DX-40

Shuttle HOT-413 VLB/DX-50

Shuttle HOT-413 VLB/DX2-66

Shuttle HOT-426 PCI/DX-33

Shuttle HOT-503 PENTIUM/60

Shuttle HOT-503 PENTIUM/66

Sidus Formula 486/33i

Sidus Formula 486/50e

Siemens-Nixdorf PCD-3M/25

Siemens-Nixdorf PCD-3T/33

Siemens-Nixdorf PCD-4G/33

Siemens-Nixdorf PCD-4G/66

Siemens-Nixdorf PCD-4GSX/25

Siemens-Nixdorf PCD-4H

Siemens-Nixdorf PCD-4H VL

Siemens-Nixdorf PCD-4HSX

Siemens-Nixdorf PCD-4LSL

Siemens-Nixdorf PCD-4LSX

Siemens-Nixdorf PCD-4T

Siemens-Nixdorf PCD-4T/66

Siemens-Nixdorf PCD-5H

Siemens-Nixdorf PCD-5T / PCI 60E

Siemens-Nixdorf PCE-4C/66-1

Siemens-Nixdorf PCE-4C/DX2-66

Siemens-Nixdorf PCE-4C/SX25

Siemens-Nixdorf PCE-4R/33

Siemens-Nixdorf PCE-4RSX/25

Siemens-Nixdorf PCE-4T/66

Siemens-Nixdorf PCE-5S/60

Siemens-Nixdorf PCE-5S/66

Silicon Star AV4 486DX2/66

Silicon Star AV4 486DX33

Silicon Star AV4 50MHz

Sirex Eaton 486DX-33 EISA/LocalBus

Sirex PowerMaster 486DX-33 EISA/VLB

Sirex PowerMaster 486DX2-50 EISA/VLB

Sirex PowerMaster 486DX2-66 EISA/VLB

Sirex SpeedMaster 486DX-33 ISA

Sirex SpeedMaster 486DX-33 LocalBus

Sirex SpeedMaster 486DX-50 ISA

Sirex SpeedMaster 486DX2-50 ISA

Sirex SpeedMaster 486DX2-50 LocalBus

Sirex SpeedMaster 486DX2-66 ISA

Sirex SpeedMaster 486DX2-66 LocalBus

Sirex SpeedMaster 486SX-33 LocalBus

SKAI 486DX/50VL

SKAI 486DX2/66EVL

Softlet Standard 486DX-40

Softlet Standard 486DX-50

Softlet Standard 486DX2-50 VL

Softlet Standard 486DX2-66

Softworks Citus MDC 386-33

Softworks Citus MDC 486DX-33

Softworks Citus MDC 486DX-50

Softworks Citus MDC 486DX2-50

Softworks Citus MDC 486DX2-66

Softworks Citus MDC X 486 50

SRC Systems 486 VL

SRC Systems GRAPHICSTATION

SRC Systems High Performance SCSI 66MHz

SRC Systems Pentium PCI

Standard Computronics HIPPO-VL 486DX2-66 VESA LOCAL BUS

Standard Computronics HIPPO-VL+ 486DX2-66 DCA SYSTEM

STD 4D250

STD 4D33

STD 4DV266

STD 4DX250B

STD 4DX266B

STD 4DX33B

SuperCom Touch TI433

SuperCom Touch TI450

SuperCom Touch TI466

Supra 486DX-33 VESA/ISA

Supra 486SX-33 VESA/ISA

Svensk LAPLINE DeskTop 462 (incl. MiniTower Model)

Swan 486/33DB

Swan 486/33V

Swan 486/50ES

Swan 486/66ES

Swan 486DX/33 EISA-DB

Swan 486DX2/50DB

Swan 486DX2/66 EISA-DB

Swan 486DX2/66DB

Swan 486SX/25DB

Swan 486SX/25V

Syncomp Mega+386i 40 PC

Syncomp Mega+486DX2/50e PC

Syncomp Mega+486DX2/50i PC

Syncomp Mega+486DX2/66e PC

Syncomp Mega+486DX2/66i PC

Syncomp Mega+486e-33 PC

Syncomp Mega+486e-50 PC

Syncomp Mega+486i-33 PC

Syncomp Mega+486i-50 PC

Syncomp Mega+486SXe-25 PC

Syncomp Mega+486SXi 33 PC

Syncomp Mega+486SXi-25 PC

Syncomp Micro 386i 40 PC

Syncomp Micro 486DX2/50i PC

Syncomp Micro 486i-33 PC

Syncomp Micro 486i-50 PC

Syncomp Micro 486SXi-25 PC

Syncomp Mini 386i-40PC

Syncomp Mini 486-50i PC

Syncomp Mini 486DX2/50e PC

Syncomp Mini 486DX2/50i PC

Syncomp Mini 486DX2/66e PC

Syncomp Mini 486DX2/66i PC

Syncomp Mini 486e-33 PC

Syncomp Mini 486e-50 PC

Syncomp Mini 486i-33 PC

Syncomp Mini 486SXe-25 PC

Syncomp Mini 486SXi-25 PC

Syncomp Mini 486SXi-33 PC

Syncomp Mini+386i 40 PC

Syncomp Mini+486DX2/50e PC

Syncomp Mini+486DX2/50i PC

Syncomp Mini+486DX2/66e PC

Syncomp Mini+486DX2/66i PC

Syncomp Mini+486e-33 PC

Syncomp Mini+486e-50 PC

Syncomp Mini+486i-33 PC

Syncomp Mini+486i-50 PC

Syncomp Mini+486SXe-25 PC

Syncomp Mini+486SXi-25 PC

Syncomp Mini+486SXi-33 PC

Sys Technology ST486DX-33VM

T-DATA LIN 486-33 DX

T-DATA LIN 486-50 DX

Tagram Computers 486DX-33

Tandon 486dx/33

Tandon 486dx2/66

Tandon MCSII 486dx/33

Tandon MCSII 486dx/33c

Tandon MCSII 486dx2/66c

Tandon NII 486dx/33

Tandon PACII plus 486dx2/66

Tandon PCAII 486dx2/66

Tandon PCAII 486sx/25

Tandon Profile 486dx/33

Tandon TargetII 486dx2/66

Tandon TargetII 486sx/25

Tandon Tower 486dx2/66e

Tandon TowerII 486dx2/66

Tandy 3100

Tandy 425 SX

Tandy 433 DX

Tandy 433 SX

Tandy 450 DX2

Tandy 466 DX2

Tandy 4825 SX

Tandy 4833 LX/T

Tandy 4850 EP

Tandy 4866 LX/T

Tandy Omni Profile II 425 SX

Tandy Omni Profile II 433 DX

Tandy Omni Profile II 433 SX

Tandy Omni Profile II 450 DX2

Tandy Omni Profile II 466 DX2

Tandy Onmi II MT 425 SX

Tandy Onmi II MT 433 DX

Tandy Onmi II MT 433 SX

Tandy Onmi II MT 450 DX2

Tandy Onmi II MT 466 DX2

Tangent 486DX/33 EISA

Tangent 486DX/33 ISA

Tangent EISA /VL 466 Server

Tangent EISA /VL 466d

Tangent EISA /VL 466m

Tangent EISA /VL 466t

Tangent P560 Server

Tangent P560d

Tangent P560m

Tangent P560t

Tangent P566 Server

Tangent P566d

Tangent P566m

Tangent P566t

Tangent VL450 Server

Tangent VL450d

Tangent VL450m

Tangent VL450t

Tangent VL450x Server

Tangent VL450xd

Tangent VL450xm

Tangent VL450xt

Tatung TCS-8460S 386SX/25

Tatung TCS-9300T 486DX2/66

Tatung TCS-9360T 486DX/33

Tatung TCS-9370T 486DX2/66

Tatung TCS-9510 486DX/33

Tatung TCS-9540 486DX/33

Tatung TCS-9620E 486DX2/66

Tatung TCS-9650E 486DX2/66

Tatung TCS-9700 486DLC/40

Tatung TCS-9910S 486SLC/33

Techway Endeavour E62

Techway Endeavour E62VL

Techway Endeavour E77

Techway Endeavour E77VL

Techway Endeavour E84

Techway Endeavour E84VL

TELEMECANIQUE FTX507-6B

TELEMECANIQUE FTX507-8C

Texas Instruments TravelMate 4000 Color Series 10

Texas Instruments TravelMate 4000 Series 10

Texas Instruments TravelMate 4000 WinDX2 10

Texas Instruments TravelMate 4000E in TravelMate DeskTop

TFE Atlantic 486 DX 50Mhz

Tiki-Data PC UNIVERSAL

Toshiba Satellite T1900C

Toshiba T1910CS/200

Toshiba T1950CT/320

Toshiba T1960CS/250

Toshiba T1960CT/320

Toshiba T2400CS/250

Toshiba T2400CT/320

Toshiba T3400CT/250

Toshiba T3600CT/250

Toshiba T4400SXC

Toshiba T4500

Toshiba T4600C/200

Toshiba T4600C/320

Toshiba T4700CS/200

Toshiba T4700CT/320

Toshiba T4800CT/500

Toshiba T6400SX

Toshiba T6600C Multimedia Computer 114

Tri-Star Tri-Win Station

Tri-Star TriCAD 486/66

TriGem 486/33MM (incl. 486 /P (Type 30) model)

TriGem 486/50F

TriGem 486/66F

TriGem 486/66VC

TriGem 486DX2/50MM (incl. 486 /P (Type 40) model)

TriGem 486DX2/66MM (incl. 486 /P (Type 50) model)

TriGem 486G/T20

TriGem 486G/T40

TriGem 486H/T12G

TriGem 486P/T15V

TriGem 486P/T25V

TriGem 486P/T35V

TriGem 486P/T45V

TriGem 486P/T55V

TriGem 486VC

TriGem 4DX/33ME

TriGem 4DX/33ML

TriGem 4DX2/50

TriGem 4DX2/50ME

TriGem 4DX2/66 ML

TriGem 4DX2/66ME

TriGem 4SX/25ME

TriGem 4SX/25ML

TriGem 4SX/33ME

TriGem 4SX/33ML

TriGem 586T

TriGem SX486/25C

TriGem SX486/25MM (incl. 486 /P (Type 10 and 12) models)

TriGem SX486/33MM (incl. 486 /P (Type 20) model)

Trinity Technology Genesis Viper

Tulip Vision Line DE 4/66

Tulip Vision Line DS 4/66

Tulip Vision Line DS 486 dx/50i

Tulip Vision Line DS 486 SX/33i

Tulip Vision Line DS 586 DX/60

Tulip Vision Line DS/DE 486 dx/33i

Tulip Vision Line DT 4/66

Tulip Vision Line DT/DC 486 DX/33i

Tulip Vision Line DT/DC 486 DX/50i

Tulip Vision Line DT/DC 486 DX/66i

Tulip Vision Line series 486DX-33i

Tulip Vision Line series 486DX-50i

Tulip Vision Line series 486DX-66e

Tulip Vision Line Series 486DX-66i

Tulip Vision Line TR 586 DX/60

Tulip WS 4/66

TWINHEAD Superset 700

U.S. Micro Jet 386DX-33

U.S. Micro Jet 386DX-40

U.S. Micro Jet 486DLC-33

U.S. Micro Jet 486DX-33

U.S. Micro Jet 486DX-50

U.S. Micro Jet 486DX2-50

U.S. Micro Jet 486DX2-66

U.S. Micro Jet 486SX-25

U.S. Micro Jet EISA 486-33

U.S. Micro Jet EISA 486-50

U.S. Micro Jet EISA 486DX2-50

U.S. Micro Jet EISA 486DX2-66

U.S. Micro Jet EISA 486SX-25

U.S. Micro Jet VL 486DX-33

U.S. Micro Jet VL 486DX-50

U.S. Micro Jet VL 486DX2-50

U.S. Micro Jet VL 486DX2-66

U.S. Micro Jet VL 486SX-25

Ultra Technologies UL P5 60

Ultra Technologies UL486DX 33

Ultra Technologies UL486DX 50

Ultra Technologies UL486DX/2 66

Ultra-Comp 486DX-33

Ultra-Comp 486DX-33 EISA VLB

Ultra-Comp 486DX-33 VLB

Ultra-Comp 486DX-50

Ultra-Comp 486DX-50 EISA VLB

Ultra-Comp 486DX-50 VLB

Ultra-Comp 486DX2-66

Ultra-Comp 486DX2-66 EISA VLB

Ultra-Comp 486DX2-66 VLB

Unidata 486 66 Mhz ISA

Unique Computers, Ltd. UNIQUE 486DX50-VL

Unisys Pathway Series PS243-331

Unisys Pathway Series PS243-661

Unisys Pathway Series PS246-331

Unisys Pathway Series PS246-661

Unisys Pathway Series PS445-661

Unisys Pathway Series PSA456-601

Unisys Pathway Series PSA458-601

Unisys PW2 3336

Unisys PW2 Advantage 3256

Unisys PW2 Advantage 3336

Unisys PW2 Advantage 4163

Unisys PW2 Advantage 4253

Unisys PW2 Advantage 4256

Unisys PW2 Advantage 4336

Unisys PW2 Advantage 4506

Unisys PW2 Advantage 46662

Unisys PW2 Advantage Partner 43334

Unisys PW2 Advantage Plus 4668

Unisys PW2 Advantage Plus 5606

Unisys PW2 Advantage Plus 5608

Unisys SVE56691-FDD

Unisys SVI 59071

US Logic Falcon II Single Board Computer

Vektron VL 486DX/33

Vektron VL 486DX2/50 Business Multimedia

Vektron VL 486DX2/66 Professional Multimedia

Victor 400 DX/50

Victor 400 SX/25

Victor 486 DX/33

Victor 486 DX/66

Victor DX/50

Victor V486DSX/25

Viglen Contender 4DX33

Viglen EX-Series 4DX50

Viglen Genie 4DX66

Vobis 4386 VIO SX25

Vobis 486 VC-HD 33

Vobis 486 VC-HD 50

Vobis 486 VIO 66

Vtech 386 Ultra Slim

Vtech 466M

Vtech 486DX/3 Desktop

Vtech 486DX/3 Desktop (w/LBVGA)

Vtech 486DX/3 Desktop (w/VLBUS)

Vtech 486DX/3 Mini (w/VLBUS)

Vtech 486DX/3 Tower

Vtech 486DX/3 Tower (w/VLBUS)

Vtech 486DX2/4 Desktop

Vtech 486DX2/4 Desktop (w/LBVGA)

Vtech 486DX2/4 Desktop (w/VLBUS)

Vtech 486DX2/4 Tower

Vtech 486DX2/4 Tower (w/VLBUS)

Vtech 486DX2/6 Desktop

Vtech 486DX2/6 Desktop (w/LBVGA)

Vtech 486DX2/6 Desktop (w/VLBUS)

Vtech 486DX2/6 Mini (w/VLBUS)

Vtech 486DX2/6 Tower

Vtech 486DX2/6 Tower (w/VLBUS)

Vtech 486SX/3 Desktop

Vtech 486SX/3 Desktop (w/LBVGA)

Vtech 486SX/3 Desktop w/VLBUS

Vtech 486SX/3 Tower

Vtech 486SX/3 Ultra Slim

Vtech 486SX/3 Ultra Slim (w/LBVGA)

Vtech 486SX/4 Desktop

Vtech 486SX/4 Desktop (w/LBVGA)

Vtech 486SX/4 Desktop (w/VLBUS)

Vtech 486SX/4 Mini (w/VLBUS)

Vtech 486SX/4 Tower

Vtech 486SX/4 Ultra Slim

Vtech 486SX/4 Ultra Slim (w/LBVGA)

Vtech 560M

Vtech LT322 Notebook

Vtech LT421 Notebook

Vtech LT432 Notebook

Vtech LT433C Color Notebook

Vtech LT433C Notebook

Vtech Platinum SMP DX2-66

WANG DT250S

WANG DT266

WANG DT33S

Wang Microsystems ASI-CPU-E266

Wang Microsystems DTE-33

Wang Microsystems PC 350/40C

Western 486V25 SX VESA LOCAL BUS

Western 486V33 DX EISA

Western 486V33 DX ISA

Western 486V50 DX EISA

Western 486V50 DX ISA

Western 486V50 DX2 ISA

Western 486V66 DX2 EISA

Western 486V66 DX2 ISA

WIPRO Fusion 510

WIPRO LANDMARK E

WIPRO LANDMARK E SQUARE MODEL - 560

WIPRO Super Genius 386DX

WIPRO Super Genius 386SX

WIPRO Super Genius 486DX

WIPRO Super Genius 486SX

Wyle Laboratories Intel Xpress Deskside w/486DX-50MHz

Wyle Laboratories Intel Xpress DeskTop  w/486DX2-66MHz

Wyle Laboratories Intel Xpress DeskTop w/486DX-50MHz

Wyse Decision 386/25

Wyse Decision 386/40

Wyse Decision 386SX/25C

Wyse Decision 486/25

Wyse Decision 486/33

Wyse Decision 486/33E

Wyse Decision 486/33T

Wyse Decision 486DX2/50

Wyse Decision 486GSI

Wyse Decision 486se-25SX

Wyse Decision 486se-33DX

Wyse Decision 486se-33SX

Wyse Decision 486se-50DX2

Wyse Decision 486se-66DX2

Wyse Decision 486si-25SX

Wyse Decision 486si-33DX

Wyse Decision 486si-33SX

Wyse Decision 486si-50DX2

Wyse Decision 486si-66DX2

Wyse Forte` GSV

Wyse Series 6000i Model 640

Wyse Series 6000i Model 645

Wyse Series 7000i Model 740

Xycom XVME-674

Zenith Data Systems Z-386/33E

Zenith Data Systems Z-425/SX

Zenith Data Systems Z-425S+

Zenith Data Systems Z-433/DX

Zenith Data Systems Z-450X+

Zenith Data Systems Z-486/33ET

Zenith Data Systems Z-486SX/20

Zenith Data Systems Z-486SX/25E

Zenith Data Systems Z-Note 425Ln

Zenith Data Systems Z-SELECT 100 DX2/50

Zenith Data Systems Z-SELECT 100 DX2/66

Zenith Data Systems Z-SELECT 100 DX33

Zenith Data Systems Z-SELECT 100 SX25

Zenith Data Systems Z-SELECT 100 SX33

Zenith Data Systems Z-SERVER 425SE

Zenith Data Systems Z-SERVER 433DE

Zenith Data Systems Z-SERVER 450DE

Zenith Data Systems Z-SERVER EX 433DE Model 1000A (incl. Model 2000A)

Zenith Data Systems Z-SERVER EX 433DE Model 500 (incl. Model 1000)

Zenith Data Systems Z-SERVER EX 450DE Model 1000A (incl. Model 2000A)

Zenith Data Systems Z-SERVER EX 450DE Model 500 (incl. Model 1000)

Zenith Data Systems Z-SERVER EX 90E Model 2000

Zenith Data Systems Z-SERVER EX P60E Model 1000A (incl. Model 2000A)

Zenith Data Systems Z-SERVER EX P60E Model 500 (incl. Model 1000)

Zenith Data Systems Z-SERVER EX P90E MODEL 1000

Zenith Data Systems Z-SERVER LT 433DE Model 245 (incl. Model 1000)

Zenith Data Systems Z-SERVER LT 466XE Model 500 (incl. Model 1000)

Zenith Data Systems Z-SERVER LT P60E Model 1000A (incl. Model 2000A)

Zenith Data Systems Z-SERVER LT P60E Model 500 (incl. Model 1000)

Zenith Data Systems Z-Station 420SEh

Zenith Data Systems Z-Station 420SEn

Zenith Data Systems Z-Station 420Sh

Zenith Data Systems Z-Station 420Sn

Zenith Data Systems Z-Station 425Sh

Zenith Data Systems Z-Station 425Sn

Zenith Data Systems Z-Station 433DEh

Zenith Data Systems Z-Station 433DEn

Zenith Data Systems Z-Station 433Dh

Zenith Data Systems Z-Station 433SEh

Zenith Data Systems Z-Station 450XEh

Zenith Data Systems Z-Station 450Xh

Zenith Data Systems Z-Station 450Xn

Zenith Data Systems Z-STATION 500 Model 433

Zenith Data Systems Z-STATION 500 Model 466X

Zenith/INTEQ TEMPEST 486 WORKSTATION / SERVER

Zenon Z-Dream IIII EISA/VESA 486DX/66

Zenon Z-OPTIMUS PCI,SCSI-II, Pentium/60

ZEOS 486DX/33CDT

ZEOS 486DX/33EISA

ZEOS 486DX/33ISA

ZEOS 486DX/50

ZEOS 486SX/20DT

ZEOS Freestyle™ 386SL  25

ZEOS Pantera 60

ZEOS Upgradable 486 DX/33 Cache

ZEOS Upgradable 486 DX2/66 Cache

ZEOS Upgradable 486 SX/33 Cache

ZEOS Upgradable Local Bus DX2/66


Technical Notes

The Windows NT Driver Library is provided on the Windows NT CD-ROM in the \DRVLIB directory, as well as several locations for electronic transmission. Please see the section at the end of this document for instructions on downloading and accessing Windows NT Driver Library drivers.

     1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

     2	This device requires a driver from the Windows NT driver Library.  See the following section on accessing these drivers.

     3	System requires ALR EISA Config utility 2.13 or later to enable COM ports in Windows NT 3.5.

     4	External Cache must be disabled to run Windows NT 3.5

     5	Requires AST BIOS Rev. 1.02 to install and run Windows NT 3.5.

     6	Requires AST BIOS Rev. 2.03 to install and run Windows NT 3.5.

     7	Must copy ABIOS.SYS and *.BIO from reference diskette to root directory of boot drive to install Windows NT on this system.

     8	Requires the IBM RAID Controller v2.0 driver located in Windows NT Driver Library.

     9	This system only supports 640x480x16 video resolution.

    10	Refer to SETUP.TXT on the Windows NT 3.5 CDROM for information on configuring this machine/device before installation.

    11	To Install Windows NT 3.5 on this system SCSI detection must be skipped during setup.

    12	Refer to setup.txt to properly configure this system for printing in Windows NT 3.5.

    13	Requires AMD Bios Revision 0.02.18 to function as a multiprocessor system.

    14	Only the NCR 53c710 SCSI Host Adapter is supported in this machine.

    15	Contact the manufacturer for information on running Windows NT on this machine.

    16	This system requires Windows Sound System driver to enable sound.

    17	Supported on x86 only.

    18	For best performance, this adapter should be configured to IRQ-11.

    19	Tape drives are not supported with this adapter.

    20	Tested with firmware revisions 3.10 and 3.20.

    21	This adapter requires an active terminator for proper performance.

    22	The floppy controller on this adapter is not supported.

    23	This adapter must be configured for 5 MB/second asynchronous I/O to work with listed CD-ROM drives from NEC.

    24	This adapter must be configured for 5 MB/second asynchronous I/O to work with listed CD-ROM drives from Chinon, Hitachi, and NEC.

    25	Tested with the Unisys PW2 Advantage 3256 (Flemington).

    26	AIC-7770c and AIC-7770e are supported.

    27	Tested with the Unisys PW2 Advantage Plus MPE 4668.

    28	Removable media drives are not supported with cache module installed.

    29	Tested with Compaq Deskpro XL 466 and HP Vectra XU 5/90c.

    30	Scanners are not supported with this adapter.

    31	To use this adapter, at least one device on the bus must provide termination power.

    32	Refer to SETUP.TXT for information on configuring this adapter.

    33	SCSI BIOS dated before 1991 requires PS/2 Reference Diskette version 1.12 or later.

    34	This adapter cannot be used for CD Setup.  To install Windows NT with this adapter, use the WINNT.EXE Setup method.

    35	The driver for this adapter defaults to IRQ-15.

    36	Tested with Dell Omniplex 560.

    37	Tested with Digital Equipment Corp. AlphaServer 2100 4/200 (Digital Equipment Corp. 2100 Server model A500MP).

    38	Tested with COMPAQ Portable 486c.

    39	Tested with NCR System 3000 Model 3360.

    40	This driver is not supported on Multi-Processor computers.

    41	This adapter is only supported on IRQ-5.

    42	Tested with firmware revision 005.

    43	Tested with firmware revision 008.

    44	This drive is not supported for use with the Future Domain TMC-850M and TMC-1670 adapters.

    45	Users may encounter problems with CD-R (recordable) discs.

    46	Requires firmware version 2.5 for proper operation, please contact NEC Technical support (800-388-8888) for assistance.

    47	This drive requires double-termination when used with the Adaptec AHA-1742A.

    48	The Ultrastor 24f supports only a single disk when used with this drive.

    49	Only supported with access to 1 CD at a time.

    50	Requires firmware revision 1.10C to function properly with Windows NT.

    51	Supported with CD-ROM drives based on Panasonic CR-52x and CR-56x models only.

    52	After installing the driver for this CDROM drive from the Setup Application please Shut-down Windows NT and power cycle your machine.

    53	After completing installation of Windows NT with the driver for this CDROM drive installed, please Shut-down Windows NT and power cycle your machine.

    54	This drive is not supported with the Adaptec AHA-1640 adapter.

    55	NTBackup does not support autoloaders.  This drive is supported in single-tape operation only.

    56	Requires firmware version 484 or later for proper operation.

    57	This drive is not supported with the Future Domain TMC-850M(ER).

    58	Tested with firmware rev. ARCHIVE IBM4326NP/RP !D04AP

    59	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).

    60	This drive is not supported with the Adaptec AHA-1510 adapter.

    61	The Future Domain TMC-1670 with bios version 3.0 requires that the bios be disabled when used with this drive.

    62	Compression jumper must be in enabled position on this drive.

    63	This drive is not supported with the UltraStor 24fa adapter.

    64	Requires firmware rev.    DEC9314

    65	Tested with firmware rev. DEC4318

    66	Tested with firmware rev. DEC930A

    67	Tested with firmware rev. DEC9514

    68	For use with floppy controllers.  Separate interface controllers for these types of drives are not supported.

    69	The Adaptec emulation mode on the Dell Drive Array(DDA) must be disabled for compatibility with the hardware's Windows NT Driver.

    70	This adapter is currently supported in its ESC-1/ESC-2 compatibility mode only.

    71	Tested with BusLogic BT-747S.

    72	Not supported as boot device.

    73	Not supported with the Future Domain TMC-850m.

    74	Tested with firmware revision HQ30.

    75	Requires firmware version 1.15.15s for proper performance.

    76	Versions of this board based on the 688LX or 68003 chip require more than 1mb of video memory to support 800x600x65k.

    77	Some revisions of this board are not supported under Windows NT.  Please see the Release Notes on how to identify these boards.

    78	The AVGA will occasionally present "snow" on the screen at 800x600.

    79	Requires Rev E. Bios 3.09 for proper performance.

    80	Tested with NCR System 3000 Model 3445.

    81	Tested with NCR System 3000 Model 3350.

    82	Video boards based on the Cirrus 542x family of chips are not supported in Pentium computers.

    83	65k colors are supported with a 565 DAC, 32k colors with a 555 DAC.

    84	Some older 928 chips do not support 800x600xTRUE with 2Mb of RAM.

    85	S3 based adapters that use the ICS DAC will not function with the S3 driver.  The Standard VGA driver must be installed during setup for the system to function properly.

    86	Not all video board/monitor combinations are able to properly display 1600x1200.

    87	Some video boards based on Western Digital chips have experienced misplaced pixels when running in Pentium based computers.

    88	ATI Mach 32 based boards with rev. 003 of the Mach 32 chip will not support 800x600 with only 1Mb of RAM.

    89	2MB Video Memory only supported on Cirrus 543x series of chips.

    90	This adapter has been verified to work with Network Monitor

    91	FDDI tested only.

    92	Not supported with Multiprocessor MIPS systems.

    93	Not compatible with IBM Thinkpad 700.

    94	Non-bidirectional parallel port machines may suffer performance degradation when the driver for this adapter is installed.

    95	Not supported in Sound Blaster 1.x compatibility mode.

    96	Supported in Sound Blaster 1.x compatibility mode.

    97	Error control and flow control forced on.

    98	Advanced features disabled.

    99	Supported as a client modem only.

   100	Flow control forced on.

   101	Maximum DTE speed set to 2400.

   102	Maximum DTE speed set to 9600.

   103	Modem compression forced on.

   104	Tested as standard serial ports only.

   105	Shared interrupt configuration is not recommended when running RAS, use one interrupt for each port.

   106	Supported on x86 only.

   107	If this model was purchased prior to March 1993, contact Data Storage Marketing for compatibility verification.

   108	To install Windows NT on this system, TMV1.sys on the Windows NT Setup disk 1 must be renamed or removed.

   109	Windows NT does not currently support Advanced Power Management (APM).

   110	This system requires an ABIOS.SYS driver dated after 11/1/93 to support IDE drives.  Call Microsoft Product Support Services to obtain this update.

   111	To run Windows NT 3.1 on this system contact the IBM HelpCenter at 1-800-772-2227.

   112	This system only supports 640x480x16 video resolution.

   113	Patch required for the IBM Thinkpad 750 series to install Windows NT 3.1.  Available on CompuServe in the WINNT forum in library 2 and also in the same locations as the Windows NT Driver Library.

   114	IDE drives greater than 500MB are only supported with BIOS Version 1.23 or later, with BIOS setting for IDE in standard mode.


Updates
How To Find New Drivers in the Windows NT Driver Library (WNTDL)

COMPUSERVE

A.  If you are using WinCIMSM:

1.  From the Services menu, select GO.

2.  Type MSL in the GO dialog box.

3.  Select 2 to scan.

4.  Search for WNTDL to view the whole WNTDL list or another  key word to view specific files.

B.  If you are not using WinCIM, log onto CompuServe, type GO MSL, then follow instructions 3 and 4 above.

ONLINE

A.  Log onto OnLine.

1.  From the Database menu, select the option to Select DB.

2.  Choose the Software Library option.

3.  From the Software Library option, select the option Host Items.

4.  In the Query box, type WNTDL to review the whole WNTDL list or another key word to view a specific file.

B.  To get more information on a specific file, highlight the file with the cursor and press <Enter>. This brings up more details about the file.

GENie™

Log onto Genie.

1.  From the main menu, select option 5 - Computing Services.

2.  From the Computing Services menu, select option 6 - IBM PC/TANDY Roundtables.

3.  From the IBM PC/TANDY Roundtables menu, select option 3 - Software Libraries.

4.  From the Software Libraries Menu, select option 3 - Search File Directory.

5.  Type WNTDL as the search string to view the WNTDL list or any other key word to view a specific file.

MICROSOFT DOWN LOAD SERVICES

Log onto MSDL by calling (206) 936-6735.

1.  Enter name and location.

2.  From the main menu, press F for File index.

3.  Select L to list the whole WNTDL list or E to examine a specific file.

IF YOU DO NOT HAVE A MODEM

You can obtain an individual driver from the WNTDL on a disk by calling Microsoft Product Support Services at (206) 637-7098.


Disclaimer

While we have endeavored to supply as complete and accurate a list as possible, MICROSOFT MAKES NO WARRANTIES, EXPRESS OR IMPLIED, AS TO THE COMPLETENESS AND ACCURACY OF THIS LIST.  This list does not constitute an endorsement of any particular manufacturer.

 Microsoft and BallPoint are registered trademarks and Windows and Windows NT are trademarks of Microsoft Corporation.


1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.


2	This device requires a driver from the Windows NT driver Library.  See the following section on accessing these drivers.


3	System requires ALR EISA Config utility 2.13 or later to enable COM ports in Windows NT 3.5.


4	External Cache must be disabled to run Windows NT 3.5


5	Requires AST BIOS Rev. 1.02 to install and run Windows NT 3.5.


6	Requires AST BIOS Rev. 2.03 to install and run Windows NT 3.5.


7	Must copy ABIOS.SYS and *.BIO from reference diskette to root directory of boot drive to install Windows NT on this system.


8	Requires the IBM RAID Controller v2.0 driver located in Windows NT Driver Library.


9	This system only supports 640x480x16 video resolution.


10	Refer to SETUP.TXT on the Windows NT 3.5 CDROM for information on configuring this machine/device before installation.


11	To Install Windows NT 3.5 on this system SCSI detection must be skipped during setup.


12	Refer to setup.txt to properly configure this system for printing in Windows NT 3.5.


13	Requires AMD Bios Revision 0.02.18 to function as a multiprocessor system.


14	Only the NCR 53c710 SCSI Host Adapter is supported in this machine.


15	Contact the manufacturer for information on running Windows NT on this machine.


16	This system requires Windows Sound System driver to enable sound.


17	Supported on x86 only.


18	For best performance, this adapter should be configured to IRQ-11.


19	Tape drives are not supported with this adapter.


20	Tested with firmware revisions 3.10 and 3.20.


21	This adapter requires an active terminator for proper performance.


22	The floppy controller on this adapter is not supported.


23	This adapter must be configured for 5 MB/second asynchronous I/O to work with listed CD-ROM drives from NEC.


24	This adapter must be configured for 5 MB/second asynchronous I/O to work with listed CD-ROM drives from Chinon, Hitachi, and NEC.


25	Tested with the Unisys PW2 Advantage 3256 (Flemington).


26	AIC-7770c and AIC-7770e are supported.


27	Tested with the Unisys PW2 Advantage Plus MPE 4668.


28	Removable media drives are not supported with cache module installed.


29	Tested with Compaq Deskpro XL 466 and HP Vectra XU 5/90c.


30	Scanners are not supported with this adapter.


31	To use this adapter, at least one device on the bus must provide termination power.


32	Refer to SETUP.TXT for information on configuring this adapter.


33	SCSI BIOS dated before 1991 requires PS/2 Reference Diskette version 1.12 or later.


34	This adapter cannot be used for CD Setup.  To install Windows NT with this adapter, use the WINNT.EXE Setup method.


35	The driver for this adapter defaults to IRQ-15.


36	Tested with Dell Omniplex 560.


37	Tested with Digital Equipment Corp. AlphaServer 2100 4/200 (Digital Equipment Corp. 2100 Server model A500MP).


38	Tested with COMPAQ Portable 486c.


39	Tested with NCR System 3000 Model 3360.


40	This driver is not supported on Multi-Processor computers.


41	This adapter is only supported on IRQ-5.


42	Tested with firmware revision 005.


43	Tested with firmware revision 008.


44	This drive is not supported for use with the Future Domain TMC-850M and TMC-1670 adapters.


45	Users may encounter problems with CD-R (recordable) discs.


46	Requires firmware version 2.5 for proper operation, please contact NEC Technical support (800-388-8888) for assistance.


47	This drive requires double-termination when used with the Adaptec AHA-1742A.


48	The Ultrastor 24f supports only a single disk when used with this drive.


49	Only supported with access to 1 CD at a time.


50	Requires firmware revision 1.10C to function properly with Windows NT.


51	Supported with CD-ROM drives based on Panasonic CR-52x and CR-56x models only.


52	After installing the driver for this CDROM drive from the Setup Application please Shut-down Windows NT and power cycle your machine.


53	After completing installation of Windows NT with the driver for this CDROM drive installed, please Shut-down Windows NT and power cycle your machine.


54	This drive is not supported with the Adaptec AHA-1640 adapter.


55	NTBackup does not support autoloaders.  This drive is supported in single-tape operation only.


56	Requires firmware version 484 or later for proper operation.


57	This drive is not supported with the Future Domain TMC-850M(ER).


58	Tested with firmware rev. ARCHIVE IBM4326NP/RP !D04AP


59	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).


60	This drive is not supported with the Adaptec AHA-1510 adapter.


61	The Future Domain TMC-1670 with bios version 3.0 requires that the bios be disabled when used with this drive.


62	Compression jumper must be in enabled position on this drive.


63	This drive is not supported with the UltraStor 24fa adapter.


64	Requires firmware rev.    DEC9314


65	Tested with firmware rev. DEC4318


66	Tested with firmware rev. DEC930A


67	Tested with firmware rev. DEC9514


68	For use with floppy controllers.  Separate interface controllers for these types of drives are not supported.


69	The Adaptec emulation mode on the Dell Drive Array(DDA) must be disabled for compatibility with the hardware's Windows NT Driver.


70	This adapter is currently supported in its ESC-1/ESC-2 compatibility mode only.


71	Tested with BusLogic BT-747S.


72	Not supported as boot device.


73	Not supported with the Future Domain TMC-850m.


74	Tested with firmware revision HQ30.


75	Requires firmware version 1.15.15s for proper performance.


76	Versions of this board based on the 688LX or 68003 chip require more than 1mb of video memory to support 800x600x65k.


77	Some revisions of this board are not supported under Windows NT.  Please see the Release Notes on how to identify these boards.


78	The AVGA will occasionally present "snow" on the screen at 800x600.


79	Requires Rev E. Bios 3.09 for proper performance.


80	Tested with NCR System 3000 Model 3445.


81	Tested with NCR System 3000 Model 3350.


82	Video boards based on the Cirrus 542x family of chips are not supported in Pentium computers.


83	65k colors are supported with a 565 DAC, 32k colors with a 555 DAC.


84	Some older 928 chips do not support 800x600xTRUE with 2Mb of RAM.


85	S3 based adapters that use the ICS DAC will not function with the S3 driver.  The Standard VGA driver must be installed during setup for the system to function properly.


86	Not all video board/monitor combinations are able to properly display 1600x1200.


87	Some video boards based on Western Digital chips have experienced misplaced pixels when running in Pentium based computers.


88	ATI Mach 32 based boards with rev. 003 of the Mach 32 chip will not support 800x600 with only 1Mb of RAM.


89	2MB Video Memory only supported on Cirrus 543x series of chips.


90	This adapter has been verified to work with Network Monitor


91	FDDI tested only.


92	Not supported with Multiprocessor MIPS systems.


93	Not compatible with IBM Thinkpad 700.


94	Non-bidirectional parallel port machines may suffer performance degradation when the driver for this adapter is installed.


95	Not supported in Sound Blaster 1.x compatibility mode.


96	Supported in Sound Blaster 1.x compatibility mode.


97	Error control and flow control forced on.


98	Advanced features disabled.


99	Supported as a client modem only.


100	Flow control forced on.


101	Maximum DTE speed set to 2400.


102	Maximum DTE speed set to 9600.


103	Modem compression forced on.


104	Tested as standard serial ports only.


105	Shared interrupt configuration is not recommended when running RAS, use one interrupt for each port.


106	Supported on x86 only.


107	If this model was purchased prior to March 1993, contact Data Storage Marketing for compatibility verification.


108	To install Windows NT on this system, TMV1.sys on the Windows NT Setup disk 1 must be renamed or removed.


109	Windows NT does not currently support Advanced Power Management (APM).


110	This system requires an ABIOS.SYS driver dated after 11/1/93 to support IDE drives.  Call Microsoft Product Support Services to obtain this update.


111	To run Windows NT 3.1 on this system contact the IBM HelpCenter at 1-800-772-2227.


112	This system only supports 640x480x16 video resolution.


113	Patch required for the IBM Thinkpad 750 series to install Windows NT 3.1.  Available on CompuServe in the WINNT forum in library 2 and also in the same locations as the Windows NT Driver Library.


114	IDE drives greater than 500MB are only supported with BIOS Version 1.23 or later, with BIOS setting for IDE in standard mode.


9	This system only supports 640x480x16 video resolution.

10	Refer to SETUP.TXT on the Windows NT 3.5 CDROM for information on configuring this machine/device before installation.


14	Only the NCR 53c710 SCSI Host Adapter is supported in this machine.

15	Contact the manufacturer for information on running Windows NT on this machine.


1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

28	Removable media drives are not supported with cache module installed.


31	To use this adapter, at least one device on the bus must provide termination power.

32	Refer to SETUP.TXT for information on configuring this adapter.


30	Scanners are not supported with this adapter.

34	This adapter cannot be used for CD Setup.  To install Windows NT with this adapter, use the WINNT.EXE Setup method.


1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

40	This driver is not supported on Multi-Processor computers.


1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

30	Scanners are not supported with this adapter.


19	Tape drives are not supported with this adapter.

31	To use this adapter, at least one device on the bus must provide termination power.

41	This adapter is only supported on IRQ-5.


31	To use this adapter, at least one device on the bus must provide termination power.

41	This adapter is only supported on IRQ-5.


45	Users may encounter problems with CD-R (recordable) discs.

46	Requires firmware version 2.5 for proper operation, please contact NEC Technical support (800-388-8888) for assistance.


48	The Ultrastor 24f supports only a single disk when used with this drive.

49	Only supported with access to 1 CD at a time.


52	After installing the driver for this CDROM drive from the Setup Application please Shut-down Windows NT and power cycle your machine.

53	After completing installation of Windows NT with the driver for this CDROM drive installed, please Shut-down Windows NT and power cycle your machine.


59	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).

60	This drive is not supported with the Adaptec AHA-1510 adapter.

61	The Future Domain TMC-1670 with bios version 3.0 requires that the bios be disabled when used with this drive.


59	This drive is not supported with the IBM PS/2 Microchannel SCSI Host Adapter (with cache).

60	This drive is not supported with the Adaptec AHA-1510 adapter.

61	The Future Domain TMC-1670 with bios version 3.0 requires that the bios be disabled when used with this drive.

62	Compression jumper must be in enabled position on this drive.


55	NTBackup does not support autoloaders.  This drive is supported in single-tape operation only.

66	Tested with firmware rev. DEC930A


55	NTBackup does not support autoloaders.  This drive is supported in single-tape operation only.

67	Tested with firmware rev. DEC9514


10	Refer to SETUP.TXT on the Windows NT 3.5 CDROM for information on configuring this machine/device before installation.

69	The Adaptec emulation mode on the Dell Drive Array(DDA) must be disabled for compatibility with the hardware's Windows NT Driver.


71	Tested with BusLogic BT-747S.

72	Not supported as boot device.


73	Not supported with the Future Domain TMC-850m.

74	Tested with firmware revision HQ30.


83	65k colors are supported with a 565 DAC, 32k colors with a 555 DAC.

84	Some older 928 chips do not support 800x600xTRUE with 2Mb of RAM.


1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

90	This adapter has been verified to work with Network Monitor

91	FDDI tested only.


1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

91	FDDI tested only.


1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

90	This adapter has been verified to work with Network Monitor


1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

93	Not compatible with IBM Thinkpad 700.

94	Non-bidirectional parallel port machines may suffer performance degradation when the driver for this adapter is installed.


1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

90	This adapter has been verified to work with Network Monitor

93	Not compatible with IBM Thinkpad 700.

94	Non-bidirectional parallel port machines may suffer performance degradation when the driver for this adapter is installed.


1	This device requires a driver from the \DRVLIB directory on the Windows NT CD-ROM, or the Windows NT Driver Library.

17	Supported on x86 only.


10	Refer to SETUP.TXT on the Windows NT 3.5 CDROM for information on configuring this machine/device before installation.

112	This system only supports 640x480x16 video resolution.


112	This system only supports 640x480x16 video resolution.

113	Patch required for the IBM Thinkpad 750 series to install Windows NT 3.1.  Available on CompuServe in the WINNT forum in library 2 and also in the same locations as the Windows NT Driver Library.